\begin{table}%t2
\caption {\label{tab:phot}Results of photometry of XTE~J1814$-$338.} 
%\centerline
 {\begin{tabular}{ccccc}
\hline\hline
Filter &${\lambda}_{\rm c}$&  Mean magnitude   &   Semiamplitude  &  $A_{\lambda}$  \\ 
       &   (\AA)     &  		 &	 (mag)      &	  (mag)       \\ 
\hline
$V$    &  5270       & $23.29 \pm 0.04$  & $0.52 \pm 0.08$  & $0.87 \pm 0.03$ \\
$R$    &  6440       & $22.52 \pm 0.03$  & $0.32 \pm 0.08$  & $0.68 \pm 0.03$ \\
\hline
\end{tabular}}
\par
\smallskip
All the values are uncorrected for reddening. In column five are reported the 
reddening parameters used to correct our optical photometry, computed assuming $E(B-V)=0.29 \pm 0.03$~mag 
(see Sect.~3.3 for details). 
\end{table}