\begin{table}%t8-part1
%\centering
\par
\caption {Results of the IR/CO correlations in the molecular phase for all sky regions.
Columns~1--2: central position of each studied regions in degree. Column~3: number of pixels used for the correlations in each studied regions. Columns~4--11: results of the correlations in $\rm {MJy/sr}$ for $\rm 10^{21}~H/cm^{2}$. Colums~12--13: emissivity
spectral indices in the range 100--240~$\rm \mic$ ($\rm \beta^{FIR}$)
and in the range 550--2100 $\rm \mic$ ($\rm \beta^{submm}$). Column~14: derived dust temperature in Kelvin. Errors bars represent the 1-$\rm \sigma$ uncertainty estimates. Uncertainties equal to~0.0 are inferior to~0.05.}
 \begin{tabular}{cccccccccccccc}
 \hline \hline 
 \noalign{\smallskip}
 \multicolumn{1}{l}{\small Long.} &
\multicolumn{1}{l}{Lat.} & pix. & \multicolumn{1}{l}{$b_{100}$} & \multicolumn{1}{l}{$b_{140}$} & \multicolumn{1}{l}{$b_{240}$} & \multicolumn{1}{l}{$b_{550}$} & \multicolumn{1}{l}{$b_{850}$} & \multicolumn{1}{l}{$b_{1382}$} & \multicolumn{1}{l}{$b_{2098}$} & \multicolumn{1}{l}{$b_{3191}$} & \multicolumn{1}{l}{$\rm \beta_{CO}^{FIR}$} & \multicolumn{1}{l}{$\rm \beta_{CO}^{submm}$} & \multicolumn{1}{l}{$T\rm _d^{CO}$} \\ 
 &&&\multicolumn{1}{l}{$\pm\Delta$b$_{100}$}&\multicolumn{1}{l}{$\pm\Delta b_{140}$}&\multicolumn{1}{l}{$\pm \Delta b_{240}$}&\multicolumn{1}{l}{$\pm \Delta b_{550}$}&\multicolumn{1}{l}{$ \pm \Delta b_{850}$} &\multicolumn{1}{l}{$\pm ${}$\Delta b_{1382}$} & \multicolumn{1}{l}{$\pm \Delta b_{2098}$} & \multicolumn{1}{l}{$ \pm ${}$\Delta b_{3191}$} & \multicolumn{1}{l}{$\rm  \pm${}$ \Delta \beta_{\rm CO}^{\rm FIR}$} &\multicolumn{1}{l}{$\rm  \pm \Delta \beta_{CO}^{submm}$} & \multicolumn{1}{l}{$\pm ${}$\Delta T\rm _d^{CO}$} \\
& & & & && & ($\times 10^{-1}$) &  ($\times 10^{-2}$) &  ($\times 10^{-2}$) &  ($\times 10^{-3}$) & & & \\
\hline
 Case 1  &&&&&&&&&&&&&\\
 \hline
 08.34 &   8.28 &    71 &    8.8 $\pm$    1.1 &   18.6  $\pm$   2.0 &   13.9  $\pm$   1.2 &    1.8  $\pm$   0.2 &    6.0 $\pm$    0.3 &   12.5 $\pm$    0.7 &    3.0 $\pm$    0.4 &  $9.2$  $\pm$   1.6 &    2.4 $\pm$   0.5 &    1.7  $\pm$   0.2 &   16.7 $\pm$    0.6 \\
117.55 &  --2.16 &   111 &    5.0  $\pm$   0.9 &   11.3  $\pm$   1.8 &    9.1 $\pm$    1.2 &    1.2 $\pm$    0.2 &    3.4 $\pm$    0.5 &   11.3  $\pm$   0.8 &    3.3 $\pm$    0.3 &  10.0 $\pm$    1.3 &    2.3 $\pm$    0.6 &    1.2  $\pm$   0.2 &   16.2 $\pm$   0.6 \\
120.61 &  --6.34 &    40 &    9.2  $\pm$   6.2 &   18.2 $\pm$    7.9 &   15.4 $\pm$    4.1 &    1.9 $\pm$    0.4 &    6.5 $\pm$    0.9 &   16.8  $\pm$   2.7 &    5.0 $\pm$    1.3 &  14.0 $\pm$    5.9 &    2.2  $\pm$   1.4 &    1.3  $\pm$   0.3 &   16.8  $\pm$   0.6 \\
139.02 &  12.46 &    17 &    2.8  $\pm$   1.0 &    7.9  $\pm$   2.5 &    7.5  $\pm$   2.9 &    1.3 $\pm$    0.3 &    0.2 $\pm$    1.9 &    6.0  $\pm$   2.4 &    4.0  $\pm$   1.2 &  14.7 $\pm$    7.7 &    2.2  $\pm$  1.1 &    1.4  $\pm$   0.4 &   15.1 $\pm$    0.5 \\
142.09 &   2.01 &   111 &    5.5  $\pm$   0.8 &   14.3  $\pm$   1.3 &   13.0  $\pm$   0.8 &    1.9 $\pm$    0.1 &    5.6 $\pm$    0.3 &   13.1  $\pm$   0.5 &    3.5  $\pm$   0.2 &  $9.4$ $\pm$    0.8 &    2.3 $\pm$    0.5 &    1.6 $\pm$    0.1 &   15.1 $\pm$    0.5 \\
145.16 &  --4.25 &    91 &    1.8 $\pm$    0.3 &    5.1 $\pm$    0.9 &    6.2  $\pm$   0.8 &    1.1 $\pm$     0.3 &    4.1 $\pm$    0.6 &    8.0  $\pm$   0.9 &    2.3 $\pm$    0.6 & $<$4.7 &    1.8 $\pm$    0.6 &    1.6 $\pm$    0.3 &   15.3   $\pm$  0.5 \\
148.23 &  --6.34 &    38 &    2.6  $\pm$   0.5 &   10.3 $\pm$    1.6 &   11.8 $\pm$    1.2 &    0.5  $\pm$   0.2 &    6.4 $\pm$    1.0 &   20.0  $\pm$   1.7 &    6.6 $\pm$    0.8 &  $8.0$ $\pm$    2.9 &    4.8  $\pm$   0.6 &    0.9  $\pm$   0.2 &   10.3 $\pm$    0.2 \\
148.23 &   2.01 &   111 &    3.0  $\pm$   0.3 &    9.6 $\pm$    0.7 &    9.8 $\pm$    0.5 &    1.6  $\pm$   0.1 &    5.4 $\pm$    0.4 &   11.7  $\pm$   0.6 &    3.1  $\pm$   0.3 &  $6.7$ $\pm$    0.8 &    2.4  $\pm$   0.5 &    1.6 $\pm$    0.1 &   14.1  $\pm$   0.4 \\
151.29 &  --0.07 &   110 &    5.3  $\pm$   0.8 &   10.9 $\pm$    1.3 &    9.6  $\pm$   0.8 &    1.4 $\pm$    0.1 &    3.0 $\pm$    0.4 &    9.1  $\pm$   0.7 &    2.4 $\pm$    0.4 &  $6.5$ $\pm$    1.2 &    2.1 $\pm$    0.5 &    1.6 $\pm$    0.2 &   17.3 $\pm$    0.6 \\
151.29 &   6.19 &   100 &    2.1 $\pm$    0.1 &    5.9 $\pm$    0.3 &    5.7  $\pm$   0.2 &    1.2 $\pm$    0.1 &    2.4  $\pm$   0.2 &    7.5 $\pm$    0.2 &    1.1  $\pm$   0.1 &  $7.4$ $\pm$    0.8 &    2.0 $\pm$    0.4 &    1.8 $\pm$    0.1 &   16.0    $\pm$ 0.6 \\
154.36 & --10.52 &    51 &    1.2 $\pm$    0.1 &    3.9 $\pm$    0.2 &    4.4  $\pm$   0.2 &    0.6 $\pm$    0.0 &    2.3 $\pm$    0.1 &    8.1 $\pm$    0.3 &    2.2  $\pm$   0.1 &  $7.3$ $\pm$    0.6 &    2.4 $\pm$   0.4 &    1.1   $\pm$  0.1 &   13.8 $\pm$    0.4 \\
157.43 &  12.46 &    33 &    2.4 $\pm$    0.4 &    7.7 $\pm$    1.5 &    8.4 $\pm$    1.2 &    1.4  $\pm$   0.4 &    3.2  $\pm$   0.8 &    6.5  $\pm$   1.4 &    0.4 $\pm$    0.9 & $<$13.3 &    2.3 $\pm$    0.6   &  2.1  $\pm$   0.5 &   13.9 $\pm$    0.4 \\
160.50 &  --8.43 &   112 &    1.4 $\pm$    0.2 &    4.5 $\pm$    0.5 &    5.8 $\pm$    0.5 &    0.6 $\pm$    0.1 &    2.8 $\pm$    0.3 &    7.3 $\pm$    0.6 &    1.7  $\pm$   0.3 &  $6.9$ $\pm$    1.2 &    2.9 $\pm$    0.5 &    1.3 $\pm$   0.2 &   12.5 $\pm$    0.3 \\
160.50 &   2.01 &   117 &    2.6 $\pm$    0.2 &    7.0 $\pm$    0.5 &    7.8 $\pm$    0.5 &    1.1 $\pm$    0.1 &    3.1  $\pm$   0.5 &    7.7  $\pm$   0.8 &    2.1  $\pm$   0.3 &  $5.1$ $\pm$    1.6 &    2.1 $\pm$    0.4 &    1.6 $\pm$    0.2 &   14.9  $\pm$   0.4 \\
163.57 &   8.28 &    42 &    1.1 $\pm$    0.3 &    2.9 $\pm$    0.9 &    4.2  $\pm$   0.8 &    0.3 $\pm$    0.1 & $<$$1.2$ &   $<$3.1 &  $<$0.2 & -- &    2.8 $\pm$    0.7 & -- &   12.7 $\pm$    0.3 \\
163.57 &  10.37 &    59 &    0.9 $\pm$    0.3 &    2.9 $\pm$    0.9 &    3.5 $\pm$    0.7 &    0.2 $\pm$    0.1 &$<$1.4&  $<$3.3 &  $<$0.4 & -- &    3.8 $\pm$    0.7 & -- &   11.4 $\pm$    0.3 \\
166.63 &   8.28 &    34 &    1.4 $\pm$    0.3 &    3.8 $\pm$    1.0 &    4.6 $\pm$    0.9 &    0.4 $\pm$    0.1 &    0.3 $\pm$    0.5 &    1.2  $\pm$   1.2 & $<$1.2 & --&    2.6 $\pm$   0.7 & -- &   13.3  $\pm$   0.3 \\
172.77 & --10.52 &   110 &    1.3 $\pm$    0.1 &    4.5 $\pm$    0.4 &    5.6 $\pm$    0.4 &    0.7  $\pm$   0.1 &    2.6 $\pm$     0.3 &    7.8 $\pm$    0.4 &    1.6  $\pm$   0.2 &  $5.9$ $\pm$    0.9 &    2.7 $\pm$    0.5 &    1.4 $\pm$    0.2 &   12.7  $\pm$   0.3 \\
\par
\hline
Median & values &&&&&&&&&&&&\\
-- &   -- &    -- &    2.6  $\pm$   0.3 &    7.7 $\pm$  1.0 &    7.8  $\pm$   0.8 &    1.2  $\pm$   0.1 &    3.1  $\pm$   0.5 &    8.0  $\pm$   0.8 &    2.3 $\pm$    0.4 &  $6.9$  $\pm$   1.6 &    2.4 $\pm$    0.6 &    1.6  $\pm$   0.2 &   14.9 $\pm$    0.4 \\
\hline
 Case 2  &&&&&&&&&&&&&\\
 \hline
71.53 &   4.10 &    64 &   29.4 $\pm$    2.3 &   57.5  $\pm$   4.7 &   34.9  $\pm$   3.2 &    4.8 $\pm$ 0.3 & $<$1.6 &   24.7 $\pm$   1.5 &    7.1  $\pm$   0.8 &  0.3  $\pm$   3.2 &    2.6   $\pm$  0.5 &   1.8  $\pm$   0.2 &   17.7 $\pm$    0.7 \\
 74.59 &   2.01 &    86 &   12.4  $\pm$  3.2 &   29.1  $\pm$   4.0 &   22.0  $\pm$   1.7 &    2.6 $\pm$    0.2 &    4.8  $\pm$   0.8 &   18.2 $\pm$    0.9 &    4.8 $\pm$    0.4 &  $9.4$ $\pm$    1.1 &    2.6 $\pm$    0.6 &    1.6  $\pm$   0.1 &   15.4  $\pm$   0.5 \\
 77.66 &   4.10 &   104 &   41.6 $\pm$    3.3 &   63.4 $\pm$    4.0 &   34.8 $\pm$    1.7 &    2.6 $\pm$    0.2 &   11.9  $\pm$   0.4 &   24.8 $\pm$    0.8 &    8.6 $\pm$    0.4 &  $7.3$ $\pm$    1.4 &    2.9 $\pm$    0.4 &    1.2 $\pm$    0.1 &   17.5  $\pm$   0.6 \\
 80.73 &   8.28 &    56 &   28.2  $\pm$   5.0 &   56.6 $\pm$    7.4 &   34.9  $\pm$   3.8 &    3.4 $\pm$    0.3 &    2.9  $\pm$   1.2 &   18.1 $\pm$    2.0 &    4.9  $\pm$   1.6 &  25.1 $\pm$    7.7 &    2.9   $\pm$  0.6 &    1.9 $\pm$     0.2 &   16.0 $\pm$     0.6 \\
 83.80 &  --4.25 &    59 &    7.3 $\pm$    1.4 &   14.4  $\pm$   2.5 &   11.2 $\pm$    1.7 &    1.1 $\pm$    0.2 &    1.3  $\pm$   0.9 &   13.9 $\pm$    1.5 &    3.2  $\pm$   0.6 &  $1.9$ $\pm$    2.3 &    2.5  $\pm$   0.6 &    1.2 $\pm$    0.3 &   16.2  $\pm$   0.5 \\ 
 89.93 &   2.01 &   111 &    2.1  $\pm$   0.3 &    5.5 $\pm$    0.5 &    5.7  $\pm$   0.3 &    0.8 $\pm$    0.0 &    3.0  $\pm$   0.1 &    7.4 $\pm$    0.2 &    1.7 $\pm$    0.1 &  $4.8$ $\pm$    0.3 &    2.2  $\pm$   0.5 &    1.5 $\pm$    0.1 &   15.0  $\pm$   0.5 \\
 93.00 &  --0.07 &   111 &    5.0 $\pm$    0.8 &   11.8  $\pm$   1.3 &   10.0 $\pm$    0.9 &    1.3 $\pm$    0.1 &    3.8  $\pm$   0.4 &    8.5 $\pm$    0.7 &    1.8 $\pm$    0.3 &  $1.8$ $\pm$    1.1 &    2.4 $\pm$    0.5 &    1.8 $\pm$    0.2 &   15.6 $\pm$    0.5 \\
 99.14 &  --4.25 &    91 &    7.6  $\pm$   1.1 &   19.5  $\pm$   2.6 &   17.4  $\pm$   2.1 &    0.7 $\pm$    0.7 &    0.9  $\pm$   2.0 &   20.4 $\pm$    2.6 &  $<$4.8 & $<$12.5 &    4.0  $\pm$   0.5 & -- &   11.9 $\pm$    0.3 \\
 99.14 & --0.07 &   110 &    3.3 $\pm$     0.9 &    7.2 $\pm$    1.3 &    5.9  $\pm$   1.0 &    0.4 $\pm$    0.2 &    1.1 $\pm$    0.4 &    3.1  $\pm$   0.8 &    0.9  $\pm$   0.4 &  $4.8$  $\pm$   1.8 &    3.1 $\pm$    0.7 &    1.4  $\pm$   0.5 &   13.8 $\pm$    0.4 \\
 99.14 &  12.46 &    79 &    1.6 $\pm$    0.4 &    5.7 $\pm$    0.8 &    6.0  $\pm$   0.7 &    0.9 $\pm$    0.1 &    2.8 $\pm$    0.4 &    7.8 $\pm$    0.9 &    1.3  $\pm$   0.6 &  $9.6$  $\pm$   3.6 &    2.6  $\pm$   0.6 &    1.6   $\pm$  0.3 &   13.2  $\pm$   0.4 \\
102.21 &  10.37 &    99 &    2.0  $\pm$   0.4 &    6.2  $\pm$   0.9 &    6.3  $\pm$   0.7 &    0.6 $\pm$    0.1 &    2.9  $\pm$   0.3 &    7.0 $\pm$    0.5 &    1.0 $\pm$    0.3 &  $1.9$ $\pm$    1.0 &    2.9  $\pm$   0.6 &    1.5 $\pm$   0.2 &   13.0  $\pm$   0.4 \\
102.21 &  12.46 &    68 &    1.8  $\pm$   0.3 &    5.8  $\pm$   0.7 &    5.9  $\pm$   0.5 &    0.6 $\pm$    0.1 &    3.1  $\pm$   0.3 &    6.4 $\pm$    0.4 &    0.3 $\pm$    0.3 & $<$3.8 &   3.0 $\pm$     0.5 &    1.5 $\pm$    0.2 &   12.8 $\pm$    0.4 \\
108.34 &  --4.25 &    90 &    2.6 $\pm$    0.3 &    7.9  $\pm$   0.6 &    8.1 $\pm$    0.5 &    1.4 $\pm$    0.1 &    3.8  $\pm$   0.2 &    8.9 $\pm$    0.3 &    1.7  $\pm$   0.1 &  $9.0$  $\pm$   0.8 &    2.2 $\pm$     0.5 &    1.9  $\pm$    0.1 &   14.6 $\pm$     0.5 \\
108.34 &   2.01 &   111 &   15.7  $\pm$   1.1 &   24.2  $\pm$   1.4 &   14.3 $\pm$    0.8 &    1.1 $\pm$    0.1 &    4.4  $\pm$   0.2 &    9.4 $\pm$    0.5 &    2.0 $\pm$    0.2 &  $1.8$  $\pm$   0.4 &    2.8 $\pm$     0.4 &    1.7 $\pm$     0.1 &   17.7  $\pm$    0.6 \\
111.41 &   6.19 &    83 &    3.4 $\pm$    1.6 &    8.5  $\pm$   2.7 &    7.5  $\pm$   1.5 &    0.8 $\pm$    0.2 &    3.9 $\pm$    0.4 &    8.6 $\pm$    0.7 &    1.8 $\pm$    0.3 &  $4.8$  $\pm$   0.8 &    2.7  $\pm$    0.9 &    1.7 $\pm$     0.2 &   14.3 $\pm$     0.4 \\
114.48 &  --0.07 &   110 &   18.9 $\pm$    1.7 &   31.0  $\pm$   2.5 &   19.5 $\pm$    1.4 &    0.8  $\pm$   0.2 &    3.9  $\pm$   0.4 &    8.0 $\pm$    0.7 &    1.9 $\pm$   0.2 &  $8.0$ $\pm$    1.1 &    3.4  $\pm$    0.4 &    1.6 $\pm$     0.2 &   14.6   $\pm$   0.4 \\
117.55 &  --0.07 &   110 &    1.5  $\pm$   1.3 &    6.1  $\pm$   2.6 &    6.2 $\pm$    1.7 &    1.0 $\pm$    0.3 &    2.3 $\pm$    0.6 &    7.3 $\pm$    0.9 &    2.1 $\pm$   0.2 &  $2.4$ $\pm$    1.3 &    3.2 $\pm$     1.7 &    1.4 $\pm$     0.3 &   12.5  $\pm$    0.4 \\
123.68 &   2.01 &   111 &    1.5 $\pm$    0.2 &    5.2 $\pm$    0.4 &    6.1 $\pm$    0.3 &    0.8  $\pm$   0.1 &    2.9 $\pm$    0.1 &    7.3 $\pm$    0.3 &    1.5 $\pm$    0.1 &  $5.1$ $\pm$    0.6 &    2.7  $\pm$    0.5 &    1.6  $\pm$    0.1 &   13.0 $\pm$     0.4 \\
129.82 &   2.01 &   110 &    3.5 $\pm$    0.5 &   10.8 $\pm$    0.9 &   10.3  $\pm$   0.6 &    1.3 $\pm$    0.1 &    5.7  $\pm$   0.3 &   13.0  $\pm$   0.6 &    2.4 $\pm$   0.3 & $<$4.3 &    2.7  $\pm$    0.5  &   1.6 $\pm$     0.1 &   13.6 $\pm$     0.4 \\
135.95 &  --4.25 &    49 &    1.2  $\pm$   0.5 &    5.1  $\pm$   1.1 &    5.4 $\pm$    1.0 &    1.3 $\pm$    0.2 &    3.1 $\pm$    0.5 &   10.3 $\pm$    1.1 &    3.5 $\pm$    0.7 &  19.7 $\pm$   4.0 &    2.7 $\pm$    0.9 &    1.4 $\pm$     0.2 &   12.9 $\pm$     0.4 \\
135.95 &  --2.16 &   106 &    5.1 $\pm$    0.7 &   11.0  $\pm$   1.3 &    8.6 $\pm$    0.9 &    0.7 $\pm$    0.1 &    3.9 $\pm$    0.5 &    8.0 $\pm$    0.8 &    1.3 $\pm$    0.4 &  $5.7$ $\pm$    1.4 &    2.9  $\pm$    0.5 &    1.6  $\pm$    0.3 &   14.6$\pm$      0.4 \\
139.02 &  --4.25 &    62 &    1.8  $\pm$   0.3 &    6.6  $\pm$   0.7 &    7.2 $\pm$    0.6 &    1.2 $\pm$    0.1 &    4.0  $\pm$   0.3 &   11.0  $\pm$   0.7 &    3.2 $\pm$    0.3 &  14.8 $\pm$   1.2 &    2.5 $\pm$     0.5 &    1.3 $\pm$     0.2 &   13.5  $\pm$    0.4 \\
139.02 &  --0.07 &   111 &    8.6 $\pm$    3.0 &   21.0   $\pm$  4.1 &   16.6  $\pm$   2.2 &    2.6 $\pm$    0.3 &    6.7  $\pm$   0.8 &   14.5 $\pm$    1.2 &    3.8 $\pm$   0.4 &  $7.3$ $\pm$    1.2 &    2.4 $\pm$     0.7 &    1.8 $\pm$      0.2 &   16.0  $\pm$    0.6 \\
139.02 &   2.01 &   110 &    6.8  $\pm$   2.8 &   17.3  $\pm$   3.8 &   14.8 $\pm$    2.0 &    2.4 $\pm$    0.2 &    5.7 $\pm$    0.6 &   15.8 $\pm$    0.9 &    5.0 $\pm$   0.3 &  14.8 $\pm$   1.3 &    2.3 $\pm$     0.8 &    1.5 $\pm$     0.1 &   15.8 $\pm$      0.5 \\
145.16 &   4.10 &   111 &    2.6  $\pm$   0.6 &    6.7  $\pm$   1.0 &    7.0 $\pm$    0.7 &    1.1 $\pm$    0.2 &    2.6 $\pm$    0.3 &    4.9 $\pm$    1.1 &    1.7 $\pm$    0.5 &  $4.8$ $\pm$    3.0 &    2.0 $\pm$     0.6 &    1.9  $\pm$    0.3 &   15.5  $\pm$    0.5 \\
\par
145.16 &  10.37 &   116 &    2.1 $\pm$    0.1 &    6.9  $\pm$   0.4 &    7.3 $\pm$    0.3 &    1.0 $\pm$    0.1 &    3.1 $\pm$    0.2 &    8.5 $\pm$    0.5 &    2.7 $\pm$    0.3 &  $8.2$ $\pm$    1.2 &    2.6 $\pm$     0.4 &    1.3 $\pm$     0.1 &   13.4 $\pm$     0.4 \\
151.29 &   4.10 &   110 &    1.6  $\pm$   0.2 &    5.5  $\pm$   0.4 &    5.7  $\pm$   0.3 &    0.9 $\pm$    0.1 &    2.6 $\pm$    0.2 &    7.9 $\pm$    0.4 &    1.1 $\pm$    0.2 &  $4.2$  $\pm$   0.8 &    2.6$\pm$      0.5 &    1.6  $\pm$    0.1 &   13.5  $\pm$    0.4 \\
154.36 &   4.10 &   111 &    1.8 $\pm$    0.2 &    5.2 $\pm$    0.5 &    5.6  $\pm$   0.4 &    0.8 $\pm$    0.1 &    2.7 $\pm$    0.1 &    7.1  $\pm$   0.4 &    1.7 $\pm$    0.2 &  $2.6$ $\pm$    0.5 &    2.3 $\pm$     0.5 &    1.5 $\pm$      0.1 &   14.4 $\pm$     0.4 \\
157.43 &  --0.07 &   110 &    1.3 $\pm$    0.2 &    4.5 $\pm$    0.6 &    5.3  $\pm$   0.6 &    1.3 $\pm$    0.1 &    3.5 $\pm$    0.6 &    6.5 $\pm$    1.2 &    1.6 $\pm$    0.5 &  $5.4$ $\pm$    1.8 &    2.0 $\pm$     0.6 &    2.0 $\pm$     0.2 &   14.5   $\pm$   0.5 \\
160.50 & --20.96 &    72 &    1.4  $\pm$   0.2 &    4.1 $\pm$    0.5 &    4.5 $\pm$    0.3 &    0.5 $\pm$    0.0 &    1.9  $\pm$   0.2 &    5.4 $\pm$    0.3 &    1.2 $\pm$    0.2 &  $4.9$ $\pm$    0.4 &    2.6  $\pm$    0.5 &    1.4  $\pm$    0.2 &   13.5 $\pm$     0.4 \\
160.50 & --18.87 &    91 &    2.2  $\pm$   0.5 &    5.5  $\pm$   1.0 &    5.4 $\pm$    0.6 &    0.4  $\pm$   0.1 &    2.2  $\pm$   0.2 &    6.0  $\pm$   0.5 &    1.1 $\pm$    0.1 &  $4.1$ $\pm$    0.4 &    2.9  $\pm$    0.6 &    1.4   $\pm$   0.2 &   13.5  $\pm$    0.4 \\
160.50 &  --0.07 &   117 &    2.7 $\pm$    0.3 &    8.4 $\pm$    0.8 &    9.3 $\pm$    0.8 &    1.7  $\pm$   0.1 &    3.1  $\pm$   0.6 &    6.8 $\pm$    1.2 &    2.6 $\pm$    0.5 &  $1.8$  $\pm$   1.5 &    2.1 $\pm$     0.5 &    1.9  $\pm$    0.2 &   14.5 $\pm$     0.5 \\
169.70 &  --6.34 &   110 &    0.6 $\pm$    0.1 &    2.7  $\pm$   0.2 &    3.6 $\pm$    0.2 &    0.3 $\pm$    0.0 &    1.8 $\pm$    0.1 &    5.4 $\pm$    0.2 &    1.2 $\pm$    0.1 &  $6.7$  $\pm$   0.8 &    6.5 $\pm$     1.5 &    1.6  $\pm$    0.2 &    8.4  $\pm$    0.4 \\
172.77 & --18.87 &   111 &    0.9 $\pm$    0.1 &    3.3 $\pm$    0.3 &    4.5 $\pm$    0.3 &    1.2 $\pm$    0.1 &    2.9 $\pm$    0.2 &    7.8 $\pm$    0.2 &    2.5 $\pm$    0.1 &  $4.2$ $\pm$    0.6 &    1.6 $\pm$     0.5 &    1.5 $\pm$     0.1 &   14.7  $\pm$    0.5 \\
172.77 & --14.69 &   110 &    1.5 $\pm$    0.2 &    6.5 $\pm$    0.6 &    9.4  $\pm$   0.8 &    1.2 $\pm$    0.1 &    4.8 $\pm$    0.5 &    9.4 $\pm$    0.6 &    2.3 $\pm$    0.2 &  $8.0$  $\pm$   0.8 &    3.1 $\pm$     0.5 &    1.8 $\pm$     0.2 &   11.6 $\pm$     0.3 \\
172.77 &  --8.43 &    91 &    1.1 $\pm$    0.1 &    4.3 $\pm$    0.3 &    4.9  $\pm$   0.3 &    0.8 $\pm$    0.1 &    2.5 $\pm$    0.3 &    7.6 $\pm$    0.3 &    1.4 $\pm$    0.2 &  $3.9$ $\pm$   1.1 &    2.6 $\pm$     0.5 &    1.5 $\pm$     0.2 &   13.1 $\pm$     0.4 \\
172.77 &  --6.34 &    81 &    1.2 $\pm$    0.2 &    4.0 $\pm$    0.7 &    5.1 $\pm$    0.6 &    0.7 $\pm$    0.1 &    2.1  $\pm$   0.4 &    6.0 $\pm$    0.7 &    1.8 $\pm$    0.5 &  $6.8$  $\pm$   2.5 &    2.5  $\pm$    0.6 &    1.4 $\pm$      0.2 &   13.0 $\pm$     0.3 \\
175.84 &   4.10 &   109 &    8.1 $\pm$    0.5 &   16.0 $\pm$    0.7 &   12.3 $\pm$    0.5 &    0.3 $\pm$    0.1 &    2.5 $\pm$    0.2 &    6.6 $\pm$    0.4 &    1.9 $\pm$    0.2 &  $7.5$  $\pm$   0.9 &    4.3 $\pm$     0.4 &    1.1  $\pm$    0.2 &   12.0  $\pm$    0.3 \\
178.91 &--23.05 &    51 &    3.9 $\pm$    0.8 &    9.7 $\pm$    2.7 &   12.4  $\pm$   2.2 &    1.3 $\pm$    0.5 &    5.3 $\pm$    0.8 &   12.6 $\pm$    1.9 &    4.4 $\pm$    1.4 &  12.1  $\pm$    7.6 &    2.2  $\pm$    0.6 &    1.3  $\pm$    0.4 &   14.3  $\pm$    0.4 
\\
178.91 &   2.01 &   110 &    3.1 $\pm$    0.3 &    7.6 $\pm$    0.7 &    7.6 $\pm$    0.6 &    0.6 $\pm$    0.3 &    4.3 $\pm$    0.5 &    9.3 $\pm$    0.9 &    2.2 $\pm$    0.3 &  $4.8$ $\pm$    0.8 &    2.7 $\pm$     0.5 &    1.6 $\pm$      0.2 &   13.7 $\pm$     0.4 \\
181.97 & --12.61 &    66 &    0.3 $\pm$    0.2 &    1.3  $\pm$   0.7 &    2.0 $\pm$    0.5 &    0.4 $\pm$    0.1 &    1.9 $\pm$    0.1 &    4.4 $\pm$   0.5 &    1.4 $\pm$    0.3 &  $4.9$ $\pm$    1.7 &    2.3   $\pm$   2.1 &    1.3   $\pm$   0.2 &   12.5  $\pm$    0.3 \\
181.97 &  --8.43 &    48 &    1.3 $\pm$    0.8 &    5.1 $\pm$    2.3 &    8.6  $\pm$   2.0 &    1.2 $\pm$    0.3 &    4.9 $\pm$    0.7 &    9.2 $\pm$    2.0 &    2.1 $\pm$    0.8 &  $4.7$ $\pm$    3.9 & -- &    2.6  $\pm$   1.7 &    6.8   $\pm$   1.7 \\
181.97 &  --2.16 &   111 &    2.1 $\pm$    0.3 &    6.7 $\pm$    0.8 &    8.3 $\pm$    0.7 &    0.5 $\pm$    0.2 &    4.2 $\pm$    0.3 &    9.7  $\pm$   0.6 &    2.6 $\pm$    0.3 &  11.9  $\pm$  1.3 &    3.7   $\pm$   0.5 &    1.5 $\pm$     0.2 &   11.5 $\pm$      0.3 \\
181.97 &   2.01 &   111 &    3.8 $\pm$    0.4 &    8.9  $\pm$   0.8 &    7.7 $\pm$    0.6 &    0.6 $\pm$    0.2 &    4.2  $\pm$   0.3 &    7.6  $\pm$   0.6 &    1.4 $\pm$    0.4 &  $5.6$  $\pm$   1.5 &    2.9  $\pm$    0.5 &    1.9  $\pm$    0.3 &   14.0 $\pm$     0.4 \\
185.04 & --10.52 &    48 &    0.2 $\pm$    0.2 &    0.6  $\pm$   0.8 &    2.0 $\pm$    0.6 &  $<$0.3 &    2.0  $\pm$   0.2 &    3.6  $\pm$   0.6 &    1.1 $\pm$    0.3 &  $3.5$  $\pm$   1.8 & -- &    2.0  $\pm$    0.3 &    9.8  $\pm$    0.2 \\
 \hline
Median & values  &&&&&&&&&&&&\\
  -- &   -- &  -- &    2.2 $\pm$     0.4 &    6.7 $\pm$     0.8 &    7.5 $\pm$     0.7 &    0.9  $\pm$    0.1 &    3.1 $\pm$     0.4 &    8.0$\pm$      0.7 &    1.8 $\pm$     0.3 &  $4.9$ $\pm$     1.3 &    2.6 $\pm$     0.5 &    1.6 $\pm$     0.2 &   13.7 $\pm$     0.4 \\
\hline
 Case 3  &&&&&&&&&&&&&\\
 \hline
 68.46 &   4.10 &    34 &   35.1 $\pm$    3.4 &   60.2  $\pm$   6.7 &   34.9 $\pm$    4.4 &    3.4 $\pm$   0.5 &    3.4  $\pm$   4.2 &   28.5 $\pm$    2.8 &    6.3 $\pm$    1.8 &  7.7  $\pm$   6.4 &    2.7 $\pm$    0.5 &    1.5 $\pm$    0.3 &   17.5 $\pm$    0.6 \\
 77.66 &  --0.07 &    61 &   27.2  $\pm$   2.9 &   40.3 $\pm$    3.2 &   23.8 $\pm$     1.3 &    2.5 $\pm$    0.1 &    8.1 $\pm$    0.7 &   17.8 $\pm$    0.8 &    5.4 $\pm$    0.4 &  $6.5$ $\pm$    0.5 &    2.5  $\pm$   0.4 &    1.5 $\pm$    0.1 &   19.6  $\pm$   0.8 \\
 77.66 &   2.01 &   107 &   26.3  $\pm$   2.9 &   39.4 $\pm$    3.2 &   23.8 $\pm$    1.3 &    2.6 $\pm$    0.1 &    8.7 $\pm$    0.6 &   18.3 $\pm$    0.7 &    5.6 $\pm$    0.4 &  $7.4$  $\pm$   0.6 &    2.5 $\pm$    0.4 &    1.5 $\pm$    0.1 &   19.5  $\pm$   0.8 \\
 83.80 &  --0.07 &   105 &   42.2 $\pm$    3.0 &   62.8  $\pm$   4.1 &   34.5 $\pm$    1.9 &    2.7 $\pm$    0.1 &   10.7 $\pm$    0.5 &   20.9 $\pm$    0.9 &    6.7 $\pm$    0.3 &  10.0 $\pm$     0.8 &    2.9 $\pm$    0.4 &    1.4 $\pm$    0.1 &   18.0 $\pm$   0.7 \\
 93.00 & --12.61 &    17 &    1.9 $\pm$    1.3 &    2.6 $\pm$     3.6 &    5.8 $\pm$    2.0 &    0.7 $\pm$    0.2 &    2.9 $\pm$    1.1 &    6.9 $\pm$    1.6 &    2.1 $\pm$    1.2 &  10.6  $\pm$   5.7 &    0.9  $\pm$  1.9 &    1.3  $\pm$  0.5 &   20.7  $\pm$   0.8 \\
 96.07 &  --6.34 &    43 &   11.0 $\pm$    3.1 &   20.7 $\pm$    4.0 &   16.7 $\pm$    1.8 &    1.7 $\pm$    0.2 &    5.0 $\pm$    0.3 &   10.7  $\pm$   0.7 &    1.3 $\pm$    0.5 & $<$5.9 &    2.4 $\pm$    0.6 &   1.8 $\pm$    0.2 &   16.5  $\pm$   0.5 \\
 96.07 &  --4.25 &   100 &    9.5  $\pm$   1.4 &   19.2 $\pm$    2.0 &   15.9 $\pm$    1.0 &    2.2 $\pm$    0.1 &    5.4 $\pm$    0.4 &   11.2 $\pm$    1.0 &    2.1 $\pm$    0.4 &  0.4 $\pm$    1.5 &    2.2  $\pm$   0.5 &    2.0  $\pm$   0.2 &   17.1   $\pm$  0.6 \\
102.21 &  --0.07 &   111 &    5.2  $\pm$   2.6 &   10.8 $\pm$    3.9 &    8.5 $\pm$    2.2 &    1.4 $\pm$    0.2 &    3.6 $\pm$    0.8 &    8.6 $\pm$    1.5 &    2.4 $\pm$    0.6 &  $3.9$ $\pm$    2.7 &    2.2  $\pm$   1.1 &    1.6  $\pm$   0.3 &   17.7  $\pm$   0.7 \\
105.27 &  --0.07 &   111 &    4.5 $\pm$    2.5 &   11.8 $\pm$    3.6 &   10.2 $\pm$    2.0 &    2.6 $\pm$    0.3 &    5.3 $\pm$     0.6 &   11.8 $\pm$    1.1 &    2.6 $\pm$    0.4 &  $5.1$ $\pm$    1.6 &    2.0  $\pm$   1.1 &    2.0  $\pm$   0.2 &   17.1 $\pm$    0.7 \\
126.75 &  --2.16 &   108 &    4.4 $\pm$    0.9 &    7.7 $\pm$    1.3 &    6.2 $\pm$     0.9 &    0.5 $\pm$    0.1 &    2.9 $\pm$    0.4 &    6.5 $\pm$    0.6 &    0.7 $\pm$    0.3 & $<$1.6 &    2.5 $\pm$     0.6 &    1.5 $\pm$    0.3 &   16.3 $\pm$    0.5 \\
142.09 &  --2.16 &   111 &    3.9  $\pm$   1.2 &    8.2 $\pm$     2.2 &    5.7  $\pm$   1.5 &    1.4 $\pm$    0.2 &    1.6 $\pm$    0.6 &    3.8 $\pm$    1.1 &    0.3 $\pm$     0.5 &  $2.1$  $\pm$   1.8 &    2.0  $\pm$   0.9 &    2.8  $\pm$   0.5 &   19.5  $\pm$   0.9 \\
142.09 &  12.46 &    55 &    2.1 $\pm$    0.2 &    6.8 $\pm$    0.7 &    6.7 $\pm$    0.6 &    0.3 $\pm$   0.1 &    2.0 $\pm$    0.7 &    3.3 $\pm$     1.2 &    1.8 $\pm$     0.4 &  $8.8$  $\pm$   1.9 &    4.4 $\pm$    0.5 &    1.0 $\pm$    0.4 &   11.0  $\pm$   0.2 \\
145.16 &  --2.16 &   110 &    3.0 $\pm$    0.5 &    6.8 $\pm$    1.0 &    6.3 $\pm$    0.9 &    1.5 $\pm$    0.1 &    3.7 $\pm$   0.5 &    9.2 $\pm$    1.1 &    1.3  $\pm$   0.4 &  $1.1$ $\pm$    1.1 &    1.7  $\pm$   0.6 &    1.9 $\pm$    0.2 &   18.4  $\pm$   0.7 \\
148.23 &  --2.16 &   111 &    6.0  $\pm$   0.6 &   11.0 $\pm$     1.0 &    9.5 $\pm$    0.8 &    1.4 $\pm$    0.2 &    5.2 $\pm$    0.5 &   11.5 $\pm$    0.9 &    2.9 $\pm$    0.3 &  $8.1$ $\pm$    1.3 &    2.0  $\pm$   0.5 &    1.5 $\pm$    0.2 &   18.4  $\pm$   0.7 \\
154.36 &  --8.43 &    53 &    0.9 $\pm$    0.1 &    3.2 $\pm$    0.2 &    4.1 $\pm$    0.3 &    0.5 $\pm$    0.0 &    1.9 $\pm$     0.2 &    7.2 $\pm$    0.3 &    1.4 $\pm$    0.2 &  $4.4$  $\pm$   0.7 &    2.7 $\pm$    0.5 &    1.2  $\pm$   0.1 &   12.6 $\pm$    0.3 \\
154.36 &  --4.25 &    98 &    1.1 $\pm$    0.2 &    4.0 $\pm$    0.6 &    5.3  $\pm$   0.6 &    1.3 $\pm$    0.2 &    2.7  $\pm$   0.4 &    7.1 $\pm$    0.6 &    1.5 $\pm$    0.4 &  $3.9$  $\pm$   1.8 &    1.9  $\pm$   0.6 &    1.9  $\pm$   0.2 &   14.1 $\pm$    0.4 \\
154.36 &  14.54 &    20 &    2.9 $\pm$    0.4 &   11.6 $\pm$     2.0 &    9.9 $\pm$     1.6 &    1.9 $\pm$    0.4 &    2.7 $\pm$    1.0 &   11.4 $\pm$     1.9 &    2.3 $\pm$    1.8 &  $4.3$  $\pm$   6.2 &    3.1   $\pm$  0.7 &    1.9  $\pm$   0.4 &   12.8  $\pm$   0.5 \\
157.43 &   2.01 &   111 &    2.3 $\pm$    0.2 &    5.4 $\pm$    0.3 &    5.5 $\pm$    0.3 &    1.1 $\pm$    0.0 &    3.5 $\pm$    0.2 &    6.6 $\pm$    0.4 &    1.2 $\pm$    0.2 &  $3.2$  $\pm$   0.5 &    1.8   $\pm$  0.4 &    1.9 $\pm$   0.1 &   17.3 $\pm$    0.6 \\
157.43 &   6.19 &    73 &    2.3 $\pm$    0.1 &    7.0 $\pm$    0.3 &    7.4 $\pm$    0.3 &    1.3 $\pm$    0.0 &    4.8 $\pm$    0.2 &   11.0 $\pm$    0.3 &    3.0 $\pm$    0.1 &  10.1  $\pm$   0.8 &    2.1 $\pm$    0.4 &    1.5 $\pm$    0.1 &   14.7  $\pm$   0.5 \\
166.63 &  --2.16 &   111 &    2.7 $\pm$    0.3 &    6.7 $\pm$     0.7 &    7.2 $\pm$    0.6 &    2.0 $\pm$    0.2 &    3.6 $\pm$    0.5 &    7.9  $\pm$   0.6 &    1.2 $\pm$    0.3 & $<$3.5 &    1.5 $\pm$    0.5 &    2.3 $\pm$    0.2 &   18.0 $\pm$    0.7 \\
166.63 &   2.01 &   111 &    7.5 $\pm$    1.2 &   16.0 $\pm$    3.2 &   16.6 $\pm$    2.4 &    3.9 $\pm$    0.5 &    9.9 $\pm$    1.6 &   21.3 $\pm$    2.9 &    7.4 $\pm$    1.2 &  11.9  $\pm$   5.3 &    1.5 $\pm$    0.6 &    1.6 $\pm$    0.2 &   19.0 $\pm$    0.7 \\
166.63 &   4.10 &    90 &    3.0 $\pm$    1.0 &    4.4 $\pm$    2.6 &    8.5 $\pm$   2.0 &    1.9 $\pm$    0.6 &    6.6 $\pm$    1.4 &   17.5 $\pm$    2.5 &    6.4 $\pm$    1.7 &  17.2 $\pm$    5.8 &    0.6  $\pm$   0.9 &    1.1 $\pm$    0.3 &   23.2 $\pm$    1.0 \\
169.70 & --12.61 &   110 &    1.4 $\pm$    0.1 &    5.0 $\pm$    0.3 &    6.2 $\pm$    0.3 &    1.3 $\pm$     0.0 &    3.6 $\pm$     0.1 &    7.0 $\pm$    0.2 &    1.3  $\pm$   0.1 &  $3.8$ $\pm$    0.5 &    2.0  $\pm$   0.4 &    2.0  $\pm$   0.1 &   14.1  $\pm$   0.4 \\
178.91 &  --6.34 &    93 &    3.4 $\pm$    0.3 &   10.6 $\pm$     0.7 &   12.0 $\pm$    0.6 &    1.0 $\pm$    0.1 &    6.6 $\pm$    0.5 &   10.9 $\pm$    0.5 &    1.9 $\pm$    0.3 &  0.7  $\pm$   1.2 &    3.1 $\pm$     0.4 &    1.8  $\pm$   0.2 &   12.4 $\pm$    0.3 \\
178.91 &   6.19 &    88 &    2.2 $\pm$    0.3 &    5.3 $\pm$    0.7 &    5.4 $\pm$   0.5 &    0.9 $\pm$    0.1 &    4.6 $\pm$    0.3 &    7.1 $\pm$    0.6 &    0.9  $\pm$   0.3 &  0.3 $\pm$    1.1 &    2.0  $\pm$   0.5 &    1.8 $\pm$     0.2 &   16.1 $\pm$    0.5 \\
 \hline
Median & values  &&&&&&&&&&&&\\
-- &  -- &   -- &    3.4   $\pm$  0.9 &    8.2  $\pm$   2.0 &    8.5  $\pm$   1.0 &    1.4 $\pm$    0.1 &    3.7  $\pm$   0.5 &   10.7  $\pm$   0.9 &    2.1  $\pm$   0.4 &  $4.3$ $\pm$    1.5 &    2.1 $\pm$   0.5 &    1.6 $\pm$    0.2 &   17.3  $\pm$   0.6 \\
\hline
\end{tabular}
\end{table}