\begin{table}%t5
 \caption{\label{tab:absol}Comparison of some predicted and observed absolute fluxes (units in $10^{-10}$ erg~cm$^{-2}$~s$^{-1}$, except for the 6cm continuum, in Jy).} 
%\centerline
{\begin{tabular}{lrr}
  \hline \hline \noalign{\smallskip}
Line & Observation & Model \\
\noalign{\smallskip} \hline \noalign{\smallskip}
\hbeta/  & 2.7 &  2.56 \\
\forba{O}{ii}{2471} & 0.24 &  0.21 \\
\allom{H}{i}{4.05} & .45 &  0.59 \\
6 cm continuum & 1.73 &  1.96 \\
    \noalign{\smallskip} \hline
  \end{tabular}}
The model \hbeta/ and \forba{O}{ii}{2471} fluxes are reddened using $E_{B-V} =\cmebv$  and $R_{V} = \cmrv$. The observed (reddened) values are taken from \citet{2004AetA...423..593P}.
\end{table}