\begin{table}%t1
\caption{\label{tab1}List of CMaX sources observed with {\it Gemini}.} 
%\centerline
{\small
\begin{tabular}{l|cccccc|cc|cc|c}
\hline\hline
& 
\multicolumn{6}{c}{X-ray source} &
\multicolumn{2}{|c}{Expected$^a$} &
\multicolumn{2}{|c|}{Candidates$^b$} & \\
%\hline
CMaX& RA & Dec & Err & Cnts/ks & S/N & log$L_{\rm X}$ & $J$ & $R$ & 
Optical & Near-IR&  $A_{\rm V}$ \\
& J2000 & J2000 &($''$) & & & (erg/s) & (mag) & (mag) & & & (mag)  \\
\hline
15& 07:00:15 & --11:18:51 & 10 &1.9 & 4.8& 30.39 & 11.8 & 13.3 &
12& 6 &  1.23~$\pm$~0.03\\
17N& 07:00:19 & --11:22:10 & 9 & 0.38 & 1.7 &29.69 & 14.0 & 16.5 &
4& 4 & 0.6~$\pm$~0.3\\
17S& 07:00:20 & --11:23:20 & 9 & 1.31 & 4.3 &30.23 & 12.3 & 14.0 &
12& 5  & 0.6~$\pm$~0.3\\
37& 07:01:25 & --11:08:50 & 15 &2.1&5.3& 30.44 & 11.7 & 13.1 &
15& 5 & 0.4~$\pm$~0.6 \\
42& 07:01:34 & --11:11:16 & 10 &1.8 & 4.5 & 30.37 & 11.9 & 13.3 &
32& 9  & 0.4~$\pm$~0.6 \\
55S& 07:02:07 & --11:17:11 & 30 & 0.59 & 2.0 &29.88 & 13.4 & 15.6&
5& 3 & $1.2\pm1.0$\\
55N & 07:02:08 & --11:16:15 & 30 & 0.72 & 2.6 & 29.97 & 13.1 & 15.2 &
2& 1 & $1.2\pm1.0$\\
\hline
\end{tabular}}\medskip
\par
Columns description: (1) CMaX number; (2, 3) coordinates; (4) diameter of the position error circle;
(5, 6) count rate and  respective signal-to-noise ratio; (7) X-ray luminosity; (8, 9) Statistically expected near-IR and optical magnitudes calculated by adopting the correlation log$L_X$/absolute magnitude found for young stars (see Sect.~4.4); (10, 11) Number of possible optical counterparts within the X-ray contours, and number of corresponding objects found in the 2MASS catalogue; (12) adopted visual extinction based on a standard reddening law.\\
Notes: (a) The estimated errors are $\sigma_J= 1.2$~mag. and $\sigma_R= 1.4$~mag.;  (b)  
(less than 50{\%} of the candidates have near-IR counterpart). 
\end{table}