\begin{table}%t4
\caption {\label{tab:photJ0929}Results of PSF-photometry of XTE J0929$-$314.}
%\centerline
 {\begin{tabular}{ccccc}
\hline\hline
Filter &${\lambda}_{\rm c}$&  Mean magnitude &  $A_{\lambda}$  &   Absolute mag   \\ 
       &   (\AA)     &  	       &     (mag)	 &	            \\ 
\hline
$V$    &  5270       & $28.2 \pm 0.4$& $0.46 \pm 0.02$   & $13.2 \pm 0.4$   \\
$R$    &  6440       & $27.1 \pm 0.3$& $0.36 \pm 0.02$   & $12.3 \pm 0.3$   \\
$I$    &  7980       & $26.9 \pm 0.4$& $0.28 \pm 0.02$   & $12.1 \pm 0.4$   \\
\hline
\end{tabular}}
\par
\smallskip
Values in column three are uncorrected for reddening. In column four we list the 
reddening parameters used to correct our optical photometry computed assuming $E(B-V)=0.15 \pm 0.02$~mag. The absolute magnitudes are 
computed assuming a distance of 8~kpc (Wijnands et~al. 2005; see Sect.~4.1.1 for details).
\end{table}