\begin{table}%T11 
\par
 \caption{\label{Tab:cand_virgo_sub2_cm}\label{taba6}Emission-line objects detected in the SUB2 field.}
\small  
%\centerline
{
\begin{tabular}{c c c c c c}
\hline
\hline
Name&  $\alpha ($J2000) & $\delta ($J2000) & $m$(5007) & $m_{\rm H\alpha}$ & $m_{(V+R)}$\\
\hline 
SUB2-1&   12:23:22.524 &14:03:21.68    & 26.30  &--  & --   \\
SUB2-2&   12:24:23.113 &14:20:50.64    & 27.01  &--  & 30.22  \\
SUB2-3&   12:24:45.272 &14:18:52.58    & 27.18  &--  & 29.91  \\
SUB2-4&   12:24:35.834 &14:05:36.93    & 27.19  &--  & 29.26  \\
SUB2-5&   12:24:45.103 &14:16:12.88    & 27.34  &--  & 27.56  \\
SUB2-6&   12:24:46.116 &14:13:04.52    & 27.46  &--  & --   \\
SUB2-7*&   12:24:15.861 &14:04:17.51   & 27.54  &25.81 & 28.33  \\
SUB2-8  & 12:25:01.022 & 14:02:10.35   & 27.58 & --   & 28.53\\
SUB2-9&  12:23:39.559 &14:18:15.09     & 27.59  &--  & 31.73  \\
SUB2-10&  12:24:35.553 &13:55:21.40    & 27.75  &--  & --	\\
SUB2-11&  12:23:59.558 &14:13:02.89    & 27.85  &--  & --	\\
SUB2-12&  12:23:04.010 &14:06:12.86    & 27.88  &--  & --	\\
SUB2-13&  12:23:25.975 &14:05:48.30    & 27.90  &--  & --	\\
\hline
\end{tabular}}
\smallskip
 Objects
  with (*) are ICPNe. 
\end{table}