\begin{table}
%\centering
\par
\caption {\label{tab:spec_cat_full}The GMOS and FORS2 spectroscopic catalog, listing 
the object name (ID), the coordinates in J2000, the redshift, the confidence flag
(0 for a secure redshift and 1 for a possible redshift),
and the total magnitudes and their errors.
The magnitudes are on the AB~system.
The redshift error does not include wavelength calibration error which is
typically $0.2~\rm\AA$.
The magnitude of strongly blended objects is listed with a~--1.}
\begin{tabular}{llllllrlrlrlrlr}
\hline\hline
ID & RA  & Dec.  & Redshift  & Flag & $V$ & $\sigma(V)$ &  $R$ & $\sigma(R)$ & $i$ & $\sigma(i)$ & $z$ & $\sigma(z)$ & $K$ & $\sigma(K)$\\ 
\hline
   GMOS-F1-4 & 12 53 16.63 & --29 17 11.6 & $1.0706^{\rm +0.0001}_{-0.0001}$ & 0 & 25.40 & 0.12 & 25.46 & 0.12 & 25.03 & 0.12 & 24.69 & 0.20 & 24.63 & 0.81\\ \vspace{2pt}
   GMOS-F1-5 & 12 53 17.44 & --29 17 00.8 & $1.0684^{\rm +0.0001}_{-0.0001}$ & 1 & 24.51 & 0.09 & 24.31 & 0.08 & 23.91 & 0.08 & 23.39 & 0.11 & 22.08 & 0.20\\ \vspace{2pt}
   GMOS-F1-6 & 12 53 09.02 & --29 16 47.6 & $1.0976^{\rm +0.0007}_{-0.0010}$ & 1 & 26.37 & 0.47 & 24.44 & 0.10 & 23.54 & 0.07 & 22.70 & 0.07 & 21.03 & 0.10\\ \vspace{2pt}
   GMOS-F1-9 & 12 53 16.03 & --29 16 17.2 & $1.2452^{\rm +0.0003}_{-0.0002}$ & 1 & 24.23 & 0.20 & 23.57 & 0.10 & 22.71 & 0.07 & 21.77 & 0.07 & 19.87 & 0.07\\ \vspace{2pt}
  GMOS-F1-10 & 12 53 15.43 & --29 16 23.7 & $1.2354^{\rm +0.0004}_{-0.0004}$ & 0 & 24.56 & 0.57 & 22.76 & 0.11 & 21.86 & 0.06 & 20.96 & 0.05 & 19.06 & 0.05\\ \vspace{2pt}
  GMOS-F1-11 & 12 53 14.92 & --29 16 13.4 & $1.2368^{\rm +0.0011}_{-0.0013}$ & 0 & 25.34 & 0.30 & 24.07 & 0.10 & 23.09 & 0.07 & 22.19 & 0.06 & 20.17 & 0.07\\ \vspace{2pt}
  GMOS-F1-12 & 12 53 15.96 & --29 16 29.9 & $1.2839^{\rm +0.0008}_{-0.0007}$ & 1 & 25.49 & 0.28 & 24.08 & 0.08 & 23.67 & 0.09 & 22.86 & 0.09 & 20.98 & 0.11\\ \vspace{2pt}
  GMOS-F1-13 & 12 53 15.28 & --29 16 29.8 & $1.0699^{\rm +0.0006}_{-0.0003}$ & 0 & 26.49 & 0.58 & 23.80 & 0.06 & 23.43 & 0.07 & 22.49 & 0.07 & 20.77 & 0.09\\ \vspace{2pt}
  GMOS-F1-14 & 12 53 16.22 & --29 16 38.4 & $1.0698^{\rm +0.0001}_{-0.0001}$ & 0 & 24.22 & 0.10 & 23.55 & 0.06 & 23.01 & 0.05 & 22.52 & 0.07 & 20.98 & 0.11\\ \vspace{2pt}
  GMOS-F1-21 & 12 53 16.41 & --29 15 44.0 & $1.1797^{\rm +0.0004}_{-0.0005}$ & 1 & 23.32 & 0.04 & 23.14 & 0.03 & 23.19 & 0.05 & 23.25 & 0.11 & 22.29 & 0.25\\ \vspace{2pt}
  GMOS-F1-22 & 12 53 12.21 & --29 16 04.5 & $1.2360^{\rm +0.0004}_{-0.0011}$ & 0 & 25.84 & 0.34 & 24.94 & 0.16 & 24.03 & 0.11 & 23.08 & 0.10 & 21.15 & 0.11\\ \vspace{2pt}
  GMOS-F1-23 & 12 53 11.47 & --29 16 06.4 & $0.2504^{\rm +0.0001}_{-0.0001}$ & 0 & 23.69 & 0.10 & 22.66 & 0.04 & 22.12 & 0.04 & 21.61 & 0.05 & 20.22 & 0.08\\ \vspace{2pt}
   GMOS-F2-1 & 12 53 10.03 & --29 19 34.8 & $1.2313^{\rm +0.0011}_{-0.0011}$ & 0 & 24.07 & 0.13 & 23.39 & 0.07 & 22.96 & 0.07 & 22.13 & 0.07 & 20.40 & 0.09\\ \vspace{2pt}
   GMOS-F2-2 & 12 53 13.60 & --29 19 40.1 & $1.2354^{\rm +0.0003}_{-0.0003}$ & 0 & 23.81 & 0.23 & 23.06 & 0.10 & 22.16 & 0.06 & 21.33 & 0.06 & 19.44 & 0.06\\ \vspace{2pt}
   GMOS-F2-3 & 12 53 10.31 & --29 19 37.5 & $1.2350^{\rm +0.0015}_{-0.0008}$ & 0 & 23.35 & 0.18 & 22.61 & 0.08 & 22.03 & 0.06 & 21.23 & 0.06 & 19.32 & 0.06\\ \vspace{2pt}
   GMOS-F2-4 & 12 53 16.17 & --29 19 27.8 & $1.2367^{\rm +0.0013}_{-0.0020}$ & 0 & --1.00 & --1.00 & --1.00 & --1.00 & --1.00 & --1.00 & --1.00 & --1.00 & --1.00 & --1.00\\ \vspace{2pt}
   GMOS-F2-5 & 12 53 08.49 & --29 19 58.2 & $1.2262^{\rm +0.0014}_{-0.0006}$ & 0 & 24.86 & 0.17 & 24.21 & 0.10 & 23.93 & 0.12 & 22.75 & 0.09 & 20.87 & 0.10\\ \vspace{2pt}
   GMOS-F2-6 & 12 53 11.64 & --29 19 54.5 & $1.2327^{\rm +0.0014}_{-0.0007}$ & 0 & 23.96 & 0.45 & 22.82 & 0.14 & 22.07 & 0.08 & 21.06 & 0.06 & 19.22 & 0.07\\ \vspace{2pt}
   GMOS-F2-8 & 12 53 08.30 & --29 20 10.5 & $1.2341^{\rm +0.0004}_{-0.0005}$ & 1 & 26.99 & 0.95 & 23.90 & 0.08 & 23.58 & 0.10 & 22.83 & 0.11 & 20.88 & 0.11\\ \vspace{2pt}
   GMOS-F2-9 & 12 53 12.33 & --29 19 47.3 & $0.7294^{\rm +0.0002}_{-0.0002}$ & 1 & 22.62 & 0.02 & 22.59 & 0.02 & 22.58 & 0.03 & 22.55 & 0.07 & 22.38 & 0.28\\ \vspace{2pt}
  GMOS-F2-10 & 12 53 12.64 & --29 20 00.1 & $1.2335^{\rm +0.0003}_{-0.0002}$ & 0 & 23.42 & 0.07 & 22.70 & 0.03 & 22.24 & 0.04 & 21.62 & 0.04 & 20.10 & 0.07\\ \vspace{2pt}
  GMOS-F2-11 & 12 53 07.00 & --29 20 05.4 & $1.2312^{\rm +0.0002}_{-0.0004}$ & 1 & 25.13 & 0.23 & 24.55 & 0.14 & 23.82 & 0.12 & 22.80 & 0.10 & 21.14 & 0.13\\ \vspace{2pt}
  GMOS-F2-12 & 12 53 15.98 & --29 20 26.5 & $0.6696^{\rm +0.0002}_{-0.0001}$ & 0 & 22.29 & 0.05 & 21.39 & 0.02 & 20.80 & 0.02 & 20.43 & 0.02 & 19.00 & 0.04\\ \vspace{2pt}
  GMOS-F2-14 & 12 53 15.07 & --29 20 22.3 & $1.2977^{\rm +0.0001}_{-0.0001}$ & 1 & --1.00 & --1.00 & --1.00 & --1.00 & --1.00 & --1.00 & --1.00 & --1.00 & --1.00 & --1.00\\ \vspace{2pt}
  GMOS-F2-15 & 12 53 00.55 & --29 21 34.4 & $0.7427^{\rm +0.0004}_{-0.0001}$ & 0 & 22.98 & 0.12 & 21.83 & 0.04 & 20.84 & 0.02 & 20.27 & 0.02 & 18.70 & 0.04\\ \vspace{2pt}
  GMOS-F2-19 & 12 53 04.87 & --29 22 09.9 & $1.2160^{\rm +0.0012}_{-0.0020}$ & 0 & 23.83 & 0.13 & 23.25 & 0.07 & 22.66 & 0.07 & 21.82 & 0.07 & 20.05 & 0.07\\ \vspace{2pt}
  GMOS-F2-20 & 12 53 05.13 & --29 22 20.4 & $1.1764^{\rm +0.0002}_{-0.0002}$ & 0 & 23.99 & 0.15 & 23.33 & 0.08 & 22.57 & 0.06 & 21.64 & 0.06 & 19.86 & 0.06\\ \vspace{2pt}
  GMOS-F2-21 & 12 53 06.67 & --29 22 16.8 & $1.2370^{\rm +0.0008}_{-0.0004}$ & 1 & 24.53 & 0.14 & 24.36 & 0.12 & 23.43 & 0.09 & 22.59 & 0.09 & 20.82 & 0.10\\ \vspace{2pt}
   GMOS-F3-1 & 12 53 52.55 & --29 25 57.5 & $1.0997^{\rm +0.0010}_{-0.0007}$ & 0 & 23.93 & 0.20 & 23.06 & 0.08 & 22.45 & 0.07 & 21.46 & 0.06 & 19.83 & 0.07\\ \vspace{2pt}
   GMOS-F3-2 & 12 53 49.70 & --29 24 35.5 & $1.2336^{\rm +0.0001}_{-0.0001}$ & 0 & 24.25 & 0.17 & 23.74 & 0.10 & 23.16 & 0.10 & 22.25 & 0.09 & 20.64 & 0.11\\ \vspace{2pt}
   GMOS-F3-4 & 12 53 47.32 & --29 23 28.4 & $1.0979^{\rm +0.0003}_{-0.0002}$ & 0 & 23.99 & 0.09 & 23.90 & 0.08 & 23.05 & 0.06 & 22.18 & 0.06 & 20.49 & 0.08\\ \vspace{2pt}
   GMOS-F3-6 & 12 53 46.75 & --29 22 52.4 & $1.0957^{\rm +0.0001}_{-0.0001}$ & 1 & 24.03 & 0.08 & 23.82 & 0.07 & 23.47 & 0.07 & 23.36 & 0.14 & 23.05 & 0.49\\ \vspace{2pt}
   GMOS-F3-7 & 12 53 49.75 & --29 24 27.3 & $0.7497^{\rm +0.0001}_{-0.0001}$ & 0 & 24.80 & 0.14 & 23.66 & 0.05 & 22.70 & 0.03 & 22.22 & 0.05 & 21.19 & 0.12\\ \vspace{2pt}
   GMOS-F3-8 & 12 53 52.15 & --29 25 03.0 & $0.7620^{\rm +0.0003}_{-0.0016}$ & 0 & 24.48 & 0.17 & 23.18 & 0.05 & 22.48 & 0.05 & 22.00 & 0.06 & 21.13 & 0.14\\ \vspace{2pt}
   GMOS-F3-9 & 12 53 46.60 & --29 23 05.9 & $0.9355^{\rm +0.0002}_{-0.0001}$ & 1 & 24.36 & 0.14 & 23.55 & 0.07 & 22.64 & 0.05 & 21.91 & 0.05 & 20.41 & 0.08\\ \vspace{2pt}
  GMOS-F3-10 & 12 53 45.09 & --29 25 04.7 & $1.1529^{\rm +0.0002}_{-0.0001}$ & 1 & 25.80 & 0.49 & 23.45 & 0.07 & 22.67 & 0.05 & 21.74 & 0.05 & 20.03 & 0.06\\ \vspace{2pt}
  GMOS-F3-13 & 12 53 42.79 & --29 24 42.6 & $1.2511^{\rm +0.0010}_{-0.0011}$ & 1 & 24.84 & 0.25 & 23.61 & 0.08 & 22.67 & 0.06 & 21.77 & 0.05 & 19.68 & 0.05\\ \vspace{2pt}
  GMOS-F3-14 & 12 53 42.91 & --29 25 20.3 & $1.1782^{\rm +0.0002}_{-0.0003}$ & 0 & 25.84 & 0.32 & 24.54 & 0.11 & 23.69 & 0.08 & 22.81 & 0.08 & 21.19 & 0.11\\ \vspace{2pt}
  GMOS-F3-16 & 12 53 43.92 & --29 25 56.9 & $1.1725^{\rm +0.0010}_{-0.0006}$ & 0 & 23.15 & 1.32 & 22.23 & 0.60 & 21.87 & 0.23 & 21.26 & 0.19 & 20.04 & 0.89\\ \vspace{2pt}
 GMOS-F3-17a & 12 53 44.01 & --29 25 16.8 & $1.1726^{\rm +0.0005}_{-0.0009}$ & 1 & 24.27 & 0.25 & 23.12 & 0.08 & 22.50 & 0.07 & 21.56 & 0.06 & 19.89 & 0.07\\ \vspace{2pt}
 GMOS-F3-17b & 12 53 43.72 & --29 25 19.2 & $1.1773^{\rm +0.0003}_{-0.0001}$ & 1 & 25.30 & 0.25 & 23.90 & 0.08 & 23.01 & 0.05 & 22.04 & 0.05 & 20.22 & 0.07\\ \vspace{2pt}
  GMOS-F3-18 & 12 53 43.39 & --29 25 38.9 & $1.1673^{\rm +0.0009}_{-0.0007}$ & 0 & 24.19 & 0.11 & 23.70 & 0.07 & 23.17 & 0.07 & 22.37 & 0.07 & 20.44 & 0.08\\ \vspace{2pt}
  GMOS-F3-20 & 12 53 39.98 & --29 26 20.6 & $0.9335^{\rm +0.0001}_{-0.0001}$ & 0 & 24.19 & 0.10 & 23.45 & 0.05 & 22.69 & 0.04 & 22.01 & 0.05 & 20.50 & 0.08\\ \vspace{2pt}
  GMOS-F3-22 & 12 53 36.43 & --29 25 09.5 & $0.7516^{\rm +0.0003}_{-0.0003}$ & 0 & 24.59 & 0.13 & 23.68 & 0.06 & 23.11 & 0.05 & 22.56 & 0.07 & 20.84 & 0.09\\ \vspace{2pt}
  GMOS-F3-23 & 12 53 38.47 & --29 26 22.9 & $0.4659^{\rm +0.0001}_{-0.0001}$ & 0 & 23.83 & 0.05 & 23.52 & 0.04 & 23.31 & 0.04 & 23.56 & 0.12 & 23.87 & 0.66\\ \vspace{2pt}
  GMOS-F3-26 & 12 53 36.07 & --29 26 01.8 & $0.5423^{\rm +0.0001}_{-0.0001}$ & 0 & 23.84 & 0.06 & 23.27 & 0.04 & 23.21 & 0.05 & 23.23 & 0.11 & 23.02 & 0.43\\ \vspace{2pt}
  FORS2-F1-1 & 12 53 13.22 & --29 19 11.3 & $1.2314^{\rm +0.0001}_{-0.0001}$ & 0 & 22.82 & 0.05 & 22.56 & 0.04 & 22.35 & 0.05 & 21.68 & 0.05 & 20.47 & 0.10\\ \vspace{2pt}
  FORS2-F1-2 & 12 53 07.72 & --29 19 17.7 & $1.2120^{\rm +0.0004}_{-0.0004}$ & 0 & 23.26 & 0.31 & 22.55 & 0.13 & 22.06 & 0.08 & 21.29 & 0.07 & 19.82 & 0.13\\ \vspace{2pt}
  FORS2-F1-3 & 12 53 05.85 & --29 19 55.3 & $1.2127^{\rm +0.0008}_{-0.0009}$ & 0 & 25.24 & 0.33 & 23.88 & 0.10 & 23.06 & 0.08 & 22.01 & 0.07 & 20.24 & 0.07\\ \vspace{2pt}
  FORS2-F1-4 & 12 52 58.94 & --29 19 15.2 & $1.0982^{\rm +0.0002}_{-0.0001}$ & 0 & 23.42 & 0.12 & 22.76 & 0.06 & 22.29 & 0.06 & 21.52 & 0.06 & 20.26 & 0.09\\ \vspace{2pt}
  FORS2-F1-5 & 12 53 03.07 & --29 19 59.2 & $1.0893^{\rm +0.0002}_{-0.0002}$ & 0 & 24.16 & 0.09 & 23.72 & 0.06 & 23.23 & 0.06 & 22.62 & 0.07 & 21.30 & 0.13\\  
  \hline
  FORS2-F1-6 & 12 53 04.58 & --29 20 38.7 & $1.3200^{\rm +0.0005}_{-0.0004}$ & 0 & 24.08 & 0.09 & 23.38 & 0.04 & 23.12 & 0.06 & 22.20 & 0.05 & 20.60 & 0.08\\ \vspace{2pt}
  FORS2-F1-7 & 12 53 03.60 & --29 21 26.2 & $1.1856^{\rm +0.0007}_{-0.0005}$ & 0 & 24.15 & 0.08 & 23.59 & 0.05 & 23.19 & 0.06 & 22.40 & 0.06 & 20.93 & 0.10\\ \vspace{2pt}
  FORS2-F1-8 & 12 53 00.79 & --29 17 57.1 & $1.0868^{\rm +0.0002}_{-0.0001}$ & 0 & 23.96 & 0.08 & 23.50 & 0.06 & 23.00 & 0.06 & 22.37 & 0.07 & 21.04 & 0.12\\ \vspace{2pt}
  FORS2-F1-9 & 12 53 10.94 & --29 21 43.7 & $1.2135^{\rm +0.0009}_{-0.0004}$ & 0 & 26.07 & 0.46 & 24.42 & 0.12 & 23.40 & 0.08 & 22.33 & 0.06 & 20.22 & 0.07\\ \vspace{2pt}
 FORS2-F1-10 & 12 53 11.08 & --29 22 40.5 & $1.1876^{\rm +0.0002}_{-0.0002}$ & 0 & 23.83 & 0.07 & 23.42 & 0.05 & 22.98 & 0.06 & 22.18 & 0.06 & 20.32 & 0.07\\ \vspace{2pt}
 FORS2-F1-11 & 12 53 06.67 & --29 22 16.8 & $1.2164^{\rm +0.0006}_{-0.0007}$ & 0 & 24.53 & 0.14 & 24.36 & 0.12 & 23.43 & 0.09 & 22.59 & 0.09 & 20.82 & 0.10\\ \vspace{2pt}
 FORS2-F1-12 & 12 53 08.11 & --29 21 43.1 & $1.2390^{\rm +0.0002}_{-0.0003}$ & 0 & 24.18 & 0.09 & 23.73 & 0.06 & 23.29 & 0.06 & 22.53 & 0.07 & 21.08 & 0.11\\ \vspace{2pt}
 FORS2-F1-13 & 12 52 58.36 & --29 18 45.6 & $1.1491^{\rm +0.0001}_{-0.0001}$ & 0 & 23.78 & 0.06 & 23.45 & 0.05 & 23.08 & 0.05 & 22.50 & 0.07 & 21.45 & 0.15\\ \vspace{2pt}
 FORS2-F1-14 & 12 53 11.99 & --29 20 17.6 & $1.0541^{\rm +0.0013}_{-0.0016}$ & 0 & 24.72 & 0.13 & 24.12 & 0.08 & 23.68 & 0.08 & 22.99 & 0.09 & 21.37 & 0.13\\ \vspace{2pt}
 FORS2-F1-15 & 12 53 06.04 & --29 19 15.2 & $1.2398^{\rm +0.0007}_{-0.0006}$ & 0 & 24.25 & 0.11 & 24.15 & 0.10 & 23.79 & 0.12 & 22.70 & 0.09 & 21.69 & 0.19\\ \vspace{2pt}
 FORS2-F1-16 & 12 53 09.83 & --29 18 56.4 & $1.3204^{\rm +0.0003}_{-0.0003}$ & 0 & 24.99 & 0.22 & 24.19 & 0.11 & 23.70 & 0.11 & 22.75 & 0.10 & 20.98 & 0.12\\ \vspace{2pt}
 FORS2-F1-17 & 12 53 08.71 & --29 18 25.0 & $0.3070^{\rm +0.0001}_{-0.0001}$ & 0 & 21.42 & 0.02 & 21.06 & 0.01 & 21.01 & 0.02 & 20.70 & 0.03 & 20.10 & 0.08\\ \vspace{2pt}
 FORS2-F1-18 & 12 53 11.25 & --29 19 29.8 & $0.6203^{\rm +0.0002}_{-0.0001}$ & 0 & 23.03 & 0.04 & 22.44 & 0.02 & 22.28 & 0.03 & 22.43 & 0.07 & 22.59 & 0.36\\ \vspace{2pt}
 FORS2-F1-19 & 12 53 11.52 & --29 15 09.4 & $1.2367^{\rm +0.0007}_{-0.0011}$ & 0 & 25.12 & 0.23 & 24.26 & 0.11 & 23.38 & 0.08 & 22.37 & 0.07 & 20.26 & 0.07\\ \vspace{2pt}
 FORS2-F1-20 & 12 53 15.43 & --29 16 23.7 & $1.2364^{\rm +0.0006}_{-0.0006}$ & 0 & 24.56 & 0.57 & 22.76 & 0.11 & 21.86 & 0.06 & 20.96 & 0.05 & 19.06 & 0.05\\ \vspace{2pt}
 FORS2-F1-21 & 12 53 16.87 & --29 16 17.9 & $0.8856^{\rm +0.0001}_{-0.0002}$ & 0 & 24.22 & 0.13 & 23.28 & 0.06 & 22.65 & 0.05 & 22.11 & 0.07 & 20.23 & 0.07\\ \vspace{2pt}
 FORS2-F1-22 & 12 53 17.75 & --29 17 29.0 & $1.2320^{\rm +0.0002}_{-0.0001}$ & 0 & 23.13 & 0.12 & 22.84 & 0.08 & 22.48 & 0.08 & 21.82 & 0.08 & 20.84 & 0.17\\ \vspace{2pt}
 FORS2-F1-23 & 12 53 08.35 & --29 16 01.8 & $1.2113^{\rm +0.0001}_{-0.0001}$ & 0 & 24.67 & 0.19 & 23.72 & 0.08 & 23.13 & 0.08 & 22.38 & 0.08 & 20.54 & 0.09\\ \vspace{2pt}
 FORS2-F1-25 & 12 53 19.08 & --29 18 12.0 & $1.0680^{\rm +0.0003}_{-0.0005}$ & 0 & 23.55 & 0.09 & 23.45 & 0.08 & 23.07 & 0.09 & 22.35 & 0.10 & 21.62 & 0.23\\ \vspace{2pt}
 FORS2-F1-26 & 12 53 04.36 & --29 17 16.8 & $1.1020^{\rm +0.0001}_{-0.0001}$ & 0 & 21.97 & 0.02 & 21.75 & 0.01 & 21.41 & 0.02 & 20.98 & 0.02 & 20.00 & 0.06\\ \vspace{2pt}
 FORS2-F1-27 & 12 53 03.67 & --29 16 02.1 & $1.0858^{\rm +0.0002}_{-0.0002}$ & 0 & 24.38 & 0.11 & 23.66 & 0.06 & 23.08 & 0.05 & 22.31 & 0.06 & 20.85 & 0.10\\ \vspace{2pt}
 FORS2-F1-28 & 12 53 24.74 & --29 16 59.8 & $1.1415^{\rm +0.0001}_{-0.0002}$ & 0 & 23.70 & 0.09 & 23.50 & 0.07 & 23.33 & 0.10 & 22.80 & 0.13 & 21.93 & 0.27\\ \vspace{2pt}
 FORS2-F1-29 & 12 53 11.49 & --29 18 25.7 & $1.1976^{\rm +0.0001}_{-0.0001}$ & 0 & 23.31 & 0.05 & 23.06 & 0.04 & 22.76 & 0.04 & 22.22 & 0.06 & 21.13 & 0.12\\ \vspace{2pt}
 FORS2-F1-30 & 12 53 15.96 & --29 17 58.8 & $0.5750^{\rm +0.0001}_{-0.0002}$ & 0 & 21.74 & 0.06 & 21.12 & 0.03 & 20.93 & 0.03 & 20.83 & 0.04 & 20.31 & 0.15\\ \vspace{2pt}
 FORS2-F1-31 & 12 53 17.95 & --29 18 44.2 & $0.0000^{\rm +0.0001}_{-0.0001}$ & 0 & 23.39 & 0.06 & 22.50 & 0.03 & 21.58 & 0.02 & 21.03 & 0.02 & 20.46 & 0.08\\ \vspace{2pt}
  FORS2-F2-1 & 12 53 45.09 & --29 25 04.7 & $1.1736^{\rm +0.0009}_{-0.0010}$ & 0 & 25.80 & 0.49 & 23.45 & 0.07 & 22.67 & 0.05 & 21.74 & 0.05 & 20.03 & 0.06\\ \vspace{2pt}
  FORS2-F2-2 & 12 53 42.09 & --29 23 31.2 & $1.3044^{\rm +0.0001}_{-0.0001}$ & 0 & 22.74 & 0.04 & 22.42 & 0.03 & 22.11 & 0.03 & 21.53 & 0.04 & 20.37 & 0.08\\ \vspace{2pt}
  FORS2-F2-3 & 12 53 50.15 & --29 24 02.8 & $1.2318^{\rm +0.0002}_{-0.0002}$ & 0 & 23.31 & 0.10 & 22.94 & 0.06 & 22.48 & 0.07 & 21.83 & 0.07 & 20.32 & 0.09\\ \vspace{2pt}
  FORS2-F2-4 & 12 53 49.63 & --29 24 39.3 & $1.2355^{\rm +0.0002}_{-0.0002}$ & 0 & 23.68 & 0.10 & 23.01 & 0.05 & 22.56 & 0.06 & 21.77 & 0.06 & 20.34 & 0.08\\ \vspace{2pt}
  FORS2-F2-5 & 12 53 44.52 & --29 23 21.8 & $1.1724^{\rm +0.0001}_{-0.0001}$ & 0 & 23.01 & 0.06 & 23.03 & 0.06 & 22.71 & 0.07 & 22.14 & 0.08 & 21.38 & 0.19\\ \vspace{2pt}
  FORS2-F2-6 & 12 53 57.09 & --29 25 41.0 & $1.0938^{\rm +0.0004}_{-0.0008}$ & 0 & 23.27 & 0.07 & 22.88 & 0.05 & 22.49 & 0.05 & 21.84 & 0.06 & 20.53 & 0.10\\ \vspace{2pt}
  FORS2-F2-7 & 12 53 56.85 & --29 24 52.7 & $1.2348^{\rm +0.0001}_{-0.0002}$ & 0 & 25.30 & 0.31 & 24.33 & 0.14 & 23.28 & 0.09 & 22.14 & 0.07 & 20.39 & 0.08\\ \vspace{2pt}
  FORS2-F2-8 & 12 53 57.91 & --29 24 50.0 & $1.2377^{\rm +0.0001}_{-0.0002}$ & 0 & 23.97 & 0.08 & 23.48 & 0.05 & 23.04 & 0.05 & 22.42 & 0.07 & 21.15 & 0.12\\ \vspace{2pt}
  FORS2-F2-9 & 12 53 59.08 & --29 24 39.8 & $1.2355^{\rm +0.0003}_{-0.0002}$ & 0 & 23.98 & 0.15 & 23.41 & 0.09 & 22.87 & 0.08 & 22.13 & 0.09 & 20.50 & 0.10\\ \vspace{2pt}
 FORS2-F2-10 & 12 54 01.00 & --29 25 01.8 & $1.2366^{\rm +0.0006}_{-0.0011}$ & 0 & 24.68 & 0.20 & 23.85 & 0.09 & 23.06 & 0.07 & 22.16 & 0.07 & 20.19 & 0.07\\ \vspace{2pt}
 FORS2-F2-11 & 12 53 42.47 & --29 25 18.8 & $1.1791^{\rm +0.0008}_{-0.0015}$ & 0 & 25.30 & 0.22 & 24.70 & 0.13 & 23.97 & 0.11 & 22.81 & 0.08 & 21.09 & 0.11\\ \vspace{2pt}
 FORS2-F2-12 & 12 53 57.23 & --29 24 20.2 & $1.1600^{\rm +0.0004}_{-0.0008}$ & 0 & 24.70 & 0.24 & 23.90 & 0.12 & 23.40 & 0.12 & 22.22 & 0.09 & 20.60 & 0.10\\ \vspace{2pt}
 FORS2-F2-13 & 12 53 42.02 & --29 24 14.4 & $1.3998^{\rm +0.0014}_{-0.0009}$ & 1 & 27.11 & 0.81 & 24.81 & 0.14 & 23.90 & 0.09 & 22.92 & 0.08 & 20.85 & 0.09\\ \vspace{2pt}
FORS2-F2-14a & 12 53 43.72 & --29 25 19.2 & $1.1784^{\rm +0.0004}_{-0.0005}$ & 0 & 25.30 & 0.25 & 23.90 & 0.08 & 23.01 & 0.05 & 22.04 & 0.05 & 20.22 & 0.07\\ \vspace{2pt}
FORS2-F2-14b & 12 53 43.87 & --29 25 17.7 & $1.1696^{\rm +0.0018}_{-0.0019}$ & 1 & 23.87 & 0.35 & 22.82 & 0.12 & 22.08 & 0.07 & 21.11 & 0.05 & 19.35 & 0.07\\ \vspace{2pt}
FORS2-F2-14c & 12 53 44.01 & --29 25 16.8 & $1.1749^{\rm +0.0007}_{-0.0008}$ & 0 & 24.27 & 0.25 & 23.12 & 0.08 & 22.50 & 0.07 & 21.56 & 0.06 & 19.89 & 0.07\\ \vspace{2pt}
 FORS2-F2-15 & 12 53 54.76 & --29 24 31.4 & $1.2340^{\rm +0.0002}_{-0.0001}$ & 0 & 23.01 & 0.07 & 22.30 & 0.03 & 21.99 & 0.04 & 21.63 & 0.06 & 20.94 & 0.15\\ \vspace{2pt}
 FORS2-F2-16 & 12 53 54.71 & --29 25 07.9 & $0.9668^{\rm +0.0001}_{-0.0001}$ & 0 & 22.84 & 0.03 & 22.70 & 0.03 & 22.23 & 0.03 & 22.06 & 0.05 & 22.04 & 0.23\\ \vspace{2pt}
 FORS2-F2-18 & 12 53 46.60 & --29 23 05.9 & $0.9364^{\rm +0.0001}_{-0.0001}$ & 0 & 24.36 & 0.14 & 23.55 & 0.07 & 22.64 & 0.05 & 21.91 & 0.05 & 20.41 & 0.08\\ \vspace{2pt}
 FORS2-F2-19 & 12 53 44.78 & --29 23 08.3 & $0.5618^{\rm +0.0002}_{-0.0001}$ & 0 & 22.29 & 0.02 & 21.80 & 0.01 & 21.59 & 0.02 & 21.57 & 0.04 & 21.27 & 0.15\\ \vspace{2pt}
 FORS2-F2-21 & 12 53 39.07 & --29 25 38.5 & $1.0948^{\rm +0.0001}_{-0.0002}$ & 0 & 23.55 & 0.07 & 23.01 & 0.04 & 22.55 & 0.04 & 21.86 & 0.05 & 20.60 & 0.09\\ \vspace{2pt}
FORS2-F2-22a & 12 53 39.59 & --29 25 26.7 & $1.3016^{\rm +0.0008}_{-0.0009}$ & 0 & 25.19 & 0.28 & 23.95 & 0.10 & 23.00 & 0.07 & 22.01 & 0.06 & 20.03 & 0.06\\ \vspace{2pt}
FORS2-F2-22b & 12 53 39.48 & --29 25 27.6 & $0.0000^{\rm +0.0001}_{-0.0001}$ & 0 & 25.31 & 0.20 & 24.26 & 0.08 & 23.14 & 0.05 & 22.45 & 0.06 & 21.49 & 0.14\\ \vspace{2pt}
 FORS2-F2-23 & 12 53 37.96 & --29 27 32.8 & $1.2366^{\rm +0.0004}_{-0.0004}$ & 0 & 22.91 & 0.05 & 22.52 & 0.04 & 22.17 & 0.04 & 21.41 & 0.04 & 19.96 & 0.07\\ \vspace{2pt}
 FORS2-F2-24 & 12 53 31.63 & --29 26 08.1 & $1.3287^{\rm +0.0001}_{-0.0001}$ & 0 & 22.96 & 0.05 & 22.80 & 0.04 & 22.71 & 0.06 & 22.19 & 0.08 & 21.35 & 0.18\\ \vspace{2pt}
 FORS2-F2-25 & 12 53 27.93 & --29 25 15.2 & $1.2326^{\rm +0.0001}_{-0.0001}$ & 0 & 23.51 & 0.05 & 23.30 & 0.04 & 23.05 & 0.05 & 22.43 & 0.06 & 21.87 & 0.20\\ \vspace{2pt}
 FORS2-F2-26 & 12 53 44.37 & --29 26 55.8 & $1.3205^{\rm +0.0002}_{-0.0001}$ & 0 & 23.68 & 0.07 & 23.52 & 0.06 & 23.44 & 0.09 & 22.91 & 0.11 & 22.00 & 0.25\\ 
  FORS2-F2-27 & 12 53 33.40 & --29 23 57.6 & $1.1713^{\rm +0.0001}_{-0.0001}$ & 0 & 24.71 & 0.13 & 24.36 & 0.09 & 24.00 & 0.10 & 22.98 & 0.09 & 22.38 & 0.28\\ \vspace{2pt}
 FORS2-F2-28 & 12 53 38.03 & --29 26 31.1 & $1.3047^{\rm +0.0004}_{-0.0005}$ & 0 & 24.61 & 0.16 & 23.68 & 0.07 & 22.93 & 0.06 & 21.95 & 0.05 & 20.40 & 0.08\\ \vspace{2pt}
 FORS2-F2-29 & 12 53 31.27 & --29 26 51.1 & $1.2294^{\rm +0.0001}_{-0.0001}$ & 0 & 23.28 & 0.05 & 23.13 & 0.04 & 23.05 & 0.06 & 22.57 & 0.09 & 22.27 & 0.31\\ \vspace{2pt}
 FORS2-F2-30 & 12 53 32.25 & --29 26 05.3 & $1.3264^{\rm +0.0002}_{-0.0002}$ & 0 & 25.24 & 0.22 & 24.16 & 0.09 & 23.67 & 0.09 & 22.90 & 0.09 & 20.96 & 0.10\\ \vspace{2pt}
 FORS2-F2-33 & 12 53 30.14 & --29 24 52.8 & $0.3833^{\rm +0.0001}_{-0.0001}$ & 0 & 23.09 & 0.04 & 22.71 & 0.03 & 22.69 & 0.04 & 22.52 & 0.07 & 22.74 & 0.40\\ \vspace{2pt}
  FORS2-F3-1 & 12 52 12.16 & --29 31 11.8 & $1.1742^{\rm +0.0005}_{-0.0004}$ & 0 & 24.63 & 0.21 & 23.31 & 0.07 & 22.43 & 0.05 & 21.36 & 0.04 & 19.59 & 0.05\\  
  FORS2-F3-3 & 12 52 09.98 & --29 31 23.9 & $1.1748^{\rm +0.0004}_{-0.0003}$ & 0 & 24.43 & 0.16 & 23.57 & 0.07 & 22.85 & 0.06 & 21.84 & 0.05 & 20.08 & 0.07\\ \vspace{2pt}
  FORS2-F3-5 & 12 52 04.99 & --29 29 20.1 & $1.1919^{\rm +0.0004}_{-0.0003}$ & 0 & 23.77 & 0.10 & 23.07 & 0.05 & 22.55 & 0.05 & 21.70 & 0.05 & 19.99 & 0.07\\ \vspace{2pt}
  FORS2-F3-6 & 12 52 07.12 & --29 31 29.6 & $1.1233^{\rm +0.0009}_{-0.0010}$ & 0 & 23.31 & 0.19 & 22.59 & 0.09 & 21.91 & 0.06 & 21.17 & 0.06 & 19.24 & 0.06\\ \vspace{2pt}
  FORS2-F3-7 & 12 52 06.19 & --29 30 23.9 & $1.3293^{\rm +0.0002}_{-0.0001}$ & 0 & 23.56 & 0.07 & 23.12 & 0.04 & 22.97 & 0.06 & 22.27 & 0.07 & 21.48 & 0.17\\ \vspace{2pt}
  FORS2-F3-8 & 12 52 03.00 & --29 33 19.1 & $1.1973^{\rm +0.0001}_{-0.0001}$ & 0 & 23.26 & 0.04 & 22.98 & 0.03 & 22.72 & 0.04 & 22.24 & 0.05 & 21.65 & 0.17\\ \vspace{2pt}
 FORS2-F3-10 & 12 52 03.98 & --29 32 49.1 & $1.0819^{\rm +0.0003}_{-0.0003}$ & 1 & 24.18 & 0.12 & 23.91 & 0.09 & 23.44 & 0.10 & 22.68 & 0.10 & 22.21 & 0.31\\ \vspace{2pt}
 FORS2-F3-13 & 12 52 13.48 & --29 31 26.6 & $1.3380^{\rm +0.0005}_{-0.0002}$ & 1 & 23.39 & 0.05 & 23.04 & 0.03 & 22.92 & 0.05 & 22.28 & 0.06 & 21.18 & 0.12\\ \vspace{2pt}
 FORS2-F3-14 & 12 52 14.56 & --29 33 08.8 & $0.9106^{\rm +0.0001}_{-0.0002}$ & 0 & 24.33 & 0.10 & 23.86 & 0.06 & 23.64 & 0.08 & 22.74 & 0.08 & 22.18 & 0.24\\ \vspace{2pt}
 FORS2-F3-16 & 12 52 01.55 & --29 31 26.5 & $0.2951^{\rm +0.0001}_{-0.0001}$ & 0 & 24.37 & 0.06 & 24.06 & 0.05 & 24.03 & 0.06 & 23.87 & 0.12 & 23.49 & 0.44\\ \vspace{2pt}
 FORS2-F3-18 & 12 52 19.70 & --29 30 34.4 & $1.2463^{\rm +0.0005}_{-0.0007}$ & 1 & 23.28 & 0.16 & 22.54 & 0.07 & 22.08 & 0.06 & 21.47 & 0.07 & 19.80 & 0.08\\ \vspace{2pt}
 FORS2-F3-19 & 12 52 25.41 & --29 29 22.5 & $1.2443^{\rm +0.0002}_{-0.0001}$ & 0 & 22.85 & 0.05 & 22.59 & 0.04 & 22.29 & 0.04 & 21.77 & 0.06 & 21.23 & 0.16\\ \vspace{2pt}
 FORS2-F3-20 & 12 52 28.68 & --29 31 46.9 & $1.1505^{\rm +0.0004}_{-0.0004}$ & 0 & 23.47 & 0.06 & 23.02 & 0.04 & 22.51 & 0.04 & 21.77 & 0.04 & 20.26 & 0.07\\ \vspace{2pt}
 FORS2-F3-23 & 12 52 18.33 & --29 33 24.5 & $1.2922^{\rm +0.0004}_{-0.0005}$ & 0 & 24.46 & 0.16 & 24.02 & 0.11 & 23.29 & 0.09 & 22.29 & 0.08 & 20.44 & 0.08\\ \vspace{2pt}
 FORS2-F3-24 & 12 52 27.21 & --29 33 13.7 & $1.2348^{\rm +0.0002}_{-0.0002}$ & 0 & 23.35 & 0.06 & 23.06 & 0.04 & 22.84 & 0.06 & 22.27 & 0.07 & 21.80 & 0.23\\ \vspace{2pt}
 FORS2-F3-25 & 12 52 20.61 & --29 33 23.2 & $1.3015^{\rm +0.0002}_{-0.0003}$ & 0 & 23.22 & 0.06 & 22.88 & 0.04 & 22.70 & 0.06 & 22.07 & 0.07 & 20.91 & 0.13\\ \vspace{2pt}
 FORS2-F3-26 & 12 52 21.62 & --29 33 26.4 & $1.2165^{\rm +0.0004}_{-0.0004}$ & 1 & 24.81 & 0.16 & 24.11 & 0.09 & 23.85 & 0.11 & 22.98 & 0.11 & 21.56 & 0.16\\ \vspace{2pt}
 FORS2-F3-29 & 12 52 29.25 & --29 31 19.8 & $1.1061^{\rm +0.0012}_{-0.0028}$ & 1 & 26.39 & 0.65 & 23.97 & 0.09 & 23.16 & 0.07 & 22.10 & 0.06 & 20.28 & 0.07\\
\hline
\end{tabular}
\end{table}