\begin{table}%t5
\caption{\label{tbl_VLSamplesProperties1_EB}The same of Table~\ref{tbl_VLSamplesProperties1} but for VL~samples with $E{+}K$-corrections and without (see~text for details).}
%\centering
\small
\begin{tabular}{ccccc}
  \hline\hline \noalign{\smallskip}
  VL sample & $R_{\rm min}$ (Mpc/h)& $R_{\rm max}$ (Mpc/h)& $M_{\rm min}$ 
& $M_{\rm max}$ \\
  \hline
    VL1    & 50  & 200 & --18.8 & --21.0   \\
    VL2    & 100 & 300 & --19.7 & --22.0   \\
    VL3    & 125 & 400 & --20.4 & --22.2   \\
    VL4    & 150 & 500 & --20.9 & --22.4   \\
    VL5    & 200 & 600 & --21.4 & --22.6   \\
   \hline
\end{tabular}
\end{table}