\begin{table}%t4
\caption{\label{tab:2_spots2}Parameters of the 2 spots found by the parametric fit.}
%\centerline
 {\small \begin{tabular}{lcccl}
\hline\hline
Parameter & Param-T1 & Param-T2 \\
\hline
RRA-cen &  $6.5 \pm 1.5$ &  --$6.2 \pm 1.5$\\
RDEC-cen & $6.8 \pm 1.5$ & --$8.0 \pm 1.5$ \\ 
UD diameter in mas &   11  & $0.02 \pm 1$ \\ 
Amplitude   &$2 \pm 1$ & $2 \pm 1$ \\
(\% the max) & & & & \\
     \hline
\end{tabular}}
\medskip
Spots are modeled as uniform disks.
\end{table}