\begin{table}%t5
\caption{\label{tab:biaslimits}The ${\Delta m^{{\rm evo}}}_{\vert1.7}$-intervall in which the fit parameters are reconstructed without biases.}
%\centering
\small
\begin{tabular}{@{\extracolsep{\fill}}r|ccc}
\hline
\hline
& \multicolumn{3}{c}{Validity zone}\\
model & $\Omega_{{\rm M}}$ & $w_0$ & $w_{{a}}$ \\
\hline
$1$      & $[\;-0.04,0.04\;]$ & $[\;-0.08,1.18\;]$ & $[\;-0.28,0.15\;]$ \\
$2.1$    & $[\;-0.04,0.04\;]$ & $[\;-0.08,0.13\;]$ & $[\;-0.27,0.27\;]$ \\
$2.2$    & $[\;-0.03,0.05\;]$ & $[\;-0.10,0.37\;]$ & $[\;-0.39,0.09\;]$ \\
$2.3$    & $[\;-0.06,0.09\;]$ & $[\;-0.17,0.09\;]$ & $[\;-0.06,0.06\;]$ \\
\hline
\end{tabular}
\end{table}