\begin{table}%t4
\caption {\label{tabteff}Photometric stellar parameters derived using the calibrations by Alonso et~al. (\cite{Alonso99})
 for $V-I$, $V-K$, $J-K$, bolometric corrections, bolometric magnitudes
and corresponding gravity log~$g$,
and final spectroscopic parameters.   }
%\centerline
 {\begin{tabular}{cccccccccccccc}
\hline
\hline
& \multicolumn{5}{c}{\hbox{}} Photometric\phantom{-} parameters  & \multicolumn{5}{c}{\hbox{}}
 Spectroscopic\phantom{-} parameters\\
\cline{2-7}  \cline{9-14}    \\
{\rm Star} & $T$($V-I$) & $T$($V-K$)  &  $T(J-K_{\rm TCS}$) &  ${BC_{V}}$ &
${M_{\rm bol}}$ &
$\log g$ & & $T_{\rm eff}$ &
$\log g$ &[FeI/H] & [FeII/H] & [Fe/H] & ${v_{\rm t} }$ \\
 & K & K &  K &   & & & & K & & &  &  &  km s$^{-1}$  \\
\noalign{\hrule}
B-008 & 4867 & 4615 & 4597 & $-0.32$ & $0.93$ & 2.52 & & 4600 & 2.0 & --1.00  & --1.06 & $-1.03$ & 1.40 \\
B-107 & 4745 & 4465 & 4311 & $-0.37$ & $0.97$ & 2.50 & & 4900 & 2.1 & --1.15  & --1.06 & $-1.11$ & 1.40 \\
B-108 & 4349 & --  & --  & $-0.58$ & $1.50$ & 2.55 & & 4700 & 2.6 & --1.12  & --1.08 & $-1.10$ & 0.80 \\
B-118 & 4671 & 4552 & 4558 & $-0.40$ & $1.03$ & 2.49 & & 4700 & 2.6 & --0.87  & --0.81 & $-0.84$ & 1.30 \\
B-122 & 4635 & --   & --   & $-0.41$ & $1.04$ & 2.48 & & 4800 & 2.6 & --0.87  & --0.87 & $-0.87$ & 1.10 \\
B-128 & 4660 & 4589 & 6914 & $-0.40$ & $1.28$ & 2.58 & & 4800 & 2.7 & --0.79  & --0.79 & $-0.79$ & 1.30 \\
B-130 & 4753 & --   & --   & $-0.36$ & $1.28$ & 2.62 & & 4800 & 2.3 & --1.09  & --1.10 & $-1.09$ & 1.40 \\
B-134 & 5000 & 4912 & 5212 & $-0.28$ & $0.94$ & 2.57 & & --  & --  & --   & --  & --  & --  \\
F-121 & 4627 & -- & -- & $-0.42$ & $1.44$ & 2.64   & & 4750 & 2.3 & --1.14  & --1.15 & $-1.15$ & 1.30 \\
\hline \end{tabular}}
\end{table}