\begin{table}%t1     
%\centering
\par
\caption{\label{tab4} Parameters of the magnetic configurations with 4 sources.}            
\begin{tabular}{c c c c}       
\hline\hline               
Polarity & Parameter & D96 ($\psi = 30^\circ$) & A05 ($\psi = 150^\circ$) \\  
\hline                     
\par
	   & $x_{1}$ & 0.5  & 0.5 \\
	P1 & $y_{1}$ & 0    & 0   \\
	   & $z_{1}$ & --0.1 & --0.2 \\
	   & $F_{1}$ & 1	  & 1    \\  
\hline     % inserting body of the table
	   & $x_{2}$ & --0.5  & --0.5  \\
   	N1 & $y_{2}$ & 0     & 0     \\
	   & $z_{2}$ & --0.1  & --0.2  \\
	   & $F_{2}$ & --1    & --1    \\
\hline   
	   & $x_{3}$ & 0.0866  & --0.0866  \\
   	P2 & $y_{3}$ & 0.05  &  0.05  \\
	   & $z_{3}$ & --0.1  & --0.1  \\
	   & $F_{3}$ & 0.4   &  0.4  \\
\hline   
	   & $x_{4}$ & --0.0866  & 0.0866  \\
   	N2 & $y_{4}$ & --0.05  & --0.05  \\
	   & $z_{4}$ & --0.1   & --0.1  \\
	   & $F_{4}$ & --0.4   & --0.4  \\
\hline                       
\end{tabular}
\end{table}