\begin{table}%t2
\caption{\label{tab2}Millimeter sources found in our MAMBO-2 maps.}
%\centerline
{\begin{tabular}{l|l|ccccc} 
\hline\hline\
 Source name     &  Star Field & $\alpha$(J2000) $^a$ & $\delta$(J2000) $^a$ &    Integrated flux density $^b$   & $S/N$ &  Source  \\
                 &             &                      &                      &     at 1.2~mm (mJy)  &       & {\it FWHM}  \\
\hline
MM145428+160439  & GJ569       &  14 ~54 ~28.2        &  16 ~04 ~39          &    $ 5.3 \pm 1.1$    & 4.9 &  $11''$    \\
                 &             &                      &                      &                      &     &            \\
MM184222+593828  & GJ725       &  18 ~42 ~22.7        &  59 ~38 ~28          &     $30{-}63$ $^c$         & $6.7{-}7.3$ &  $13''{-}15''$     \\
MM184253+593756  & GJ725       &  18 ~42 ~53.3        &  59 ~37 ~56          &    $ 9.7 \pm 1.9 $   & 5.1 &  $11''$    \\    
                 &             &                      &                      &                      &     &            \\ 
MM134539+145139  &  GJ526      &  13 ~45 ~39.0        &  14 ~51 ~39          &    $3.2 \pm 0.7 $    & 4.4 &  $11''$    \\
MM134540+145446  &  GJ526      &  13 ~45 ~40.7        &  14 ~54 ~46          &    $4.3 \pm 0.8 $    & 5.2 &  $11''$    \\
MM134541+145417  &  GJ526      &  13 ~45 ~41.3        &  14 ~54 ~17          &    $6.3 \pm 1.0 $    & 6.1 &  $11''$    \\
MM134543+145317  &  GJ526      &  13 ~45 ~43.1        &  14 ~53 ~17          &    $3.0 \pm 0.7 $    & 4.9 &  $11''$     \\
MM134546+145240  &  GJ526      &  13 ~45 ~46.7        &  14 ~52 ~40          &    $5.6 \pm 0.7 $    & 8.6 &  $11''$    \\
                 &             &                      &                      &                      &     &            \\ 
MM163007-123942  &  GJ628 $^d$ &  16 ~30 ~07.6        & $-$12 ~39 ~42        &    $7.3 \pm 1.2 $    & 6.2 &  $14\pm 4''$    \\
MM163022-123925  &  GJ628 $^e$ &  16 ~30 ~22.3        & $-$12 ~39 ~25        &    $3.8 \pm 0.9 $    & 4.4 &  $17\pm 5''$    \\
MM163019-123830  &  GJ628 $^f$ &  16 ~30 ~19.7        & $-$12 ~38 ~30        &    $4.1 \pm 0.8 $    & 4.9 &  $11''$      \\
MM163015-123911  &  GJ628 $^g$ &  16 ~30 ~15.6        & $-$12 ~39 ~11        &    $4.8 \pm 0.8 $    & 6.2 &  $11''$     \\
MM163013-124057  &  GJ628 $^h$ &  16 ~30 ~13.7        & $-$12 ~40 ~57        &    $4.3 \pm 1.0 $    & 4.8 &  $11''$     \\
\hline
\end{tabular}}
\medskip
\par
$^a$ The MAMBO coordinate uncertainties are $\sim$$3.5''$.
$^b$ Flux density (mJy) is integrated under the fitted 2D-Gaussian. 
$^c$ Flux density  is provided as lower and upper limits because the source is located close 
  to  one of  the borders of the map where some systematics remain in the data  (see text).
$^d$, $^e$, $^f$, $^g$, $^h$ These sources were found in survey I;  $^d$  is GJ628-W,  $^e$ is GJ628-E,   
 $^f$ is GJ628-NE,  $^g$ is GJ628-NW, 
 and $^h$ is GJ628-SW in Fig.~\ref{fig2} and Table~\ref{tab3}  of Lestrade et~al. (\cite{Lestrade2006}). Note that there are typographic errors in 
 the $minute$ column of declinations in Table~\ref{tab3} of Lestrade et~al. (\cite{Lestrade2006}). The positions of the GJ628 sources given  
 now are correct and supersede this first publication. Also, the flux densities in this first publication were
 peak flux densities  while they are integrated flux densities now.
\end{table}