\begin{table}
\centering
\caption{\label{tab:counterparts_a}Identification and offset between X-ray and optical/IR position for counterparts of X-ray sources.}
\tiny\begin{tabular}{llrrrrrrrrrrrrrcc}\hline\hline
NGC~7129-...  &  Name & $\Delta_{\rm O-X}$   & $\Delta_{\rm 2M-X}$  \\
             &       & [\arcsec]   & [\arcsec]           \\
\hline
...-S3-X1 & HL85-S\,25 & $0.46$ & $0.10$ \\
...-S3-X2 &            & $   -$ & $0.11$ \\
...-S3-X3 & HL85-S\,II & $1.82$ & $0.23$ \\
...-S3-X4 &            & $   -$ & $0.22$ \\
...-S3-X6 &            & $   -$ & $0.10$ \\
...-S3-X7 &            & $   -$ & $0.11$ \\
...-S3-X8 &            & $   -$ & $0.11$ \\
...-S3-X9 & MMN-19     & $1.15$ & $0.09$ \\
...-S3-X10 &           & $   -$ & $0.10$ \\
...-S3-X11 &           & $   -$ & $0.22$ \\
...-S3-X12 &           & $   -$ & $   -$ \\
...-S3-X13 & SVS\,8    & $1.27$ & $0.07$ \\
...-S3-X14 &           & $   -$ & $1.44$ \\
...-S3-X15 &           & $   -$ & $0.17$ \\
...-S3-X16 & SVS\,7    & $1.30$ & $0.09$ \\
...-S3-X17 &           & $   -$ & $0.18$ \\
...-S3-X18 &           & $   -$ & $0.10$ \\
...-S3-X19 &           & $   -$ & $0.13$ \\
...-S3-X20 &           & $   -$ & $0.05$ \\
...-S3-X21 &           & $   -$ & $0.08$ \\
...-S3-X22 &           & $   -$ & $0.22$ \\
...-S3-X23 &           & $   -$ & $0.01$ \\
...-S3-X24 &           & $   -$ & $   -$ \\
...-S3-X25 & MMN-6     & $1.09$ & $0.10$ \\
...-S3-X26 &           & $   -$ & $0.12$ \\
...-S3-X27 &           & $   -$ & $0.17$ \\
...-S3-X28 &           & $   -$ & $0.16$ \\
...-S3-X29 & MMN-9     & $1.94$ & $0.18$ \\
...-S3-X30 & MMN-17    & $1.30$ & $0.12$ \\
...-S3-X31 &           & $   -$ & $0.13$ \\
...-S3-X32 & MMN-10    & $1.94$ & $0.82$ \\
...-S3-X35 &           & $   -$ & $0.27$ \\
...-S3-X36 & MEG93\,Star\,2 & $1.51$ & $0.16$ \\
...-S3-X37 &           & $   -$ & $0.30$ \\
...-S3-X38 &           & $   -$ & $   -$ \\
...-S3-X39 &           & $   -$ & $0.13$ \\
...-S3-X40 &           & $   -$ & $0.13$ \\
...-S3-X41 &           & $   -$ & $   -$ \\
...-S3-X42 &           & $   -$ & $0.11$ \\
...-S3-X43 &           & $   -$ & $0.09$ \\
...-S3-X45 &           & $   -$ & $0.15$ \\
...-S3-X47 &           & $   -$ & $0.29$ \\
...-S3-X48 &           & $   -$ & $0.29$ \\
...-S3-X50 &           & $   -$ & $   -$ \\
...-S3-X51 & SVS\,13   & $1.49$ & $0.05$ \\
...-S3-X52 & SVS\,2    & $1.40$ & $0.31$ \\
...-S3-X53 &           & $   -$ & $   -$ \\
...-S3-X56 &           & $   -$ & $0.63$ \\
...-S3-X58 &           & $   -$ & $   -$ \\
...-S2-X1 & HL85-N\,27 & $1.42$ & $0.18$ \\
...-S2-X2 &            & $   -$ & $   -$ \\
...-S2-X3 &            & $   -$ & $0.54$ \\
...-S2-X4 &            & $   -$ & $0.38$ \\
...-S2-X5 & MMN-22     & $1.32$ & $0.14$ \\
...-S2-X7 &            & $   -$ & $   -$ \\
...-S2-X8 &            & $   -$ & $   -$ \\
...-S2-X9 & SVS\,15    & $1.96$ & $0.17$ \\
...-S2-X10 &           & $   -$ & $   -$ \\
...-S2-X14 &           & $   -$ & $   -$ \\
\hline 
\end{tabular}
\end{table}