\begin{table}%t2
\caption{\label{freqs}Oscillations detected from the combined light curve for EC~09582-113.}
%\centerline
 {
\begin{tabular}{l c c c c c c c}
\hline\hline
Rank & Period & Frequency & Amplitude & Phase & {\it S/N} & $f_{\rm K2006}$ & $A_{\rm K2006}$\\
{} &  (s) & (mHz) &  (\%) & (s) & {} & (mHz) &  (\%)\\
\hline 
$f_4$ &  169.1109 $\pm$ 0.0054 & 5.91328 $\pm$ 0.00019 & 0.0445 $\pm$ 0.0056 &
49.02 $\pm$ 3.38  & 6.3 & ... & ... \\
$f_5$ &  162.4811 $\pm$ 0.0060 & 6.15456 $\pm$ 0.00023 & 0.0371 $\pm$ 0.0056 &
107.41 $\pm$ 3.90 & 5.2 & ... & ...\\
$f_2$ & 151.2420 $\pm$ 0.0008 & 6.61192 $\pm$ 0.00004 & 0.2297 $\pm$ 0.0056 &
100.26 $\pm$ 0.59 & 32.4 & 6.61254 & 0.69 \\
$f_3-$ &  143.2468 $\pm$ 0.0067 & 6.98096 $\pm$ 0.00033 & 0.0258 $\pm$ 0.0056 &
10.46 $\pm$ 4.95  & 3.6$^\ast$ & ... & ...\\
$f_3$ & 143.1418 $\pm$ 0.0024 & 6.98608 $\pm$ 0.00012 & 0.0726 $\pm$ 0.0056 &
14.99 $\pm$ 1.75  & 10.2 & ... & ...\\
$f_3+$ & 143.0664 $\pm$ 0.0026 & 6.98976 $\pm$ 0.00013 & 0.0663 $\pm$ 0.0056 &
63.31 $\pm$ 1.92  & 9.3 & ... & ...\\
$f_1$ & 135.9967 $\pm$ 0.0003 & 7.35312 $\pm$ 0.00002 & 0.4739 $\pm$ 0.0056 &
14.67 $\pm$ 0.26  & 66.7 & 7.35342 & 0.76\\
$f_1H$ &  67.9970 $\pm$ 0.0024 & 14.70653 $\pm$ 0.00052 & 0.0163 $\pm$ 0.0056 &
19.29 $\pm$ 3.71 & 2.3$^\ast$ & ... & ...\\
\hline
\end{tabular}}
\medskip
\par
$^{\ast}$ Below 4$\sigma$.
\end{table}