\begin{table}%t2
\caption{\label{forsztab}Galaxies with measured redshifts from the FORS1 observations. The measured errors for the redshifts are $\Delta$~$z=10^{-3}$.}
%\centering
\small
\begin{tabular}{c c c}
\hline
\hline
 RA & Dec & $z$\\
 \hline
09:59:09.69&02:07:53.6&0.353\\
09:59:12.21&02:08:25.4&0.354\\
09:59:12.39&02:06:56.4&0.352\\
09:59:12.41&02:07:51.2&0.352\\
09:59:14.44&02:07:26.0&0.355\\
09:59:15.59&02:06:12.0&0.602\\
09:59:21.79&02:06:38.7&0.551\\
09:59:30.27&02:04:22.0&0.687\\
09:59:32.69&02:06:08.8&0.527\\
09:59:33.24&02:05:47.6&0.312\\
\hline
\end{tabular}
\end{table}