\begin{table}%t2
\par
\caption{\label{table:modelparamrukl}Best fit model parameters: RUKL-type torque.}  
\small
%\centering
\par
\begin{tabular}{ c  c  c }        
\hline  \hline              
Parameter & Best fit value ($\lambda=0$) &  Best fit value
($\lambda=1$)\\ 
\hline                       
   $\kappa$ & 2.6 & 2.6\\       
   viscous-profile index $n$ & 5.02 & 5.02 \\
   eccentricity  & 0.400 & 0.401 \\
\hline\noalign{\smallskip}
   $\chi^2$ & 1.003 & 1.006    \\
\hline                                    
\end{tabular}
\end{table}