\begin{table}%t1
\caption{\label{tab1}The average large and small separations $\langle \Delta \nu_{0} \rangle$, $\langle d_{02} \rangle$, $\langle d_{13} \rangle$ for models with $Z_{i}$~=~0.03.}
\par
%\centering
\small
\begin{tabular}{c| r| r r r|r r r}
\hline\hline
&&&&&&& \\[-8pt]
  $M$&Age&\multicolumn{3}{c|}{No -- diffusion}&\multicolumn{3}{c}{Diffusion}\\
$(M_{\odot})$&(Gyr)&$\langle \Delta \nu_{0} \rangle$&
$\langle d_{02} \rangle$& $\langle d_{13} \rangle$&$\langle \Delta \nu_{0} \rangle$& $\langle d_{02} \rangle$& $\langle d_{13} \rangle$\\
 \hline
0.8  &0.5&  201.20&  16.89&   27.22&    200.94&   16.87&  27.19\\
0.8  &1.0&  199.80&  16.53&   26.71&    199.22&   16.48&  26.63\\
0.8  &1.5&  198.71&  16.24&   26.30&    197.86&   16.16&  26.19\\
0.8  &2.0&  197.79&  15.97&   25.93&    196.51&   15.87&  25.77\\
0.8  &2.5&  196.84&  15.71&   25.57&    195.38&   15.58&  25.38\\
0.8  &3.0&  196.01&  15.46&   25.22&    194.20&   15.30&  24.98\\
0.8  &3.5&  195.14&  15.21&   24.87&    193.04&   15.02&  24.59\\
0.8  &4.0&  194.36&  14.95&   24.53&    191.87&   14.73&  24.19\\
0.8  &4.5&  193.45&  14.70&   24.17&    190.71&   14.44&  23.79\\
0.8  &5.0&  192.61&  14.44&   23.82&    189.55&   14.15&  23.39\\
0.8  &5.5&  191.74&  14.18&   23.47&    188.37&   13.85&  22.98\\
0.8  &6.0&  190.87&  13.92&   23.11&    187.20&   13.56&  22.57\\
0.8  &6.5&  189.99&  13.66&   22.75&    185.98&   13.26&  22.16\\
0.8  &7.0&  189.12&  13.39&   22.38&    184.85&   12.96&  21.75\\
0.8  &7.5&  188.22&  13.13&   22.02&    183.63&   12.65&  21.35\\
0.8  &8.0&  187.33&  12.86&   21.65&    182.44&   12.35&  20.90\\
0.8  &8.5&  186.43&  12.59&   21.28&    181.21&   12.03&  20.47\\
0.8  &9.0&  185.48&  12.31&   20.90&    179.96&   11.72&  20.04\\
0.8  &9.5&  184.86&  12.04&   20.53&    178.69&   11.39&  19.60\\
0.8 &10.0&  183.59&  11.76&   20.15&    177.33&   11.06&  19.15\\
0.8 &10.5&  182.62&  11.47&   19.76&    176.09&   10.74&  18.70\\
0.8 &11.0&  181.61&  11.18&   19.37&    174.78&   10.40&  18.25\\
0.8 &11.5&  180.62&  10.90&   18.98&    173.61&   10.07&  17.81\\
0.8 &12.0&  179.59&  10.60&   18.58&    172.05&    9.72&  17.33\\
0.8 &12.5&  178.42&  10.30&   18.18&    170.68&    9.38&  16.86\\
0.8 &13.0&  177.44&  10.00&   17.78&    169.34&    9.03&  16.39\\
0.9  &0.5&  180.73&  15.90&   25.64&    180.44&   15.87&  25.60\\
0.9  &1.0&  179.20&  15.50&   25.08&    178.59&   15.44&  25.00\\
0.9  &1.5&  177.86&  15.13&   24.58&    176.93&   15.04&  24.44\\
0.9  &2.0&  176.61&  14.77&   24.08&    175.32&   14.65&  23.90\\
0.9  &2.5&  175.31&  14.41&   23.58&    173.69&   14.25&  23.34\\
0.9  &3.0&  174.07&  14.05&   23.08&    172.03&   13.85&  22.78\\
0.9  &3.5&  172.75&  13.68&   22.57&    170.44&   13.44&  22.22\\
0.9  &4.0&  171.41&  13.30&   22.05&    168.80&   13.03&  21.65\\
0.9  &4.5&  170.11&  12.92&   21.53&    167.09&   12.60&  21.06\\
0.9  &5.0&  168.69&  12.53&   21.00&    165.38&   12.17&  20.47\\
0.9  &5.5&  167.25&  12.14&   20.45&    163.60&   11.74&  19.87\\
0.9  &6.0&  165.79&  11.74&   19.91&    161.80&   11.29&  19.26\\
0.9  &6.5&  164.31&  11.33&   19.35&    159.95&   10.85&  18.64\\
0.9  &7.0&  162.76&  10.92&   18.79&    158.06&   10.39&  18.01\\
0.9  &7.5&  161.15&  10.51&   18.22&    156.11&    9.93&  17.37\\
0.9  &8.0&  159.54&  10.09&   17.64&    154.10&    9.46&  16.72\\
0.9  &8.5&  157.81&   9.66&   17.05&    151.94&    8.99&  16.06\\
0.9  &9.0&  156.06&   9.23&   16.45&    149.94&    8.52&  15.40\\
0.9  &9.5&  154.25&   8.79&   15.84&    147.82&    8.04&  14.73\\
0.9 &10.0&  152.40&   8.36&   15.23&    145.55&    7.56&  14.04\\
0.9 &10.5&  150.45&   7.91&   14.60&    143.25&    7.08&  13.35\\
0.9 &11.0&  148.43&   7.47&   13.97&    140.86&    6.61&  12.65\\
0.9 &11.5&  146.41&   7.03&   13.33&    138.38&    6.13&  11.94\\
0.9 &12.0&  142.71&   6.54&   12.60&    135.78&    5.66&  11.23\\
0.9 &12.5&  141.87&   6.14&   12.02&    133.15&    5.21&  10.51\\
0.9 &13.0&  139.56&   5.70&   11.36&    130.35&    4.77&   9.80\\
1.0  &0.5&  161.64&  14.86&   24.02&    161.29&   14.83&  23.97\\
1.0  &1.0&  159.61&  14.36&   23.32&    158.88&   14.28&  23.21\\
1.0  &1.5&  157.71&  13.86&   22.62&    156.60&   13.74&  22.46\\
1.0  &2.0&  155.73&  13.35&   21.92&    154.26&   13.19&  21.69\\
1.0  &2.5&  153.74&  12.83&   21.20&    151.92&   12.63&  20.91\\
1.0  &3.0&  151.69&  12.30&   20.47&    149.50&   12.06&  20.11\\
1.0  &3.5&  149.56&  11.76&   19.71&    147.15&   11.48&  19.30\\
1.0  &4.0&  147.34&  11.21&   18.95&    144.46&   10.88&  18.46\\
1.0  &4.5&  145.02&  10.65&   18.16&    141.80&   10.28&  17.61\\
\hline
1.0  &5.0&  142.69&  10.09&   17.37&    139.10&    9.68&  16.75\\
1.0  &5.5&  140.25&   9.53&   16.56&    136.28&    9.07&  15.87\\
1.0  &6.0&  137.81&   8.96&   15.74&    132.94&    8.44&  14.93\\
1.0  &6.5&  134.99&   8.38&   14.88&    130.25&    7.84&  14.04\\
1.0  &7.0&  132.22&   7.80&   14.02&    127.23&    7.25&  13.14\\
1.0  &7.5&  129.30&   7.23&   13.15&    123.97&    6.66&  12.20\\
1.0  &8.0&  126.26&   6.67&   12.26&    120.63&    6.09&  11.27\\
1.0  &8.5&  123.06&   6.13&   11.37&    117.06&    5.38&  10.34\\
1.0  &9.0&  119.62&   5.43&   10.48&    113.56&    4.26&   9.41\\
1.0  &9.5&  116.42&   4.46&    9.60&    110.14&    3.61&   8.45\\
1.1  &0.5&  142.72&  13.65&   22.17&    142.38&   13.61&  22.12\\
1.1  &1.0&  137.66&  12.81&   20.97&    139.20&   12.89&  21.10\\
1.1  &1.5&  137.07&  12.29&   20.26&    136.11&   12.17&  20.08\\
1.1  &2.0&  134.24&  11.60&   19.28&    132.74&   11.42&  19.01\\
1.1  &2.5&  131.20&  10.89&   18.26&    129.35&   10.67&  17.93\\
1.1  &3.0&  128.15&  10.18&   17.23&    125.88&    9.91&  16.82\\
1.1  &3.5&  124.84&   9.45&   16.16&    122.62&    9.17&  15.72\\
1.1  &4.0&  121.44&   8.73&   15.07&    118.52&    8.39&  14.53\\
1.1  &4.5&  117.85&   8.02&   13.95&    114.67&    7.65&  13.36\\
1.1  &5.0&  114.20&   7.32&   12.82&    110.74&    6.94&  12.17\\
1.1  &5.5&  110.38&   6.66&   11.68&    106.64&    5.88&  10.69\\
1.1  &6.0&  106.60&   5.43&   10.19&    102.69&    5.06&   9.13\\
1.2  &0.5&  124.79&  12.28&   20.14&    124.36&   12.22&  20.07\\
1.2  &1.0&  121.15&  11.41&   18.90&    120.22&   11.30&  18.73\\
1.2  &1.5&  117.33&  10.53&   17.61&    116.06&   10.37&  17.37\\
1.2  &2.0&  113.39&   9.65&   16.28&    111.76&    9.45&  15.98\\
1.2  &2.5&  109.32&   8.79&   14.92&    107.23&    8.42&  14.55\\
1.2  &3.0&  105.10&   7.93&   13.28&    102.81&    7.58&  12.89\\
1.2  &3.5&  100.74&   7.05&   11.86&     98.33&    6.28&  11.49\\
1.2  &4.0&   96.53&   5.50&   10.58&     93.66&    5.96&  10.04\\
1.2  &4.5&   92.18&   4.78&    8.92&     89.24&    3.99&   8.62\\
1.2  &5.0&   86.36&   3.89&    7.08&     84.39&    3.52&   6.98\\
 \hline
\end{tabular}
\end{table}