\begin{table}%t9
\caption{\label{tab:kapgam}Convergence ($\kappa$), shear ($\gamma$), and magnification~($\mu$) shown by the potential (SIE+$\gamma$) at the location of each lens plane image.}
\small%\centerline
 {
\begin{tabular}{ c  c  c  c  c}
\hline\hline
Image&$\kappa$&$\gamma$&$\mu$&Fl. Ratio (/B)\\
\hline
A&0.472&0.508&47&0.70\\
B&0.509&0.506&67&1.00\\
C&0.498&0.469&31&0.46\\
D&0.548&0.525&14&0.21\\
\hline
\end{tabular}}
\medskip
The last column shows the flux ratio of each image with respect to image B inferred for the magnification values~$\mu$.
\end{table}