\begin{table}%t3
\caption{\label{tab:spectrum}SZE decrement/increment measurements used for the spectral~fit.} 
\small%\centerline
 {
\begin{tabular}{l l l}
\hline\hline
%&&& \\[-8pt]
Wavelength (mm) & Instrument & $\Delta$  $I ~$  (MJy sr$^{-1}$) \\
\hline
%&&& \\[-8pt]
10 & OVRO/BIMA$^{1}$ & $-0.043 \pm 0.005 $ $^{4}$  \\
2.1 & SuZIE$^{2}$ & $-0.342 \pm 0.033$ $^{3,4}$ \\
2.0 & APEX-SZ & $-0.317 \pm0.035$ \\
1.4 & SuZIE$^{2}$ & $-0.093 \pm 0.069$ $^{3,4}$ \\
1.1 & SuZIE$^{2}$ & $0.266 \pm 0.095$ $^{3,4}$ \\
0.86 & LABOCA & $0.633 \pm 0.094$  \\
\hline
\end{tabular}}
\medskip
$^1$ LaRoque et~al. (\cite{LaRo02});
$^2$ Holzapfel et~al. (1997);
$^3$~dust-corrected intensities from \mbox{LaRoque} et~al. (\cite{LaRo02});
$^4$~calibration corrected according to Hill et~al. (\cite{Hill08}).
\end{table}