\begin{table}%t4
\par
\caption{\label{tab:measured_lambda}List of measured wavelengths.}
%\centerline
 {\footnotesize\begin{tabular}[c]{@{}lcl@{}}
\hline\hline
\noalign{\smallskip} 
$\lambda_{\rm meas}$(\AA) & $\lambda_{\rm lit}$(\AA) & ID \\
\noalign{\smallskip}\hline\noalign{\smallskip}                                   %inserts single line
185.214 & 185.213   &    Fe VIII (bl oc Ni XVI 185.23) \\
186.607 &  186.601   &    Fe VIII (bl oc Ca XIV 186.61)  \\
187.243  &  187.237  &     Fe VIII  \\
191.585  & 191.570   &    Mn IX   \\
192.000  & 192.004   & ? Fe VIII (bl oc Fe XI Fe XXIV)  \\
192.087  &  --      &      u (VIII-IX)   \\
193.972  & 193.967  &     Fe VIII  \\
194.658  & 194.662  &     Fe VIII  \\
%194.778   &  -      &    u (IX)  \\
195.969  & ? 195.972  &     Fe VIII (bl)   \\
196.649  &  196.650   &    Fe VIII  (bl oc Fe XII)   \\
197.364  & 197.362  &     Fe VIII (bl)  \\
204.704   &  --     &       Fe VIII (bl oc Fe XVII)  \\ % \ion{Fe}{xvii}
205.04   & 205.040   &    Cr VIII  \\
205.708   & 205.720  &     Cr VIII  \\
206.761   &  --      &      Fe VII   \\
207.124  &  --      &     Fe VIII   \\
207.203  &  --       &     u  (VI?) \\
207.725  &  --     &       u (VI?)  \\
\noalign{\smallskip}      
217.71 & 217.691 &      Fe VIII  \\
218.57 & 218.564 &      Fe VIII  \\
222.19  & -- &       Fe VIII  \\
224.28  & 224.305  &      Fe VIII  \\
225.40  &  --  &      Fe VIII  \\
227.29   & -- &       Fe VIII  \\
231.03  & 231.097 &      Fe VIII  \\
231.81 & 231.884  &      Fe VIII  \\
\noalign{\smallskip}      
246.011   &   246.004  &     Si VI (bl)   \\
249.135  &  249.124  &     Si VI (bl oc Ni XVII)   \\
253.520  &  --       &      ? Fe VII  \\
253.956  &  --    &         Fe VIII (bl oc S X)  \\
254.059  &  --     &         Fe VII \\
255.110  &  --    &        Fe VIII  (bl oc S X, Fe XXIV)  \\
255.346  & --     &      Fe VIII  \\
255.684   & --     &      Fe VIII  \\
268.996  &  268.991  &     Mg VI   \\
270.401   &  270.391  &     Mg VI     \\
272.661    &    272.639  &     Si VII (bl)  \\
275.370   &   275.353  &     Si VII    \\
275.686    &    275.667  &     Si VII (bl)   \\
276.145    & 276.153   &    Mg VII     \\ % ??
280.732   &  280.737   &    Mg VII   \\
\noalign{\smallskip} \hline                                   %inserts single line
\end{tabular}}
\par
\smallskip
Note: $\lambda_{\rm meas}$(\AA)  are the measured wavelengths for \ion{Fe}{viii}~lines and a selection of lines from ions formed at 
similar temperatures. Results are 
from the Hinode EIS spectrum of the ``foreground-subtracted''
 Sunspot loop leg and from 
the laboratory spectrum.  Uncertainties are 
estimated to be about 0.01~\AA. In the second column 
wavelengths from the literature ($\lambda_{\rm lit}$) are listed.
A few of the main lines which are potentially blending (bl) are 
also noted.
Some of the unidentified (u) TR lines are listed, together with the
Fe ionization stage which more closely resembles their 
morphology. oc: blended
in other plasma conditions.   
\end{table}