\begin{table}%T1
\par
\caption{\label{table:modelparamis}Best fit model parameters: IS-type torque.}  
\small
%\centering
\par
\begin{tabular}{ c  c  c }         
\hline \hline             
Parameter & Best fit value ($\lambda=0$) &  Best fit value
($\lambda=1$)\\   
\hline     
   $\kappa$ & 2.6 & 2.6\\       
   viscous-profile index $n$ & 5.04 & 5.04 \\
   eccentricity  & 0.405 & 0.406 \\
\hline\noalign{\smallskip}
   $\chi^2$ & 1.013 & 1.012    \\
\hline              
\end{tabular}
\end{table}