\begin{table}%t5
\caption{\label{tvla7mm}Parameters of sources detected at 1.3~cm and 7~mm in the IRAS 00213+6530 region.}
%\centerline
{\begin{tabular}{lccccccccc}
\hline\hline
&\multicolumn{2}{c}{Position$^{a}$} 
&&\multicolumn{2}{c}{1.3~cm}
&&\multicolumn{2}{c}{7~mm}
&Spectral \\
\cline{2-3}
\cline{5-6}
\cline{8-9}\noalign{\smallskip}
&$\alpha$ (J2000) &$\delta$ (J2000) & &$I_{\nu}$$^{{{\rm peak}}}$ &$S_{\nu}$
&&$I_{\nu}$$^{{{\rm peak}}}$ &$S_{\nu}$& Index$^{c}$\\
Source & (h m s)  & ($\degr$ $'$ $''$)&&(m\jpb)& (mJy)&& (m\jpb)& (mJy)& 1.3~cm-7mm\\
\hline\noalign{\smallskip}
VLA~8A&  00 24 11.01& 65 47 09.9& & \ldots&  $<$$0.6$$^{b}$&  &1.22~$\pm$~0.26& 1.57~$\pm$~0.54& $>$1.4 \\
VLA~8B&  00 24 11.76& 65 47 09.8& & 1.09~$\pm$~0.13& 1.25~$\pm$~0.25& & 1.12~$\pm$~0.38& 1.43~$\pm$~0.79 &0.2~$\pm$~0.6 \\
\hline
\end{tabular}}
\medskip
$^a$~From the 7~mm map.
$^b$~4$\sigma$ upper limit.
$^c$~Estimated from the 1.3~cm flux density obtained with a uv-taper
function of 80~k$\lambda$ (see main text).
\end{table}