\begin{table}%t12
%\centering
\par
%Table12
\caption {\label{tab12}Observed, ism corrected and 
totally unabsorbed fluxes of WR~22 in the
different energy bands. The fluxes are expressed in 
10$^{-13}$~erg~cm$^{-2}$~s$^{-1}$.}
\begin{tabular}{lccccc}
\hline\hline
Energy band & $\phi$~=~0.582/0.680 & $\phi$~=~0.765 & $\phi$~=~0.828 &
$\phi$~=~0.903 & $\phi$~=~0.994 \\
\multicolumn{1}{l}{(keV)} & II+VI & VII & III & IV & V \\
\hline
Observed fluxes \\
0.5--10.0 & 3.00 & 2.46 & 2.35 & 2.21 & 1.77 \\
0.5--1.0  & 0.87 & 0.55 & 0.35 & 0.22 & 0.05 \\
1.0--2.0  & 1.02 & 0.82 & 1.00 & 0.79 & 0.47 \\
2.0--10.0 & 1.12 & 1.08 & 1.00 & 1.20 & 1.23 \\
\hline
ism corrected fluxes \\
0.5--10.0 & 4.83 & 3.62 & 3.22 & 2.82 & 2.01 \\
0.5--1.0  & 2.28 & 1.38 & 0.84 & 0.53 & 0.11 \\
1.0--2.0  & 1.42 & 1.15 & 1.35 & 1.08 & 0.61 \\
2.0--10.0 & 1.13 & 1.09 & 1.03 & 1.21 & 1.28 \\
\hline
Unabsorbed fluxes \\
0.5--10.0 & 7.36 & 7.20 & 14.27 & 13.17 & 11.11 \\
0.5--1.0  & 4.34 & 4.27 & 9.54 & 8.58 & 6.75 \\
1.0--2.0  & 1.84 & 1.77 & 3.59 & 3.22 & 2.91 \\
2.0--10.0 & 1.18 & 1.16 & 1.15 & 1.22 & 1.45 \\
\hline
\end{tabular}
\end{table}