\begin{table}%t5
\caption{\label{modelfit}Inferred structural parameters for EC~09582-1137.}
%\centerline
 {
\begin{tabular}{lrclc}
\hline\hline
Quantity & \multicolumn{3}{c}{Estimated Value} & \\
\hline \\[-3.3mm]
 $T_{\rm eff}$ (K)$^{\dag}$ & $34806$ & $\pm$ & $230$ & ($0.66\%$) \\
 $\log g$ & $5.788$ & $\pm$ & $0.004$ & ($0.07\%$) \\
 $M_*/M_{\odot}$ & $0.485$ & $\pm$ & $0.011$ & ($2.27\%$) \\
 $\log (M_{\rm env}/M_*)$ & $-4.39$ & $\pm$ & $0.10$ & ($2.23\%$) \\
 & \\
 $R/R_{\odot}$ ($M_*$, $g$) & $0.147$ & $\pm$ & $0.002$ & ($1.57\%$) \\
 $L/L_{\odot}$ ($T_{\rm eff}$, $R$) & $28.6$ & $\pm$ & $1.7$ & ($5.79\%$)
\\
 $M_V$ ($g$, $T_{\rm eff}$, $M_*$) & $4.44$ & $\pm$ & $0.05$ & ($1.13\%$)
\\
 $d$ ($V$, $M_V$) (pc) & $1461$ & $\pm$ & $66$ & ($4.52\%$) \\
\hline
\end{tabular}}
\par
\medskip
$^{\dag}$ From spectroscopy.
\end{table}