\begin{table}%t2
\par
\caption{\label{tab:SF}Rise times for stationary flow simulations. }
%\centering
\par
\begin{tabular}{c c c c c}
\hline\hline
& & $\varv_{\rm max}$ = --50~m~s$^{-1}$ & & \\
\hline
& & & $\tau_{\rm rise}$ (days) & \\
$\lambda_0$ (deg) & $B_0$ ($10^4$~G) &$\sigma_{\phi,\theta}=2^\circ$ & 
$\sigma_{\phi,\theta}=5^\circ$ & $\sigma_{\phi,\theta}=10^\circ$ \\
0 & 1 &	stable &	stable &	stable \\
0 & 3 &	stable &	stable &	stable \\
0 & 5 &	723 &	492 &	397 \\
0 & 6 &	920 &	324 & 	259 \\
0 & 7 &	445 &	269 &	207 \\
{\it 0} & {\it 10} &	662 &	700 &	191 \\
10 & 5 &	661 & 464 & 369 \\
10 & 7 &	439 & 265 & 204 \\
30 & 7 &	1791 &	268  & 192 \\
40 & 4 &	 stable & 2516 & 1364 \\
\hline
& & $\varv_{\rm max}$ = --10~m~s$^{-1}$ & & \\
& & & $\tau_{\rm rise}$ (days)& \\
$\lambda_0$ (deg) & $B_0$ (T) &$\sigma_{r,\theta}=2^\circ$ & 
$\sigma_{r,\theta}=5^\circ$ & $\sigma_{r,\theta}=10^\circ$ \\
0 & 5 &	stable & stable & stable \\
0 & 7 &	stable & stable & stable \\
{\it 0} & {\it 10} &	659 ($m=1$) & 608	& 567 \\
{\it 0} & {\it 12} &	147 ($m=2$) & 140	& 136 \\
10 & 7 & stable & stable & stable \\
30 & 7 & stable & stable & 4167 \\
\hline
\end{tabular}
\end{table}