\begin{table}%t2
%\centering
\par
\caption{\label{tab:DAsum}Results of fitting of the limb darkening models.}
\small \begin{tabular}{lccccccl}
\hline\hline
Model&  $\phi_{\rm LD}$ & Limb darkening & Reduced\\  
  & & parameter(s )& $\chi^{2}$\\
\hline
Linear  & $44.28 \pm 0.15$ & $0.43 \pm 0.03$ & 11 \\
Quadratic  & $44.31 \pm 0.12$ &$0.42 \pm 0.03$ et $0.02 \pm 0.03$ & 11\\ 
MARCS  & $46.74 \pm 0.12$ & & 12 \\ 
\hline
\end{tabular}
\end{table}