\begin{table}%t3
\caption{\label{Tab_sp}Observed wavelength, {\it EW}, and {\it FWHM} of the most prominent 
emission lines in the optical spectrum of EX Lupi in quiescence$^*$.}
\small%\centerline
{
\begin{tabular}{l c r r }
\hline
\hline
\noalign{\smallskip}
Line & $\lambda$ & {\it EW}& {\it FWHM}  \\
     &  (\AA) &  (\AA)~ &  (km~s$^{-1}$) \\
\noalign{\smallskip}
\hline 	
\noalign{\smallskip}
Ca II H     &  3933.66   &   $-$13.09  &  45.8  \\
Ca II K     &  3968.46   &    $-$5.41  &  22.7   \\    
H$\delta$   &  4101.70   &   $-$14.29  &  155.1   \\	 
H$\gamma$   &  4340.42   &   $-$13.02  &  137.0   \\	 
H$\beta$    &  4861.25   &   $-$18.74  &  144.0   \\	  
He I (11)   &  5875.75   &    $-$1.96  &  37.6  \\     
Na I (1)    &  5889.96   &    $-$0.52  &  22.9   \\	 
Na I (1)    &  5895.94   &    $-$0.34  &  18.3   \\	 
H$\alpha$~  &  6562.56   &   $-$35.95  &  191.0   \\	 
HeI (46)    &  6678.24   &    $-$0.67  &  23.8   \\	
He I (10)   &  7065.31   &    $-$0.42  &  29.3   \\    
Ca II (2)   &  8498.01   &    $-$1.51  &  23.0   \\	
Ca II (2)   &  8542.08   &    $-$2.26  &  40.5   \\    
Ca II (2)   &  8662.17   &    $-$1.49  &  27.0   \\	
\noalign{\smallskip}
\hline
\end{tabular}}
\smallskip
$^*$ The full list of the emission lines identified in the spectrum
are found in the electronic version of this table at the CDS.
\end{table}