\begin{table}%t1
%\centering
\par
\caption{\label{T1}MOLSCAT parameters used in the present calculations.
Be and De are from \citet{HuHe79}.}
\small \begin{tabular}{cccc}
\hline \hline\noalign{\smallskip}
INTFLG=6&STEPS=30& OTOL=0.01& DTOL=0.1\\
\hline\noalign{\smallskip}
Be = 14.1776~cm$^{-1}$ & De = 0.0014~cm$^{-1}$ & JMAX = 17&
RMIN = 3~Bohr, RMAX = 50~Bohr\\
\hline
\end{tabular} 
\end{table}