\begin{table}%t3
\caption{\label{tab:2_spots}Parameters of a Gaussian fit to the two bright spots revealed by MIRA and WISARD.}
%\centerline
 {
\small \begin{tabular}{lcccccl}
\hline\hline
Parameter & MIRA-T1 & WISARD-T1 & MIRA-T2 &  WISARD-T2  \\
\hline
RRA-cen & $2.3 \pm 1.5$ &  $2.9 \pm 1.5$ & --$1.3  \pm 1.5$  & --$0.6 \pm 1.5$\\
RDEC-cen & $7.5 \pm 1.5$ & $7.1  \pm 1.5$ &  --$4.5 \pm 1.5$ & --$4.7 \pm 1.5$\\ 
FWHM-RA &   $10.32 \pm 2$ & $11.08 \pm  2$ &  $6.86 \pm  2$ & $8.89 \pm 2$ \\ 
FWHM-Dec & $5.80 \pm 2$& $6.38 \pm 2$ & $4.32 \pm 2$ & $5.65 \pm 2$\\ 
Amplitude   &$8  \pm  1$ & $9 \pm 1$ &$ 4 \pm 1$ & $5  \pm 1$\\
(\% the max) & & & & \\
     \hline
\end{tabular}}
\medskip
 T1 corresponds to the northern spot, T2 to the southern one.
\end{table}