\begin{table}
\caption{\label{tab:results}Model fits with centered dipole and offset dipole models with comparison to literature values. The columns indicate the SDSS name of the object; the plate, Modified Julian Date and fiber ids of the observations; the dipole magnetic field strength of the centered dipole, the inclination with respect to the line of sight of the centered dipole, the dipole magnetic field strength of the offset dipole, the inclination with respect to the line of sight of the offset dipole, the offset along the axis of the magnetic field in terms of the stellar radius, and finally comments indicate the model parameters from the literature \cite[i.e. ][]{Gaensickeetal02, Schmidtetal03, Vanlandinghametal05}}
\begin{tabular}{lrcccccl}
\hline\hline
MWD (SDSS+) & Plate-MJD-FiberID & $B_{\rm p}$/MG  &  $i$/deg& $B_{\rm off}$/MG  & $z_{\rm off}$/$r_{\rm WD}$ & $i$/deg & fits\\
\hline
J002129.00+150223.7 & 753-52233-432 & $530.69 \pm 63.56$ & $ 53.19 \pm 25.64 $ & $527.33 \pm 97.98$ & $0.16 \pm 0.08$ & $ 28.05 \pm 51.8 $ & 550 MG, \dots\\
J004248.19+001955.3 & 690-52261-594 & $2.00\pm0.00$$^2$ & $ 88.22 \pm 43.37 $ & $2.58$$^1$ & $0.35 \pm 0.82$ & $ 0.00\pm 23.66 $ & 14 MG, 30${}^{\circ}$\\
J021116.34+003128.5 & 405-51816-382 & $341.31 \pm 54.34$ & $ 37.73 \pm 27.71 $ & $281.34 \pm 186.95$ & $0.32 \pm 0.14$ & $ 9.59 \pm 62.99 $ & 490 MG, \dots\\
J021148.22+211548.2 & 246-53327-048 & $166.16 \pm 7.41$ & $ 48.89 \pm 5.67 $ & $180.47 \pm 13.15$ & $0.27 \pm 0.02$ & $ 33.23 \pm 10.05 $ & 210 MG, 90${}^{\circ}$\\
J023420.63+264801.7 & 2399-53764-559 & $32.82 \pm 6.26$ & $42.08 \pm 8.09$ & $21.17 \pm 2.02$ & $0.38 \pm 0.04$ & $17.17 \pm 10.92$ & \\
J030407.40-002541.7 & 411-51817-172 & $10.95 \pm 0.98$ & $ 48.57 \pm 5.72 $ & $11.13 \pm 0.97$ & $0.27 \pm 0.10$ & $ 51.51 \pm 17.26 $ & 11 MG, 60${}^{\circ}$\\			
J031824.19+422651.0 & 2417-53766-568 & $10.12 \pm 0.10$	&$54.6\pm4.7$ & $10.77 \pm 0.10$ & $0.29 \pm 0.05$	&$61.1\pm10.0$ &  \\
J032628.17+052136.3 & 2339-53729-515 & $16.87 \pm 2.41$ & $53.06 \pm 26.65$ & $17.49 \pm 8.32$ & $0.34 \pm 0.12$ & $44.62 \pm 42.63$ & \\
J033145.69+004517.0 & 415-51879-378 & $13.13 \pm 1.00$ & $ 49.41 \pm 38.17 $ & $12.12 \pm 9.98$ & $0.21 \pm 0.02$ & $ 47.43 \pm 38.49 $ & 12 MG, 60${}^{\circ}$\\			
J033320.36+000720.6 & 0415-51879-485 & $849.30 \pm 51.75$ & $50.92 \pm 8.75$ & $784.22 \pm 83.98$ & $0.19 \pm 0.05$ & $6.29 \pm 6.42$ & \\
J034308.18-064127.3 & 462-51909-117 & $9.96 \pm 2.06$ & $ 41.96 \pm 9.80 $ & $9.18 \pm 2.11$ & $0.23 \pm 0.04$ & $ 12.59 \pm 8.55 $ & 13 MG, 45\\
J034511.11+003444.3 & 416-51811-590 & $1.96 \pm 0.42$ & $ 49.01 \pm 11.56 $ & $1.46 \pm 0.36$ & $0.34 \pm 0.08$ & $ 16.38 \pm 6.43 $ & 1.5 MG, 0${}^{\circ}$\\			
J074850.48+301944.8 & 889-52663-507 & $6.75 \pm 0.41$ & $ 40.65 \pm 7.59 $ & $8.03 \pm 0.66$ & $0.40\pm 0.14$ & $ 43.85 \pm 10.55 $ & 10 MG, 60${}^{\circ}$\\			
J074924.91+171355.4 & 2729-54419-282 & $13.99 \pm 1.30$ & $46.00 \pm 15.07$ & $13.62 \pm 1.86$ & $0.27 \pm 0.05$ & $44.02 \pm 53.16$ & \\
J075234.96+172525.0 & 1920-53314-106 & $10.30 \pm 1.23$	&$72.4\pm22.4$ & $11.73 \pm 1.05$ & $0.26 \pm 0.05$	&$58.7\pm38.1$ &  \\
J075819.57+354443.7 & 757-52238-144 & $26.40\pm 3.94$ & $ 37.62 \pm 22.98 $ & $32.42 \pm 5.65$ & $0.39 \pm 0.07$ & $ 54.51 \pm 19.44 $ & 27 MG, 30${}^{\circ}$\\
J080359.93+122944.0 & 2265-53674-033 &$40.7 \pm 2.13$& $42.97\pm8.44$ &$ 26.6\pm 11.8$&
$0.26 \pm 0.04$  &$17.71\pm7.21$ &\\
J080440.35+182731.0 & 2081-53357-442 & $48.47 \pm 2.93$ & $ 35.67 \pm 7.59 $ & $29.26 \pm 3.18$ & $0.16 \pm 0.02$ & $ 33.97 \pm 8.47 $ & 49 MG, 30${}^{\circ}$\\			
J080502.29+215320.5 & 1584-52943-132 & $6.11 \pm 1.29$ & $ 54.76 \pm 14.52 $ & $3.13 \pm 0.59$ & $0.39 \pm 0.06$ & $ 86.79 \pm 59.37 $ & 5 MG, 60${}^{\circ}$\\			
J080743.33+393829.2 & 545-52202-009 & $65.75 \pm 18.52$ & $ 78.07 \pm 35.46 $ & 
$64.74 \pm 12.14$ & $-0.01 \pm 0.01$ & $ 8.25 \pm 17.26 $ & 49 MG, 30${}^{\circ}$\\		
J080938.10+373053.8 & 758-52253-044 & $39.74 \pm 5.41$ & $ 41.89 \pm 14.11 $ & $30.60\pm 5.66$ & $0.20\pm 0.10$ & $ 15.15 \pm 75.23 $ & 40 MG, 30${}^{\circ}$\\			
J081648.71+041223.5 & 1184-52641-329 & $10.13 \pm 8.03$ & $ 48.82 \pm 29.96 $ & $6.50\pm 2.73$ & $0.31 \pm 0.12$ & $ 0.28 \pm 27.06 $ & 10* MG, 30*${}^{\circ}$\\
J081716.39+200834.8 & 2082-53358-444 &$3.37 \pm 0.44$& $49.02\pm10.78$ &$ 3.37\pm 1.09$& $0.39 \pm 0.10$ & $34.05\pm30.78$&\\
J082835.82+293448.7 & 1207-52672-635 & $33.40\pm 10.53$ & $ 68.57 \pm 33.47 $ & $34.60\pm 6.91$ & $0.17 \pm 0.05$ & $ 50.3 \pm 36.21 $ & 30 MG, 90*${}^{\circ}$\\			
J083448.63+821059.1 & 2549 54523 135 &$14.44\pm4.57$& $54.30\pm66.45$ &$14.36\pm4.08$&$0.28\pm0.09$& $48.58\pm70.00$&\\
J083945.56+200015.7 & 2277-53705-484 & $3.38 \pm 0.49$	&$48.6\pm7.7$ & $2.15 \pm 0.10$ & $0.29 \pm 0.08$	&$49.9\pm90$$^1$ &  \\
J084155.74+022350.6 & 564-52224-248 & $5.00\pm 0.99$ & $ 49.35 \pm 17.53 $ & $2.94 \pm 0.72$ & $0.16 \pm 0.04$ & $ 15.89 \pm 10.57 $ & 6 MG, 90${}^{\circ}$\\
%J084716.21+484220.4 & 550-51959-629 & - & - & - & - & - & 3 MG, \dots\\
J085106.12+120157.8 & 2430-53815-229 & $2.03 \pm 0.10$	&$81.9\pm90$$^1$ & 
$2.47 \pm 0.10$ & $0.35 \pm 0.06$	&$72.8\pm18.8$ & \\
J085523.87+164059.0 & 2431-53818-522 & $12.23 \pm 2.92$	&$48.6\pm8.6$ & $7.86 \pm 1.63$ & $0.36 \pm 0.06$	&$10.8\pm6.1$ &  \\
J085550.67+824905.3 & 2549 54523 066 &$10.82\pm2.99 $& $54.81\pm19.36$ &$12.13\pm4.30$&$62.89\pm36.38$&$ 0.30\pm0.14 $ &\\
J085830.85+412635.1 & 830-52293-070 & $3.38 \pm 0.19$ & $ 48.85 \pm 5.86 $ & $2.15 \pm 0.34$ & $0.24 \pm 0.07$ & $ 36.25 \pm 7.31 $ & 2 MG, 30${}^{\circ}$\\			
J090632.66+080716.0 & 1300-52973-148 & $5.98\pm3.02$ & $88.00\pm88.06$ & $5.97\pm3.13$ & $0.18\pm0.13$ & $65.13\pm82.65$ & 10 MG, 90${}^{\circ}$\\
J090746.84+353821.5 & 1212-52703-187 & $22.40\pm 8.80$ & $ 48.57 \pm 16.68 $ & $11.91 \pm 3.22$ & $0.26 \pm 0.08$ & $ 1.77 \pm 2.72 $ & 15 MG, 60${}^{\circ}$\\			
J091005.44+081512.2 & 1300-52973-639 &$1.01\pm0.00$$^2$& $74.46\pm42.54$ &$1.27\pm0.70$&$71.06\pm32.03$&$0.35\pm0.29$ &\\
J091124.68+420255.9 & 1200-52668-538 & $35.20\pm 5.83$ & $ 35.1 \pm 39.48 $ & $18.85 \pm 4.86$ & $0.23 \pm 0.06$ & $ 14.23 \pm 10.72 $ & 45 MG, 60${}^{\circ}$\\			
J091437.40+054453.3 & 1193-52652-481 & $9.16 \pm 0.77$ & $ 48.52 \pm 4.56 $ & $8.93 \pm 0.93$ & $0.38 \pm 0.04$ & $ 48.35 \pm 19.7 $ & 9.5 MG, 90${}^{\circ}$\\			
J091833.32+205536.9 & 2288-53699-547 & $2.04 \pm 0.10$	&$87.2\pm41.9$ & $2.66 \pm 1.71$ & $0.39 \pm 0.17$	&$70.3\pm61.9$ &  \\
J092527.47+011328.7 & 475-51965-315 & $2.04\pm0.00$$^2$ & $ 54.83 \pm 14.14 $ & $3.14 \pm 1.10$ & $0.33 \pm 0.13$ & $ 47.34 \pm 14.08 $ & 2.2 MG, \dots\\			
J093356.40+102215.7 & 1303-53050-525 & $2.11 \pm 0.49$ & $ 72.05 \pm 22.68 $ & $2.47\pm0.00$$^2$ & $0.37 \pm 0.12$ & $ 52.39 \pm 29.38 $ & 1.5 MG, 60*${}^{\circ}$\\			
J093409.90+392759.3 & 1215-52725-241  &$1.01\pm0.00$$^2$& $81.18\pm23.30$ &$ 1.35\pm 0.25$& $57.43\pm29.65$ &$ 0.39\pm 0.13$ & \\
J093447.90+503312.2 & 901-52641-373 & $7.35 \pm 2.21$ & $ 54.61 \pm 37.93 $ & $4.29 \pm 1.06$ & $0.28 \pm 0.07$ & $ 46.87 \pm 49.83 $ & 9.5 MG, 60${}^{\circ}$\\
J094235.02+205208.3 & 2292-53713-019 & $39.21 \pm 4.55$ & $3.73 \pm 1.64$ & $37.94 \pm 9.07$ & $0.04 \pm 0.02$ & $1.24 \pm 13.74$ & \\
J094458.92+453901.2 & 1202-52672-577 & $15.91 \pm 9.10$ & $ 68.35 \pm 44.53 $ & $17.41 \pm 7.12$ & $0.34 \pm 0.14$ & $ 61.00 \pm 90$$^1$ & 14 MG, 90${}^{\circ}$\\			
J100005.67+015859.2 & 500-51994-557 & $19.74 \pm 10.26$ & $ 48.5 \pm 33.13 $ & $8.10\pm 3.23$ & $0.34 \pm 0.13$ & $ 4.21 \pm 90$$^1$ & 20 MG, 30${}^{\circ}$\\			
J100356.32+053825.6 & 996-52641-295 & $672.07 \pm 118.63$ & $ 40.8 \pm 34.86 $ & $667.67 \pm 131.71$ & $0.08 \pm 0.05$ & $ 36.67 \pm 23.11 $ & 900* MG, \dots\\
J100657.51+303338.1 & 1953-53358-415 & $1.00 \pm 0.10$	&$82.5\pm30.8$ & $1.30 \pm 1.23$ & $-0.37 \pm 0.39$	&$14.3\pm13.1$ &  \\
J100715.55+123709.5 & 1745-53061-313 & $5.41 \pm 67.28$ & $ 68.6 \pm 31.88 $ & $6.01 \pm 2.55$ & $0.40\pm 0.22$ & $ 50.7 \pm 90$$^1$ & 7 MG, 60${}^{\circ}$\\			
J100759.80+162349.6 & 2585 54097 030 &$19.18\pm3.36$&$42.02\pm17.48$&$13.50\pm2.92$&$-0.22\pm0.05$ & $33.31\pm21.38$&\\
J101428.09+365724.3 & 1954-53357-393 & $11.09 \pm 1.50$ & $48.75 \pm 11.72$ & $12.14 \pm 2.71$ & $0.05 \pm 0.04$ & $56.81 \pm 34.40$ & \\
J101529.62+090703.8 & 1237-52762-533 & $4.09 \pm 0.86$ & $ 49 \pm 15.27 $ & $1.98 \pm 0.35$ & $0.26 \pm 0.08$ & $ 1.48 \pm 60.69 $ & 5* MG, 90*${}^{\circ}$\\			
J101618.37+040920.6 & 574-52355-166 & $2.01\pm0.00$$^2$ & $ 88.16 \pm 104.01 $ & $7.24 \pm 4.77$ & $0.19 \pm 0.16$ & $ 60.55 \pm 63.4 $ & 7.5 MG, 30${}^{\circ}$\\			
J101805.04+011123.5 & 503-51999-244 & $99.92\pm5.90$ & $27.24\pm6.16 $ & $39.87 \pm 2.25$ & $0.26 \pm 0.02$ & $14.85 \pm 3.17 $ & 120 MG, \dots\\
J102220.69+272539.8 & 2350-53765-543 &$4.91\pm0.31 $& $27.58\pm30.65$ &$ 5.79\pm2.82 $& $ 0.39\pm0.27 $ & $54.97\pm35.63$&\\
J102239.06+194904.3 & 2374-53765-544 & $2.94 \pm 0.71$	&$49.0\pm13.0$ & $3.87 \pm 1.11$ & $0.40 \pm 0.07$	&$51.3\pm40.3$ & \\
J103532.53+212603.5 & 2376-53770-534 &$2.96\pm 0.33$& $49.01\pm9.51$ &$ 1.515\pm 0.313$&  $ 0.39\pm0.05 $& $0.00\pm57.44$&\\
J105404.38+593333.3 & 561-52295-008 & $17.41 \pm 7.90$ & $ 90.0 \pm 25.54 $ & $17.60 \pm 10.22$ &  $ 0.16 \pm 0.05 $& $67.59 \pm 59.48$ & 17 MG, 90${}^{\circ}$\\			
J105628.49+652313.5 & 490-51929-205 & $29.27 \pm 5.78$ & $ 41.74 \pm 15.24 $ & $20.80\pm 4.10$ & $0.29 \pm 0.54$ & $ 5.27 \pm 12.8 $ & 28 MG, 60${}^{\circ}$\\			
J105709.81+041130.3 & 580-52368-274 &$2.03\pm0.00$$^2$& $48.99\pm7.70$  &$2.48\pm0.0$& $41.40\pm13.13$  &$0.38\pm0.06$ &  \\
J111010.50+600141.4 & 950-52378-568 & $6.37 \pm 2.32$ & $ 68.6 \pm 16.26 $ & $6.71 \pm 1.58$ & $0.39 \pm 0.08$ & $ 49.08 \pm 18.99 $ & 6.5 MG, 70${}^{\circ}$\\			
J111812.67+095241.3 & 1222-52763-477 & $3.38 \pm 0.72$ & $ 48.14 \pm 32.44 $ & $2.67 \pm 0.60$ & $0.40\pm 0.10$ & $ 51.09 \pm 43.5 $ & 6 MG, 60*${}^{\circ}$\\		
J112030.34-115051.1 & 2874-54561-512 & $8.90 \pm 1.02$ & $50.37 \pm 20.24$ & $7.72 \pm 1.24$ & $0.35 \pm 0.10$ & $38.69 \pm 34.08$ & \\
J112257.10+322327.8 & 1979-53431-512 & $11.38 \pm 3.42$	&$49.0\pm12.3$ & $7.46 \pm 1.68$ & $0.37 \pm 0.11$	&$4.2\pm6.3$ &  \\
J112328.49+095619.3 & 1222-52763-625 &$1.21\pm$$^2$& $81.18\pm17.28$ &$ 1.50\pm 0.36$& $0.39\pm 0.06$ &$ 50.93\pm90$$^1$ &\\
J112852.88-010540.8 & 326-52375-565 & $2.00\pm0.00$$^2$ & $ 89.4 \pm 85.15 $ & $2.30\pm 5.02$ & $0.20\pm 0.14$ & $ 23.15 \pm 30.18 $ & 3 MG, 60${}^{\circ}$\\		
J112926.23+493931.8 & 966-52642-474 & $5.31 \pm 0.64$ & $ 48.72 \pm 6.34 $ & $2.43 \pm 0.33$ & $0.39 \pm 0.09$ & $ 7.04 \pm 12.45 $ & 5 MG, 60${}^{\circ}$\\
%J112926.23+493931.8 & 966-52642-474  &$5.23 \pm 1.38$& $49.03\pm5.64$ &$5.77\pm0.14$& $0.39 \pm 0.09$ &$50.32\pm28.15$& \\	
J113215.38+280934.3 & 2219-53816-329 &$3.01\pm0.82$&$49.00\pm17.43$ &$2.84\pm0.43$&$0.39\pm0.049$ &$18.60\pm5.56$&\\
J113357.66+515204.8 & 879-52365-586 & $8.64 \pm 0.78$ & $ 74.55 \pm 19.87 $ & $7.69 \pm 0.69$ & $0.39 \pm 0.04$ & $ 47.91 \pm 19.99 $ & 7.5 MG, 90${}^{\circ}$\\		
J113756.50+574022.4 & 1311-52765-421 & $5.00\pm 0.34$ & $ 33.45 \pm 9.92 $ & $2.83 \pm 0.25$ & $0.17 \pm 0.01$ & $ 0.07 \pm 0.06 $ & 9 MG, 60*${}^{\circ}$\\		
J113839.51-014903.0 & 327-52294-583 & $22.71 \pm 1.26$ & $ 54.31 \pm 14.41 $ & $24.09 \pm 1.92$ & $0.21 \pm 0.04$ & $ 50.16 \pm 61.4 $ & 24 MG, 60${}^{\circ}$\\		
J114006.37+611008.2 & 776-52319-042 & $50.19 \pm 17.78$ & $ 21.8 \pm 42.46 $ & $52.82 \pm 8.82$ & $0.04 \pm 0.02$ & $ 36.88 \pm 50.59 $ & 58 MG, 20${}^{\circ}$\\		
J114829.00+482731.2 & 1446-53080-324 & $32.47 \pm 7.11$ & $ 80.89 \pm 45.93 $ & $32.44 \pm 2.70$ & $0.17 \pm 0.09$ & $ 69.98 \pm 33.06 $ & 33 MG, 90${}^{\circ}$\\		
J115418.14+011711.4 & 515-52051-126 & $33.47 \pm 2.07$ & $ 88.14 \pm 23.62 $ & $25.72 \pm 2.51$ & $0.10\pm 0.03$ & $ 76.03 \pm 32.13 $ & 32 MG, 45	\\		
J115917.39+613914.3 & 777-52320-69 & $20.10\pm 6.70$ & $ 50.63 \pm 62.9 $ & $10.14 \pm 6.89$ & $0.30\pm 0.07$ & $ 50.63 \pm 62.9 $ & 15.5 MG, 60${}^{\circ}$\\	
J120150.10+614257.0 & 778-52337-264 & $11.35 \pm 1.53$ & $ 28.04 \pm 10.98 $ & $7.60\pm 0.87$ & $0.16 \pm 0.02$ & $ 18.59 \pm 12.62 $ & 20 MG, 90${}^{\circ}$\\	
J120609.80+081323.7 & 1623-53089-573 & $760.63 \pm 281.66$ & $ 30.74 \pm 36.38 $ & 
$312.24 \pm 73.90$ & $0.24 \pm 0.13$ & $ 25.69 \pm 24.66 $ & 830* MG, \dots	\\		
J120728.96+440731.6 & 1369-53089-048 & $2.03\pm0.00$$^2$ & $ 73.01 \pm 29.93 $ & $2.07\pm0.00$$^2$ & $-0.27 \pm 0.59$ & $ 10.16 \pm 21.53 $ & 2.5 MG, 90${}^{\circ}$\\	
J121209.31+013627.7 & 518-52282-285 & $10.12 \pm 0.93$ & $ 48.8 \pm 4.69 $ & $10.38 \pm 1.02$ & $0.29 \pm 0.05$ & $ 40.65 \pm 13.27 $ & 13 MG, 80${}^{\circ}$\\		
J121635.37-002656.2 & 288-52000-276 & $59.70\pm 10.23$ & $ 37.85 \pm 37.52 $ & $44.57 \pm 7.18$ & $-0.06 \pm 0.01$ & $ 20.15 \pm 30.89 $ & 61 MG, 90${}^{\circ}$\\		
J122209.44+001534.0 & 289-51990-349 & $14.70\pm 4.70$ & $ 82.52 \pm 90$$^1$ & $16.27 \pm 11.39$ & $0.24 \pm 0.31$ & $ 82.52 \pm 90$$^1$ & 14 MG, 80${}^{\circ}$\\		
J122249.14+481133.1 & 1451-53117-582 & $8.05 \pm 2.24$ & $ 56.67 \pm 13.05 $ & $8.70\pm 3.90$ & $-0.38 \pm 0.08$ & $ 53.05 \pm 18.28 $ & 8 MG, 90*${}^{\circ}$\\	
J122401.48+415551.9 & 1452-53112-181 & $22.36 \pm 3.02$ & $ 66.08 \pm 23.71 $ & $24.75 \pm 5.76$ & $0.26 \pm 0.06$ & $ 58.28 \pm 23.89 $ & 23* MG, 60${}^{\circ}$\\	
J123414.11+124829.6 & 1616-53169-423 & $4.32 \pm 0.27$ & $ 49.35 \pm 9.82 $ & $2.40\pm 0.56$ & $0.40\pm 0.05$ & $ 9.99 \pm 2.72 $ & 7 MG, 60*${}^{\circ}$\\	
J124806.38+410427.2 & 1456-53115-190 & $7.03 \pm 1.19$ & $ 48.81 \pm 9.27 $ & $3.61 \pm 0.47$ & $0.29 \pm 0.06$ & $ 5.5 \pm 10.08 $ & 8 MG, 90${}^{\circ}$\\	
J124836.31+294231.2 & 2457-54180-112 & $3.95 \pm 0.25$ & $48.93 \pm 4.93$ & -- & -- &  -- & \\
J124851.31-022924.7 & 337-51997-264 & $7.36 \pm 2.19$ & $ 48.9 \pm 10.11 $ & $8.01 \pm 1.46$ & $0.40\pm 0.09$ & $ 49.97 \pm 27.39 $ & 7 MG, 40${}^{\circ}$\\	
J125044.42+154957.4 & 1770-53171-530 & $20.71 \pm 3.66$ & $ 56.7 \pm 11.21 $ & $20.30\pm 2.43$ & $0.12 \pm 0.02$ & $ 53.83 \pm 38.18 $ & 20 MG, 60${}^{\circ}$\\	
J125416.01+561204.7 & 1318-52781-299 & $38.86 \pm 9.03$ & $ 20.97 \pm 40.41 $ & $36.98 \pm 9.20$ & $0.01 \pm 1e+99$  & $ 10.25 \pm 21.24 $ & 52 MG, 30${}^{\circ}$\\	
J125434.65+371000.1 & 1989-53772-041 & $4.10 \pm 0.35$	&$41.9\pm19.2$ & $4.89 \pm 0.42$ & $0.40 \pm 0.03$	&$50.1\pm21.0$ & \\
J125715.54+341439.3 & 2006-53476-332 & $11.45 \pm 0.71$	&$0.5\pm0.6$ & $13.70 \pm 1.69$ & $0.07 \pm 0.02$	&$7.7\pm12.0$ &  \\
%J131508.96+093713.8 & 1798-53851-233 &$46.69\pm2.28$&$41.73\pm4.26$&$ 15.61\pm 1.82$& $ 0.39\pm0.03$ &$17.25\pm7.92$ &\\
J132002.48+131901.6 & 1773-53112-011 & $2.02\pm0.00$$^2$ & $ 88.21 \pm 80.46 $ & $2.64 \pm 4.88$ & $-0.38 \pm 0.52$ & $ 6.99 \pm 35.73 $ & 5 MG, 60${}^{\circ}$\\	
J133340.34+640627.4 & 603-52056-112 & $10.71 \pm 1.03$ & $ 50.29 \pm 11.45 $ & $13.81 \pm 1.36$ & $0.38 \pm 0.07$ & $ 55.7 \pm 24.63 $ & 13 MG, 60${}^{\circ}$\\	
J134043.10+654349.2 & 497-51989-182 & $4.32 \pm 0.76$ & $ 49.04 \pm 9.75 $ & $5.28 \pm 1.07$ & $0.40\pm 0.06$ & $ 34.03 \pm 6.8 $ & 3 MG, 60${}^{\circ}$\\	
J134820.79+381017.2 & 2014-53460-236 & $13.65 \pm 2.66$	&$89.4\pm90$$^1$ & $14.45 \pm 4.65$ & $0.22 \pm 0.04$	&$54.8\pm25.3$ &  \\
J135141.13+541947.4 & 1323-52797-293 & $761.00\pm 56.42$ & $ 74.18 \pm 21.65 $ & 
$772.73 \pm 94.41$ & $-0.03 \pm 0.01$ & $ 68.25 \pm 62.04 $ & 760 MG, 20${}^{\circ}$\\		
J140716.66+495613.7 & 1671-53446-453 & $12.49 \pm 6.20$	&$88.1\pm90$$^1$ & $13.20 \pm 4.21$ & $0.24 \pm 0.10$	&$63.3\pm81.1$ & \\
J141906.19+254356.5 & 2131-53819-317 & $2.03 \pm 0.10$	&$81.2\pm8.7$ & $2.56 \pm 0.10$ & $0.38 \pm 0.03$	&$54.8\pm10.4$ & \\
J142703.40+372110.5 & 1381-53089-182 & $27.04 \pm 3.20$ & $ 56.89 \pm 12.61 $ & $30.59 \pm 2.34$ & $0.20\pm 0.02$ & $ 6.39 \pm 22.5 $ & 30 MG, 60*${}^{\circ}$\\	
J143019.05+281100.8 & 2134-53876-423 & $9.34 \pm 1.44$	&$5.6\pm4.5$ & $6.25 \pm 0.75$ & $0.16 \pm 0.03$	&$5.6\pm4.5$ &  \\
J143218.26+430126.7 & 1396-53112-338 & $1.01\pm0.00$$^2$& $ 78.3 \pm 90$$^1$ & $1.48 $$^1$ & $-0.39\pm 0.56$ & $ 55.37 \pm 81.19 $ & 1.5 MG, 90${}^{\circ}$\\	
J143235.46+454852.5 & 1288-52731-449 & $12.29 \pm 6.98$ & $ 50.62 \pm 88.7 $ & $13.08 \pm 4.78$ & $0.40\pm 0.11$ & $ 25.84 \pm 33.41 $ & 10 MG, 30${}^{\circ}$\\
J144614.00+590216.7 & 608-52081-140 & $4.42 \pm 3.79$ & $ 48.9 \pm 31.58 $ & $2.18\pm0.00$$^2$ & $0.40\pm 0.26$ & $ 4.72 \pm 13.13 $ & 7 MG, 70${}^{\circ}$\\
J145415.01+432149.5 & 1290-52734-469 & $2.35 \pm 0.88$ & $ 49.04 \pm 17.87 $ & $2.15 \pm 1.09$ & $0.27 \pm 0.11$ & $ 53.38 \pm 22.89 $ & 5 MG, \dots	\\
J150813.20+394504.9 & 1398-53146-633 & $13.23 \pm 3.11$ & $ 37.55 \pm 4.17 $ & $7.96 \pm 0.76$ & $0.40\pm 0.04$ & $ 24.68 \pm 5.61 $ & 20 MG, 90${}^{\circ}$\\	
J151130.17+422023.0 & 1291-52735-612 & $22.40 \pm 9.41$ &$48.6\pm19.5$ & $8.37 \pm 1.07$ & $0.31 \pm 0.06$ &$5.8\pm21.1$ &  12 MG, 60${}^{\circ}$\\
J151415.65+074446.5 & 1817-53851-534 &$35.34\pm2.80$&$56.59\pm17.23$&$35.88\pm3.75$&$0.12\pm0.043$ & $56.08\pm22.18$ &\\
J151745.19+610543.6 & 613-52345-446 & $13.98 \pm 7.36$ & $ 60.07 \pm 196.18 $ & $6.07 \pm 3.24$ & $0.23 \pm 0.35$ & $ 24.86 \pm 47.72 $ & 17 MG, 30${}^{\circ}$\\	
J152401.60+185659.2 & 2794-54537-410 & $11.96 \pm 1.85$ & $41.53 \pm 8.79$ & $10.27 \pm 3.12$ & $0.11 \pm 0.02$ & $33.40 \pm 6.58$ & \\
J153532.25+421305.6 & 1052-52466-252 & $5.27 \pm 4.05$ & $ 0.35 \pm 41.68 $ & $9.05 \pm 5.27$ &   $-0.29 \pm 0.12$& $ 0.13 \pm 0.37 $ & 4.5 MG, 60${}^{\circ}$\\		
J153829.29+530604.6 & 795-52378-637 & $13.99 \pm 3.82$ & $ 48.96 \pm 15.69 $ & $15.99 \pm 3.03$ & $0.36 \pm 0.11$ & $ 53.36 \pm 29.05 $ & 12 MG, 30${}^{\circ}$\\	
J153843.10+084238.2 & 1725 54266 297 &$13.20\pm4.34$& $41.09\pm90$$^1$ &$9.63\pm$&$24.98\pm34.53$&$ 0.33\pm0.08 $ &\\
J154213.48+034800.4 & 594-52045-400 & $8.35 \pm 2.60$ & $ 54.34 \pm 35.5 $ & $8.25 \pm 2.72$ & $0.19 \pm 0.16$ & $ 44.48 \pm 30.63 $ & 8 MG, 60${}^{\circ}$\\	
J154305.67+343223.6 & 1402-52872-145 & $4.09 \pm 2.67$ & $62.06 \pm 158.24$ & $4.02 \pm 1.09$ & $0.20 \pm 0.06$ & $62.67 \pm 22.69$ & \\
J160437.36+490809.2 & 622-52054-330 & $59.51 \pm 4.64$ & $ 40.83 \pm 28.87 $ & $38.36 \pm 3.61$ & $0.14 \pm 0.02$ & $ 7.95 \pm 10.24 $ & 53 MG, 0${}^{\circ}$\\	
J164357.02+240201.3 & 1414-53135-191 & $2.00\pm0.00$$^2$ & $ 88.01 \pm 56.93 $ & $2.41 \pm 10.10$ & $-0.34 \pm 0.99$ & $ 18.54 \pm 33.29 $ & 4 MG, 90${}^{\circ}$\\	
J164703.24+370910.3 & 818-52395-026 & $2.10\pm 0.67$ & $ 68.39 \pm 18.11$ & $2.15 \pm 1.21$ & $0.28 \pm 0.10$ & $ 72.53 \pm 18.41$ & 2* MG, 90*${}^{\circ}$\\									
J165029.91+341125.5 & 1175-52791-482 & $3.38 \pm 0.67$ & $ 48.78 \pm 13.64 $ & $3.92 \pm 1.05$ & $0.40\pm 0.12$ & $ 57.74 \pm 32.5 $ & 3* MG, 	0*${}^{\circ}$\\
J165203.68+352815.8 & 820-52438-299 & $7.37 \pm 2.92$ & $ 48.98 \pm 11.77 $ & $9.53 \pm 3.53$ & $0.40\pm 0.08$ & $ 51.15 \pm 30.36 $ & 9.5 MG, 60${}^{\circ}$\\	
J165249.09+333444.9 & 1175-52791-095 & $5.07 \pm 4.18$ & $54.25 \pm 28.04$ & $5.82 \pm 1.90$ & $0.39 \pm 0.11$ & $49.85 \pm 36.73$ & \\
J170400.01+321328.7 & 976-52413-319 & $50.11 \pm 25.08$ & $ 54.87 \pm 118.04 $ & $56.16 \pm 8.84$ & $0.27 \pm 0.05$ & $ 0.34 \pm 53.88 $ & 5 MG, 90*${}^{\circ}$\\	
J171556.29+600643.9 & 354-51792-318 & $2.03 \pm0.00$$^2$ & $ 86.63 \pm 31.39 $ & $2.03\pm0.00$$^2$ & $-0.19 \pm 0.09$ & $ 60.85 \pm 35.29 $ & 4.5 MG, 60${}^{\circ}$\\	
J172045.37+561214.9 & 367-51997-461 & $19.79 \pm 5.42$ & $ 56.7 \pm 21.33 $ & $9.72 \pm 2.68$ & $0.31 \pm 0.18$ & $ 0.85 \pm 36.62 $ & 7 MG, 30${}^{\circ}$\\		
J172329.14+540755.8 & 359-51821-415 & $32.85 \pm 3.56$ & $ 37.43 \pm 26.52 $ & $28.86 \pm 2.71$ & $0.04 \pm 0.03$ & $ 25.4 \pm 27.51 $ & 35 MG, 10${}^{\circ}$\\		
J172932.48+563204.1 & 358-51818-239 & $27.26 \pm 7.04$ & $ 51.19 \pm 67.41 $ & $27.17 \pm 18.71$ & $0.22 \pm 0.10$ & $ 41.74 \pm 90$$^1$ & 35 MG, \dots	\\		
J202501.10+131025.6 & 2257-53612-167 & $10.10 \pm 1.76$ &$68.5\pm9.1$ & $10.72 \pm 1.71$ & $0.29 \pm 0.04$ &$53.7\pm9.0$ &  \\
J204626.15-071037.0 & 635-52145-227 & $2.03 \pm0.00$$^2$ & $ 49.33 \pm 25.34 $ & $2.62 \pm 0.53$ & $0.40\pm 0.06$ & $ 54.97 \pm 17.54 $ & 2 MG, 60${}^{\circ}$\\
%J215135.00+003140.5 & 371-52078-500 & - & - & - & - & - & 300 MG, \dots\\		
J205233.52-001610.7 & 982-52466-019 & $13.42 \pm 3.73$ & $ 68.57 \pm 12.86 $ & $1.31 \pm 0.23$ & $0.13 $0.03 & $ 56.97 \pm 16.83 $ & 13 MG, 80${}^{\circ}$\\			
J214900.87+004842.8 & 1107-52968-374 & $10.09 \pm 4.71$ & $ 46.97 \pm 99.7 $ & $5.53 \pm 2.90$ & $0.22 \pm 0.11$ & $ 5.00 \pm 9.13 $ & 10 MG, 60${}^{\circ}$\\		
J214930.74-072812.0 & 644-52173-350 & $44.71 \pm 1.92$ & $ 67.27 \pm 26.38 $ & $44.71 \pm 2.80$ & $0.06 \pm 0.05$ & $ 60.11 \pm 16.52 $ & 42 MG, 30${}^{\circ}$\\	
J215148.31+125525.5 & 733-52207-522 & $20.76 \pm 1.39$ & $ 68.3 \pm 12.21 $ & $21.80\pm 3.09$ & $0.12 \pm 0.03$ & $ 68.66 \pm 19.04 $ & 21 MG, 90${}^{\circ}$\\	
J220435.05+0012 42.9 & 372-52173-626 & $1.02 \pm 0.10$	&$71.2\pm90$$^1$ & $2.50 \pm 5.47$ & $-0.36 \pm 0.69$	&$3.1\pm13.6$ &  \\
J221828.59-000012.2 & 374-51791-583 & $257.54\pm48.71$ & $17.68\pm17.63$ & $212.18\pm34.78$& $0.06\pm0.02$ & $17.09\pm27.01$ & 225 MG, 30${}^{\circ}$\\
J224741.46+145638.8 & 740-52263-444 & $42.11 \pm 2.83$ & $ 53.02 \pm 9.70 $ & $46.95 \pm 4.30$ & $-0.17  \pm 0.02$ & $ 33.16 \pm 9.84 $ & 560 MG, \dots	\\
J225726.05+075541.7 & 2310-53710-420 & $16.17 \pm 2.81$	&$74.9\pm16.1$ & $17.39 \pm 3.21$ & $0.15 \pm 0.05$	&$78.5\pm34.8$ &  \\
J231951.73+010909.3 & 382-51816-565 & $9.35 \pm 31.50$ & $ 48.98 \pm 11.36 $ & $6.06 \pm 1.24$ & $0.40\pm 0.09$ & $ 12.48 \pm 50.66 $ & 1.5* MG, 90*${}^{\circ}$\\		
J232248.22+003900.9 & 383-51818-421 & $21.40\pm 3.36$ & $ 49.00 \pm 15.42 $ & $21.65 \pm 4.48$ & $0.29 \pm 0.07$ & $ 44.174 \pm 25.58 $ & 19 MG, 60${}^{\circ}$\\										
J234605.44+385337.6 & 1883-53271-272 & $798.1\pm163.6$ & $2.50\pm1.07$ & $706.0 \pm 238.9$ & $0.12\pm0.06$ & $86.6\pm15.4$ &1000* MG, \dots\\
J234623.69-102357.0 & 648-52559-142 & $9.17 \pm 1.58$ & $ 48.78 \pm 9.62 $ & $2.25 \pm 0.29$ & $0.39 \pm 0.07$ & $ 8.42 \pm 2.6 $ & 2.5 MG, 90*${}^{\circ}$ \\
\hline
\end{tabular}
\smallskip
Asterisks indicate field strengths or inclinations with uncertainties greater than 10\% in \citet{Vanlandinghametal05}. \\
${}^1$ The errors are very large. \\
${}^2$ The errors are very small.
\end{table}