\begin{table}%t3
\caption{\label{wds13090+3353}Photometry of system WDS~13090+3353.} 
%\centerline
 {\small \begin{tabular}{l cc}
 \hline \hline 
Magnitude  		& LP~268--35		&  LP~268--33		\\
\hline
$u$ [mag]		& $15.480\pm0.007$	& $19.860\pm0.038$	\\ % 
$g$ [mag]		& $12.588\pm0.001$	& $17.175\pm0.007$	\\ % 
$r$ [mag]		& $11.126\pm0.001$	& $15.727\pm0.006$	\\ % 
$i$ [mag]		& $10.720\pm0.001$	& $14.135\pm0.006$	\\ % 
$z$ [mag]		& $10.887\pm0.002^{a}$ & $ 13.265 \pm 0.007$	\\ % 
$J$ [mag]		&  $9.296\pm0.019$	& $11.685 \pm 0.021$	\\ % 
$H$ [mag]		&  $8.740 \pm 0.018$	& $11.052 \pm 0.021$	\\ % 
$K_{\rm s}$ [mag]	&  $8.623 \pm 0.018$& $10.769 \pm 0.019$	\\ % 
            \hline
         \end{tabular}}
\medskip
 $^{a}$  The $z$-band measurement of LP~268--35 is probably affected by
non-linearity of the detector. 
   \end{table}