\begin{table}%t4
%\centering
\par
\caption{\label{tab_onlymips}Sources detected only in the MIPS 24~\micron\ band.}
\small \begin{tabular}{lllr}
\hline \hline
Source & $\alpha_{2000}$ & $\delta_{2000}$ & $F_{24}$\\
L1630& & & mJy\\
\hline
MIPS-1  &  5:40:51.48 &  --2:28:48.5 &       $2.9 \pm 0.2$ \\ 
MIPS-2  &  5:40:51.57 &  --2:27:49.2 &       $6.0 \pm 0.2$ \\ 
MIPS-3  &  5:40:51.84 &  --2:25:53.5 &       $2.7 \pm 0.2$ \\ 
MIPS-4  &  5:41:16.64 &  --2:23:58.8 &      $34.7 \pm 0.2$ \\ 
MIPS-5  &  5:41:25.02 &  --2:18:15.3 &       $2.0 \pm 0.2$ \\ 
MIPS-6  &  5:41:26.35 &  --2:18:21.1 &      $11.2 \pm 0.2$ \\ 
MIPS-7  &  5:41:37.03 &  --2:18:17.8 &      $44.1 \pm 0.2$ \\ 
MIPS-8  &  5:41:43.75 &  --2:16:46.8 &      $37.4 \pm 0.2$ \\ 
MIPS-9  &  5:41:44.36 &  --2:17:07.9 &      $55.9 \pm 0.2$ \\ 
MIPS-10  &  5:41:47.20 &  --2:09:40.8 &     $6.0 \pm 0.1$ \\ 
\hline
\end{tabular}
\end{table}