\begin{table}%T5
\caption{\label{haloandrelic}Parameters of the halo and the relics derived from the full resolution~maps.}
\small
%\centerline
{
\begin{tabular}{cccc}
\hline
\hline 
Source       &         Wavelength   &    Angular size               &                       Flux                                           \\
             &                      &    ($^{\prime}$)              &                       (mJy)                                         \\     
\hline
\noalign{\smallskip}
             &            25~cm     &    7  $\times$ 4              &                      44  $\pm$ 1$^a$                                     \\
halo         &            85~cm     &    17 $\times$ 15              &                      496 $\pm$ 7$^a$                                    \\
             &            2 ~m      &   (17 $\times$ 15)$^b$        &                      805 $\pm$ 40$^a$                                    \\
\hline
             &            25~cm     &    11 $\times$ 3              &                      30  $\pm$ 1                                      \\
NE relic     &            85~cm     &    15 $\times$ 4              &                      117 $\pm$ 2                                       \\
             &            2 ~m      &   (15 $\times$ 4)$^b$       &                      287 $\pm$ 17                                      \\
 \hline
 NW relic     &           85~cm      &    21  $\times$ 1             &                      61  $\pm$  1                                      \\ 
 \hline
 SW relic     &           85~cm      &    13 $\times$ 1              &                      17  $\pm$  1                                      \\  
 \hline
 \end{tabular}}
 \smallskip 
$^a$ The fluxes have been determined avoiding the radio galaxies.\\
$^b$ Assumed to be the same as at 85~cm. The low resolution of the 2~m~map prevented a~more precise determination of this parameter.
\end{table}