\begin{table}%t5
\caption{\label{flratios}Flux ratios of the AGN images calculated with the magnitude values shown in Table~\ref{galfitqso}.}
%\centering
\small
\begin{tabular}{c c c c c}
\hline\hline
Date  & Filter &A/B & C/B &D/B\\
\hline
2004/04/08&{\it F814W}&0.47 $\pm$ 0.03&1.06 $\pm$ 0.04&0.23 $\pm$ 0.02\\
2008/01/07&{\it F606W}&0.39 $\pm$ 0.03&0.79 $\pm$ 0.05&0.17 $\pm$ 0.03\\
\hline
\end{tabular}
\end{table}