\begin{table}%t8
%\centering
\par
\caption {\label{final}Final abundances for each sample star, and mean results and corresponding internal errors.}                  
%\centering
\par
\begin{tabular}{cccccccccccc}     % 12 columns 
\hline\hline    
%\noalign{\vskip 0.1cm} 
Element & B-8 & B-107 & B-108 & B-118 & B-122 & B-128 & B-130 & F-121 & Mean & \\                 \hline
\hbox{[O/Fe]}  & +0.25:  & +0.5:  & +0.7:  & +0.3: & +0.7: &  --   & +0.5: & +0.5: & +0.39:~$\pm$~0.3 & \\
\hbox{[Na/Fe]} & +0.35  & -0.30  & -0.15   &  +0.10  & +0.15  & +0.10  & +0.15  & --0.10  & +0.03~$\pm$~0.3 &\\
\hbox{[Mg/Fe]}  & +0.10  & +0.27  & +0.33   & +0.20 & +0.20 & +0.25  & +0.40  & +0.40  & +0.27~$\pm$~0.15 &\\
\hbox{[Si/Fe]}  & +0.34 & +0.20  &  +0.20   & +0.29 & +0.13 & +0.24 & +0.35 & +0.27  & +0.25~$\pm$~0.10 &\\
\hbox{[Ca/Fe]}  & +0.15 & +0.04 & +0.18  & +0.21 & +0.21 & +0.16 & +0.23 & +0.16 & +0.17~$\pm$~0.06 &\\
\hbox{[Ti/Fe]}  & +0.12 & +0.14 & +0.21  & +0.11  & +0.19 & +0.17 & +0.21 & +0.16 & +0.16~$\pm$~0.04 &\\
\hbox{[Eu/Fe]}  & +0.50 & \phantom{-}0.00 & +0.50  & +0.50   & +0.30 & \phantom{-}0.00 & +0.80 & +0.50 & +0.39~$\pm$~0.4 &\\
\hbox{[Ba/Fe]}  & +0.95 & +0.50 &  $\phantom{-}$0.0  & +1.00 & +0.60 & +0.90 & +0.25 & --0.25   & +0.49~$\pm$~0.4 &\\
\hbox{[La/Fe]}  & +0.50 & +0.50 & +0.30  & +0.50 &  +0.30  & --    & --    &  0.00   & +0.35~$\pm$~0.2 &\\
\hline                  
\end{tabular}
\end{table}