\begin{table}%T3
\caption{\label{errors}Li~abundance errors associated with the uncertainties in stellar parameters.}
\small%\centering
\par
\begin{tabular}{c c c c c c c c c}
\hline
\hline
$T$ & \multicolumn{2}{c}{$\Delta T$} & \multicolumn{2}{c}{$\Delta \log g$} & \multicolumn{2}{c}{$\Delta v_{\rm t}$} & \multicolumn{2}{c}{$\Delta [$Fe/H]} \\ 
(K) & $-$200~K &+200~K& $-$0.3~dex & +0.3~dex & $-$0.2~km~s$^{-1}$ & +0.2~km~s$^{-1}$ & $-$0.2~dex & +0.2~dex\\
\hline
4200 & $-$0.15 & 0.20  & $-$0.01 & 0.02 & 0.00 & 0.00 &  0.15 & $-$0.14\\
4650 & $-$0.20 & 0.20  & $-$0.01 & 0.01 & 0.00 & 0.00 &  0.20 & $-$0.16\\
4950 & $-$0.25 & 0.25  & $-$0.01 & 0.01 & 0.00 & 0.00 &  0.23 & $-$0.25\\
\hline
\end{tabular} 
\end{table}