\begin{table}%t4
\caption{\label{galfitqso}Photometry of the lensed AGN images in COSMOS~5921+0638, magnitude values. Images labeled as in Fig.~\ref{hst}.}
\par
%\centering
\small
\begin{tabular}{c c c c c}
\hline\hline
   Filter &A & B &C &D\\
\hline
{\it F606W}&25.60 $\pm$ 0.08&24.57 $\pm$ 0.04&24.83 $\pm$ 0.06&26.50 $\pm$ 0.18\\
{\it F814W}&25.42 $\pm$ 0.06&24.59 $\pm$ 0.03&24.53 $\pm$ 0.03&26.19 $\pm$ 0.10\\
\hline
\end{tabular}
\end{table}