\begin{table}%t1
\caption {\label{zzsimulated}\zphot accuracy from simulations 
for galaxies in the spectroscopic sample, based on {\it Hyperz}.}
%\centerline
 {\begin{tabular}{clccccccc}
\hline \hline
Clusters & Redshift interval & Galaxy type &
$\langle \Delta_z \rangle$ & $\sigma_z$ &
$\sigma_{z,M\rm AD}$ & $\sigma(\Delta z/(1+z))$ & $l\%$ & $g\%$  \\
\hline 
Low-$z$ & $0.3 $~$\le$~\zphot~$ \le$~1 &  all & 
0.061   &  0.131 & 0.124  &   0.076 & 2.2 &    6.0 \\
%
High-$z$ & $0.3 $~$\le$~\zphot~$ \le$~$ 1$ & all &
0.015 &    0.101 & 0.074  &   0.045 & 6.6  &   2.8 \\
%
High-$z$ & $0.45 $~$\le$~\zphot~$ \le $~$1$ & all &  
0.019  &   0.108 & 0.080 &    0.046 & 8.2 &    2.8\\
Low-$z$ & $0.3 \le$  \zphot~$ \le$~$ 1$ &  E/S0 & 
--0.036  &   0.121 & 0.087  &   0.052 & 3.4 &    2.2 \\
      &                             & Sbc & 
0.075  &    0.108  &0.176   &   0.105 & 2.2 &     5.0 \\
      &                             & Scd & 
0.110  &    0.082 & 0.176  &    0.107 &  0.8  &    1.9 \\
      &                             & Im & 
0.023 &    0.089 & 0.086   &  0.053 & 0.4 &    5.6 \\
      &                             & SB &
0.095  &   0.124 & 0.126  &   0.075 & 0.6 &   11.6 \\
High-$z$ & $0.3 $~$\le$~\zphot~$ \le$~$ 1$ & E/S0 & 
--0.019  &   0.040 & 0.031  &   0.019 & 0.0 &    0.2 \\
      &                             & Sbc & 
0.037  &    0.081  & 0.077  &    0.048 & 0.1   &   0.7 \\
      &                             &  Scd & 
0.030  &   0.072 & 0.070  &   0.043 & 0.0  &   1.4  \\
      &                             & Im & 
0.050   &  0.077 & 0.085  &   0.050 &0.2  &   1.1 \\
      &                             & SB & 
--0.022  &   0.127 & 0.087  &   0.054 &7.4  &   3.5 \\
\hline 
\end{tabular}}
\par
\smallskip
Notes: the accuracy reached for
  the different spectral types of galaxies is also presented. The
  information given is the same as in Table~\ref{zzsum}, for the
  current spectroscopic sample.  \vspace{-1mm}
\end{table}