\begin{table}%t1
%\centering
\par
\caption{\label{param_lc}Comparison between best-fit values of this work and parameters from \citet{2008MNRAS.386.1644S} for transit light curve models of TrES-1 (upper values) and TrES-2 (lower values).}
\small \begin{tabular}{ccc}
\hline\hline
 Parameter & This work &  \citet{2008MNRAS.386.1644S}  \\
\hline
TrES-1 \\
$k$ & 0.1350 & $0.1381 \pm 0.0014$\\
$rr$ & 0.1104 & $0.1097 \pm 0.0022$\\
$i$ [$^\circ$] & 88.67 & $88.67 \pm 0.71$\\
\hline
TrES-2\\
$k$ & 0.1260 & $0.1268 \pm 0.0032$ \\
$rr$ & 0.1462 & $0.1460 \pm 0.0042$ \\
$i$ [$^\circ$] & 83.70  & $83.71 \pm 0.42$ \\
\hline
\end{tabular}
\end{table}