\begin{table}%t3
%\centering
\par
\caption{\label{Table3}NEATM Best Fit Models to previously published data assuming a fixed value of $\eta = 1.39$ obtained in this paper, and this $\eta \pm 1-\sigma$ values in order to derive a possible range.}
\small \begin{tabular}{c c c  c c c c c c c}
\hline\hline\noalign{\smallskip}
Data  &$CWL$ & Flux &$\alpha$($^{\circ}$) & $\eta = 1.39$ & & $\eta = 1.13$ & & $\eta = 1.65$ &  \\ 
&($\mu$m) &(mJy) & $\deg$ &$D$ (km) & $p_V$ & $D$ (km)  & $p_V$  & $D$ (km)  & $p_V$   \\
\hline
Campins et~al. & 10.6 &93 $\pm$ 24 &16.0 & 3.51  $\pm$  0.45  & 0.057  $\pm$  0.021 & 3.09  $\pm$  0.39  
& 0.074  $\pm$  0.027 & 3.93  $\pm$  0.39  & 0.046  $\pm$  0.027 \\  
Reach et~al. &23.68 &3.8 $\pm$ 0.2&17.6 & 3.38  $\pm$  0.09 & 0.062  $\pm$  0.003 & 3.11  $\pm$  0.08 
& 0.074  $\pm$  0.004 & 3.64  $\pm$  0.10 & 0.05 $\pm$   0.003 \\  
Kraemer et~al.  &8.432 &63 $\pm$ 7 &51.0 & 3.50 $\pm$ 0.17  &0.058 $\pm$ 0.007  & 3.07 $\pm$ 0.17  
&0.075 $\pm$ 0.009  & 3.91 $\pm$ 0.22  &0.046 $\pm$ 0.005 \\
\hline
\end{tabular}
\end{table}