\begin{table}%t1
%\centering
\par
\caption{\label{tab:percvar}Percentual variation in the total integrated flux of \object{M31} due to the resampling procedure.}
\small\begin{tabular}{c c c} 
\hline\hline 
Band (${\mu}$m) & Resampled to $24~\mu$m (\%) & Resampled to 160~$\mu$m ($\%$) \\ 
\hline 
3.6 & 2 & 2   \\ 
7.9 & 3 & 2   \\
24  & -- & 0.8 \\
70  & -- & 0.6 \\
160 & -- & --   \\
\hline 
\end{tabular}
\end{table}