\begin{table}%t3
\caption{\label{table:abund77}Derived disk-centre oxygen abundances ($\log\epsilon_{\rm O}$) from from the 3D model.} 
%\centering
\par
\begin{tabular}{c l c c} 
\hline\hline
O~\textsc{i} line [nm] & $S_{\rm H}$ & SST/TRIPPEL & FTS atlas \\ 
\hline 
777.19 & 0.01 & 8.50 & 8.52 \\ 
       & 0.1  & 8.53 & 8.55 \\ 
       & 0.3  & 8.58 & 8.60 \\
       & 0.5  & 8.61 & 8.63 \\ 
       & 1    & 8.66 & 8.68 \\ 
       & 1.5  & 8.73 & 8.75 \\ 
       & 3    & 8.76 & 8.77 \\
       & 10   & 8.82 & 8.84 \\
       & LTE  & 8.87 & 8.88 \\ 
777.41 & 0.01 & 8.54 & 8.55 \\ 
       & 0.1  & 8.56 & 8.57 \\ 
       & 0.3  & 8.60 & 8.61 \\ 
       & 0.5  & 8.63 & 8.64 \\
       & 1    & 8.69 & 8.69 \\ 
       & 1.5  & 8.74 & 8.75 \\ 
       & 3    & 8.76 & 8.77 \\
       & 10   & 8.82 & 8.83 \\
       & LTE  & 8.85 & 8.86 \\ 
777.53 & 0.01 & 8.58 & 8.58 \\ 
       & 0.1  & 8.60 & 8.60 \\ 
       & 0.3  & 8.63 & 8.64 \\
       & 0.5  & 8.65 & 8.66 \\
       & 1    & 8.69 & 8.70 \\ 
       & 1.5  & 8.74 & 8.75 \\ 
       & 3    & 8.75 & 8.76 \\
       & 10   & 8.80 & 8.81 \\
       & LTE  & 8.83 & 8.83 \\ 
\hline
\end{tabular} 
\end{table}