\begin{table}%t4
\caption{\label{tab:fluxes}Estimated fluxes for each component from the model fitting of Sect.~\ref{sect:modelfitting}. }
%\centerline
 {\small \begin{tabular}{lcccccc}
 \hline   \hline  
Band or $\lambda$ & Primary & Background & Secondary \\
(total value) & (W/m$^2$/$\mu$m) & (W/m$^2$/$\mu$m) &  (W/m$^2$/$\mu$m) \\
\hline\noalign{\smallskip}
$H$ (4.8~mag)  & $8.5\times10^{-12}$ & $1.6\times10^{-12}$ & $3.7\times10^{-12}$ \\
$K$ (3.5~mag)  & $1.2\times10^{-11}$ & $1.5\times10^{-12}$ & $3.1\times10^{-12}$\\
8.1~$\mu$m (92~Jy)   & $7.2\times10^{-13}$ & $2.9\times10^{-12}$  & $5.9\times10^{-13}$ \\
10.5~$\mu$m (146~Jy) & $3.5\times10^{-13}$ & $3.0\times10^{-12}$ & $6.0\times10^{-13}$ \\
12.9~$\mu$m (126~Jy) & $1.4\times10^{-13}$  & $1.7\times10^{-12}$  & $4.3\times10^{-12}$ \\
\hline
\end{tabular}}
\medskip
We used 2MASS magnitudes as the
total magnitude in $H$ and \mbox{$K$-band} and the MIDI fluxes in $N$-band.
\end{table}