\begin{table}%t1
\par
\caption{\label{tvlaobs}VLA observational parameters in the IRAS~~00213+6530 region.}
%\centerline
{\begin{tabular}{lcccccccccc}
\hline\hline
&&\multicolumn{2}{c}{Phase Center}
&&Bootstrapped
&\multicolumn{2}{c}{Synthesized Beam}&&On-Source\\
\cline{3-4}
\cline{7-8}
&$\lambda$& $\alpha$(J2000)& $\delta$(J2000)& Phase& Flux Density& HPBW& PA &rms Noise &Time\\
Transition & ${\rm (cm)}$ &(h m s)& ($\degr$ $'$ $''$)&Calibrator &(Jy)& (arcsec)&(deg)& (m\jpb)&(hours)& Epoch\\ 
\hline
continuum& \phnp6    &00 24 10.41& $+$65 47 02.0&  0014$+$612&  $1.940\pm0.006$&	 17.9~$~\times~$11.7&             \phb54&   0.024\phe& 	     1.2 &2000 \\
continuum&   3.6     &00 24 10.41& $+$65 47 02.0&  0014$+$612&  $1.281\pm0.010$&	 21.2~$~\times~$\phn9.2&           $-68$&   0.023\phe&   1.0 &2000 \\
continuum&   3.6     &00 24 11.44& $+$65 47 09.6&  0019$+$734&  $1.070\pm0.003$&   	 \phn9.9~$~\times~$\phn7.2& \phb55&   0.027\phe&         0.5 &2004\\ 
continuum&   1.3     &00 24 11.44& $+$65 47 09.6&  0019$+$734&  $2.41\phn\pm0.08\phn$&	 \phn1.5~$~\times~$\phn1.0&       \phb32&  0.15\phn\phe&  0.3& 	2006\\
continuum&   0.7     &00 24 11.44& $+$65 47 09.6&  0019$+$734&  $1.71\phn\pm0.06\phn$&   \phn2.9~$~\times~$\phn2.6&  $-$89&   0.19\phn\phe&  1.0 &2004\\
\nh~$(1,1)$& 1.3    &00 24 11.44& $+$65 47 09.6&  0019$+$734&  $1.58\phn\pm0.05\phn$&   \phn4.1~$~\times~$\phn3.7&  $-$52&   1.3$^{a}$\phnn&  \phnp6  &2004\\
\nh~$(2,2)$& 1.3    &00 24 11.44& $+$65 47 09.6&  0019$+$734&  $1.58\phn\pm0.05\phn$&   \phn4.1~$~\times~$\phn3.7&  $-$51&   1.1$^a$\phnn&  \phnp6 &2004 \\
\hho\ 6$_{16}$--$5_{23}$&         1.3    &00 24 11.44& $+$65 47 09.6&  0019$+$734&  $2.41\phn\pm0.08\phn$&   \phn2.3~$~\times~$\phn1.4& \phb17&   3.0$^{a}$\phnn&  0.3 &2006\\
\hline
\end{tabular}}
\medskip
$^{a}$ Per channel.
\end{table}