\begin{table}
\caption{\label{GR_zzsimulated}\zphot accuracy derived from simulations for
  galaxies in the spectroscopic sample, based on the GR code.}
%\centerline
 {\begin{tabular}{clccccccc}
\hline \hline
Clusters & Redshift interval & Galaxy type &
$\langle \Delta_z \rangle$ & $\sigma_z$ &
$\sigma_{z,\rm MAD}$ & $\sigma(\Delta z/(1+z))$ & $l\%$ & $g\%$  \\
\hline 
Low-$z$ & $0.3 $~$\le$~\zphot$ \le $~$1$ &  all & 
0.008   &  0.150 & 0.104  &   0.063 & 0.9 &    7.7 \\
%
High-$z$ & $0.3$~$ \le$~\zphot~$ \le$~$ 1$ & all &
--0.072 &    0.164 & 0.167  &   0.100 & 10.6  &   20.3 \\
%
High-$z$ & $0.45 $~$\le$~\zphot~$ \le$~$ 1$ & all &  
--0.092 &   0.158 & 0.151 &  0.088 & 6.5 &    21.5 \\
Low-$z$ & $0.3 $~$\le$  \zphot~$ \le$~$ 1$ &  E/S0 & 
--0.140  &   0.129 & 0.184  &   0.110 & 4.2 &    6.3 \\
      &                             & Sbc & 
--0.077  &   0.117  & 0.136   &   0.082 & 0.8 &     9.9 \\
      &                             & Scd & 
0.013  &    0.076 & 0.070  &    0.041 &  0.0  &    4.3 \\
      &                             & Im & 
0.024 &    0.077 & 0.075   &  0.045 & 0.0 &    5.9 \\
      &                             & SB &
0.098  &   0.117 & 0.121  &   0.076 & 0.1 &   9.8 \\
High-$z$ & $0.3$~$ \le$~\zphot~$ \le$~$ 1$ & E/S0 & 
--0.227  &   0.153 & 0.370  &   0.226 & 12.2 &    31.6 \\
      &                             & Sbc & 
--0.101  &    0.161  & 0.232  &    0.134 & 17.3   &   28.0 \\
      &                             &  Scd & 
--0.025  &   0.093 & 0.086  &   0.052 & 2.7  &   16.2  \\
      &                             & Im & 
0.024   &  0.126 & 0.123  &   0.074 & 5.9  &   6.7 \\
      &                             & SB & 
--0.045  &   0.063 & 0.077  &   0.047 & 2.3  &   13.5 \\
\hline 
\end{tabular}}
\par
\smallskip
Notes: the accuracy reached for
  the different spectral types of galaxies is also presented. The
  information given is the same as in Table~\ref{zzsum} and
  Table~\ref{zzsimulated}, for the current spectroscopic sample. 
\end{table}