\begin{table}%t2
\caption{\label{tbl_VLSamplesProperties1}Main properties of the obtained VL~samples with \mbox{$K$-corrections} and without $E$-corrections.}
%\centering
\small
\begin{tabular}{ccccc}
  \hline\hline \noalign{\smallskip}
  VL sample & $R_{\rm min}$ (Mpc/h)& $R_{\rm max}$ (Mpc/h)& $M_{\rm min}$ 
& $M_{max}$ \\
  \hline
    VL1    & 50  & 200 & --18.9 & --21.1   \\
    VL2    & 100 & 300 & --19.9 & --22.0   \\
    VL3    & 125 & 400 & --20.5 & --22.2   \\
    VL4    & 150 & 500 & --21.1 & --22.4   \\
    VL5    & 200 & 600 & --21.6 & --22.8   \\
   \hline
\end{tabular}
\end{table}