\begin{table}%t11
\caption{\label{tsed}Photometry of the MM1 clump.}
%\centerline
 {
\begin{tabular}{rrrl}
\hline
\hline\noalign{\smallskip}
$\lambda$
&$S_\nu$
&{\it FWHM}
&Survey
\\
($\mu$m)
&(mJy)
&($''$)
&Instrument
\\
\noalign{\smallskip}
\hline\noalign{\smallskip}
1.25	&$<$$0.21^{a}$          &2	&2MASS\\
1.65	&0.431~$\pm$~0.001$^{a}$ &2	&2MASS\\
2.17	&3.104~$\pm$~0.001$^{a}$	   &2	&2MASS\\
8.28	&123~$\pm$~10$^{b}$	   &18.3    &MSX\\
12      &$<$250           &50     &IRAS\\
12.13   &$<$549		&18.3	  &MSX\\
14.65   &$<$420		&18.3	  &MSX\\
21.34   &$<$1200        &18.3	  &MSX\\
25	&980~$\pm$~90	   &50	&IRAS\\
60	&$<$4910          &100     &IRAS\\
100     &15000~$\pm$~1500      &230     &IRAS\\
1200	&640~$\pm$~70        &11      &IRAM~30~m\\
7000    &1.6~$\pm$~0.5$^{{c}}$       &3       &VLA\\
13~000   &$<$0.6$^{c, d}$          &1.5     &VLA\\
36~000   &0.27~$\pm$~0.02$^{e}$     &12      &VLA\\
60~000   &0.13~$\pm$~0.02$^{e}$     &15      &VLA\\
210~000   &$<$$2.0^{d}$           &45      &VLA$^{f}$  \\
\hline
\end{tabular}}
\medskip
$^{a}$ J00241110+6547095. 
$^{b}$ G120.1368+03.0617.
$^{c}$ VLA~8A.
$^{d}$ 4$\sigma$ upper limit.
$^{e}$ VLA~8 (VLA~8A and VLA~8B).
$^{f}$ From the NRAO VLA Sky Survey \citep{condon98}.
\end{table}