\begin{table}%ta.5 online
%%\centering
\par
\caption{\label{mkn5lineas}Dereddened line intensity ratios with respect to $I$(\Hb)=100 for knots analyzed in Mkn~5. Region A was observed using three slit positions with a PA of 0$^{\circ}$ (INT-1), 349$^{\circ}$~=~$-$11$^{\circ}$ (INT-2), and 354$^{\circ}$~=~$-$6$^{\circ}$ (WHT).}
%\centerline
{\small  \begin{tabular}{l  r  rrrr}
  \noalign{\smallskip}
  \hline\hline
   \noalign{\smallskip}
Line   & $f(\lambda)$&  A-INT-1   & A-INT-2  &  A-WHT  & B  \\
\noalign{\smallskip}
 \tableline
\noalign{\smallskip}
 3666.10   H	I &  0.267 &  1.99 $\pm$ 0.71   &     \nodata   &	  \nodata &   \nodata\\
 3697.15   H	I &  0.262 &	   1.16:   &	    \nodata   &           \nodata &\nodata   \\
 3705.04  He	I &  0.260 &	   1.65:   &	    \nodata   &           \nodata & \nodata  \\
 3711.97   H	I &  0.259 &	    \nodata   &  $2.03 \pm 0.76$   &	  \nodata &  \nodata \\
 3728.00  [O  II] &  0.256 &   $191 \pm 12$   & $213 \pm 12$   &  \nodata &  252: \\
 3750.15   H	I &  0.253 &  $1.79 \pm 0.68$   &     \nodata   &	  \nodata &  \nodata \\
 3770.63   H	I &  0.249 &	    \nodata   &  $2.47 \pm 0.79$   &	  \nodata &  \nodata \\
 3797.90   H	I &  0.244 &	    \nodata   &       1.54:   &           \nodata &  \nodata \\
 3819.61  He	I &  0.240 &	    \nodata   &       0.65:   &           \nodata &  \nodata \\
 3835.39   H	I &  0.237 &   7.4  $\pm$  1.7   &   5.6  $\pm$  1.3   &	  \nodata &   \nodata\\
 3868.75 [Ne III] &  0.230 &  23.1 $\pm$ 3.3   &  31.0~$\pm$~2.4   &	  \nodata &  \nodata \\
 3889.05   H	I &  0.226 &  13.6~$\pm$~2.9   &  17.7~$\pm$~2.1   &	  \nodata &  \nodata \\
 3967.46 [Ne III] &  0.210 &  18.7~$\pm$~1.9   &  21.3~$\pm$~1.8   &	  \nodata &  \nodata \\
 4026.21  He	I &  0.198 &	    \nodata   &       1.55:   &           \nodata &  \nodata \\
 4068.60  [S  II] &  0.189 &  2.24~$\pm$~0.70   & 2.29~$\pm$~0.76   &	  \nodata &  \nodata \\
 4101.74   H	I &  0.182 &  26.0~$\pm$~2.8   &  26.8~$\pm$~2.1   &	  \nodata &  \nodata \\
 4168.97  He	I &  0.167 &	    \nodata   &       1.06:   &           \nodata &  \nodata \\
 4340.47   H	I &  0.127 &  47.0~$\pm$~3.2   &  47.0~$\pm$~3.1    &    47.0~$\pm$~2.8 &  \nodata \\
 4363.21  [O III] &  0.121 &  5.14~$\pm$~0.91   &  5.29~$\pm$~0.93   &  4.93~$\pm$~0.74 &  \nodata \\
 4387.93  He	I &  0.115 &	    \nodata   &       0.56:   &     1.32~$\pm$~0.40 &  \nodata \\
 4416.27 [Fe  II] &  0.109 &	    \nodata   &        \nodata   &	    0.38: &   \nodata\\
 4471.48  He	I &  0.095 &  4.43~$\pm$~0.85   &  3.96~$\pm$~0.84   &  4.16~$\pm$~0.60 &   \nodata\\
 4658.10 [Fe III] &  0.050 &	    \nodata   &       1.10:   &             0.72: &   \nodata\\
 4686.00  He   II &  0.043 &  0.92~$\pm$~0.19   &       1.01:   &             0.82: &   \nodata\\
 4711.37 [Ar  IV] &  0.037 &	    \nodata   &       0.59:   &           \nodata &   \nodata\\
 4713.14  He	I &  0.037 &	    \nodata   &        \nodata   &	    0.28: &  \nodata \\
 4740.16 [Ar  IV] &  0.030 &	    \nodata   &        \nodata   &	    0.31: &  \nodata \\
 4861.33   H	I &  0.000 & 100.0~$\pm$~6.3   & 100.0~$\pm$~5.7   &    100.0~$\pm$~5.2 & 100:  \\
 4921.93  He	I & --0.015 &	    \nodata   &       1.70:   &     0.95~$\pm$~0.36 &  \nodata \\
 4958.91  [O III] & --0.024 & 144.1~$\pm$~8.5   & 144.7~$\pm$~7.8   &    133.8~$\pm$~7.2 & 70.43:  \\
 4985.90 [Fe III] & --0.031 &  2.33~$\pm$~0.65   &       2.02:   &             2.20: &  \nodata \\
 5006.84  [O III] & --0.036 &   423~$\pm$~22   &	430~$\pm$~21   &         374~$\pm$~19 & 214~$\pm$~69  \\
 5015.68  He	I & --0.038 &	    \nodata   &        \nodata   &  2.13~$\pm$~0.62 &  \nodata \\
 5197.90  [N   I] & --0.082 &	    \nodata   &       0.46:   &           \nodata &  \nodata \\
 5875.64  He	I & --0.215 &  8.46~$\pm$~0.83   &  8.41~$\pm$~0.88   &   11.0~$\pm$~1.0 &  \nodata \\
 6300.30  [O   I] & --0.282 &  5.12~$\pm$~0.68   &  4.57~$\pm$~0.66   &  4.05~$\pm$~0.58 &  \nodata \\
 6312.10  [S III] & --0.283 &  2.31~$\pm$~0.55   &  1.92~$\pm$~0.43   &  1.79~$\pm$~0.47 &  \nodata \\
 6363.78  [O   I] & --0.291 &  1.90~$\pm$~0.51   &       1.52:   &     1.19~$\pm$~0.38 &  \nodata \\
 6548.03  [N  II] & --0.318 &  4.56~$\pm$~0.56   &  5.25~$\pm$~0.69   &  5.49~$\pm$~0.63 &  \nodata \\
 6562.82   H	I & --0.320 &   283~$\pm$~16   &	284~$\pm$~15   &         284~$\pm$~14 & 284~$\pm$~85\\
 6583.41  [N  II] & --0.323 &  14.7~$\pm$~1.2   &  14.0~$\pm$~1.1   &     14.9~$\pm$~1.1 & 10.13:  \\
 6678.15  He	I & --0.336 &  3.43~$\pm$~0.63   &  3.49~$\pm$~0.66   &  3.05~$\pm$~0.51 &  \nodata \\
 6716.47  [S  II] & --0.342 &  21.5~$\pm$~1.5   &  22.2~$\pm$~1.7   &     24.3~$\pm$~1.5 &  67.4: \\
 6730.85  [S  II] & --0.344 &  15.6~$\pm$~1.2   &  16.0~$\pm$~1.4   &     18.1~$\pm$~1.2 &  51.6:\\
 7065.28  He	I & --0.387 &  2.13~$\pm$~0.50   &  2.40~$\pm$~0.64   &  2.17~$\pm$~0.45 &  \nodata \\
 7135.78 [Ar III] & --0.396 &  8.49~$\pm$~0.61   &  8.56~$\pm$~0.97   &  7.70~$\pm$~0.52 &  \nodata \\
 7281.35  He	I & --0.414 &	    \nodata   &        \nodata   &	    0.41: &   \nodata\\
 7318.39  [O  II] & --0.418 &	    \nodata   &    2.87:         &  3.62~$\pm$~0.54 & \nodata \\
 7329.66  [O  II] & --0.420 &	    \nodata   &    2.57:         &  2.74~$\pm$~0.44 &  \nodata \\
 7751.10 [Ar III] & --0.467 &	    \nodata   &        \nodata   &  1.64~$\pm$~0.38 &  \nodata \\
\noalign{\smallskip}
 \tableline
 \noalign{\smallskip}
Aperture size (arcsec)  &  &  $14.4 \times 1$  &  $16 \times 1$  &   $3.6 \times 1$ & $6 \times 1$ \\
Distance$^b$ (arcsec)   &   &       0             &     0               &  0                  &  16  \\
$F$(\Hb)$^a$          &        &  17.66  $\pm$  0.73 &   18.13  $\pm$  0.69 &   10.83  $\pm$  0.40 &    0.35  $\pm$  0.08\\ 
$C$(\Hb)              &        &   0.36  $\pm$  0.02 &    0.17  $\pm$    0.02 &    0.03  $\pm$    0.02 &    0.30  $\pm$    0.06\\
$W_{\rm abs}$ (\AA)     &        &    1.1  $\pm$     0.2 &     0.8  $\pm$    0.2  &    0                 &     1.5  $\pm$    0.5 \\ 
\noalign{\smallskip}
$-W$(\Ha) (\AA)     &        &      449  $\pm$ 	26 &       435  $\pm$    23 &	678  $\pm$      35 &     43  $\pm$     12\\ 
$-W$(\Hb) (\AA)     &        &       75  $\pm$ 	 5 &        80  $\pm$ 	5 &	135  $\pm$       7 &    10: \\ 
$-W$(H$\gamma$) (\AA)&       &       43  $\pm$ 	 3 &        34  $\pm$ 	2 &	 44  $\pm$       3 &     \nodata \\ 
%$-W$([O II]) (\AA)  &        &      124  $\pm$ 	 8 &       168  $\pm$    10 &	  \nodata	 &     \nodata \\ 
%$-W$([O III]) 4959 (\AA)&    &      112  $\pm$ 	 7 &       122  $\pm$ 	7 &	176  $\pm$      10 &    13:\\ 
$-W$([O III]) 5007 (\AA)&    &      320  $\pm$ 	17 &       360  $\pm$    18 &	530  $\pm$      28 &    33  $\pm$   11\\ 
\noalign{\smallskip}
\hline
\end{tabular}}
\medskip
$^a$ In units of 10$^{-15}$~erg~s$^{-1}$~cm$^{-2}$ and not corrected for extinction; $^b$~relative distance with respect to the center of Mkn~5.
  \end{table}