\begin{table}%t3
\par
\caption {\label{table:tab2}Flux parameters for extended-source point-lens model with Parallax and Xallarap (solar mass companion).}
%\centerline
 {
\begin{tabular}{l c c c c}
\hline
\hline
\textsc{\small{Observatory}} & \small{$F_{\rm s}$} & \small{$\sigma_{F_{\rm s}}$} & \small{$F_{\rm b}$} & \small{$\sigma_{F_{\rm b}}$} \\
%\\
\hline
%\\
OGLE \textit{I} & 0.96 & 0.01 & 0.28 & 0.01 \\
MOA \textit{I} & 0.96 & 0.01 & 0.29 & 0.01 \\
$\mu$FUN \textit{R} New-Zealand (Auckland) & 1.08 & 0.01 & 3.06 & 0.05 \\
$\mu$FUN \textit{R} New-Zealand (Farm Cove) & 0.91 & 0.009 & --27.0 & 0.2 \\
$\mu$FUN \textit{I} Arizona (MDM) & 0.99 & 0.17 & 242.3 & 75.0 \\
$\mu$FUN \textit{R} South Africa (Bronberg) & 0.232 & 0.002 & 0.28 & 0.04 \\
$\mu$FUN \textit{I} Chile (CTIO SMARTS) & 6.24 & 0.06 & --3.9 & 0.2 \\
$\mu$FUN \textit{I} Arizona (Mt Lemmon) & 3.94 & 0.04 & 21.8 & 0.1 \\
PLANET \textit{I} South Africa (SAAO) & 5.60 & 0.05 & --1.9 & 1.6 \\
PLANET \textit{I} Australia, Tasmania (UTas) & 2.74 & 0.03 & 163.8 & 1.2 \\
PLANET \textit{I} Chile (Danish) & 14.45 & 0.15 & 13.0 & 0.4 \\
PLANET \textit{I} Australia (Perth) & 0.793 & 0.008 & 6.5 & 0.1 \\
PLANET \textit{I} South Africa (Boyden) & 9.59 & 0.09 & 447.3 & 0.6 \\
Robonet \textit{R} Faulkes North (Hawaii) & 0.115 & 0.001 & --0.26 & 0.02 \\
Robonet \textit{R} Faulkes South (Australia) & 0.129 & 0.001 & --0.229 & 0.009 \\
Robonet \textit{R} Liverpool (Canaries Island) & 2.75 & 0.03 & 17.7 & 0.3\\
\hline
\end{tabular}}
\par
\smallskip
 {Note}: source flux and blending for telescopes that observed OGLE 07-BLG-050. The given values corresponds to the model with parallax and xallarap, in a case of a solar mass companion for the source. They do not change significantly for the other models.
\end{table}